
  	Now you will need to select the video card that you will be
  	using.  You will be presented with a list of video cards that
  	have been used by at least one XFree86 user.  In some instances
  	there is more than one card from a given vendor with several
  	variations; refer to your documentation to choose the correct
  	one.


	If your card is not listed in the database, quit out of this
	program and refer to the documentation accompanying this
	configuration system for information on how to generate a
	new database entry for your specific card.

