UCSD Pascal KERMIT for the Terak graphics workstation

This implementation of KERMIT was done by Kate MacGregor of Cornell Computing
Services (KMM@CORNELLA.BITNET) for the Terak 8510a running version II.0 of the
UCSD p-System.  It is broken up into several modules, some system independent,
some system dependent.  These modules have been concatenated into a single
source file, with the components separated by lines of the form

>>>> filename

Where the filenames are:

HELP.TEXT
KBDHANDLR.TEXT
KERMIT.TEXT
PARSER.TEXT
RCVHANDLR.TEXT
RECSW.TEXT
SENDB.TEXT
SENDSW.TEXT

The Pascal source files should be mostly system independent; the MACRO-11
source files are specific to the Terak, which is based on a PDP-11
microprocessor.  The file UCTERAK.DOC contains user documentation, instructions
for building UCSD Pascal Kermit for the Terak, and hints on adapting it to
other machines.  It should be renamed to KERMITHLP.TEXT on the UCSD Pascal
system.

[End of UCTERAK.HLP, May 1984]
