November 26, 1984

Dear Frank,

I previously contacted you, asking you how I should send you a new
version of Kermit which we developed.  The new version is for the
Tektronix 4170 CP/M-86.

All the files on this tape come from the standard Kermit distribution
tape, except two files:

READ.ME	-	this message
86KERI.TEK - 	machine specific module for 4170, like 86KERI.RB,86KERI.APC

The rest of the files are the standard files for CP/M-86 Kermit, for the
Rainbow and APC.  These files remain unchanged.  I have written no new
documentation for this implementation.  The instructions are the same as
for the other CP/M-86 versions with just one additional point:

The HOST port of the 4170 is used for Kermit.

If you have further questions, don't hesitate to contact me.  We will be
looking forward to the latest distribution tape.

Robert Raymond
TransEra Corporation
3707 North Canyon Road
Building 4
Provo, UT  84601
(801) 224-6550
