AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 1 of 8

NEARnet

Amsterdam EUnet

T1

NL

137.39.43.2

137.39.8.2

137.39.44.1

137.39.8.1

.44.2

.45.2

137.39.45.1 E

137.39.46.1

137.39.46.2

T1

T1 137.39.37.1 137.39.37.2

137.39.

27.1

137.39.1.14

1.1.1.2T1

256 .1

E

192.221.254.242

192.54.222.9

PSInet

San Jose 1 CA E1 E0

S1

S0

AGS+/4 9.1(2)

Cambridge MA_{E0} S0 IGS/R 9.0(1)

134.222.5.2

T1

E1 E0

S0 S4

AGS+/4 9.1(2)

San Jose 2 CA

T1

137.39.17.1

.50.2

137.39.50.1

137.39.17.2

137.39.1.1

137.39.12.2

137.39.12.1

E

E

.27.2T1

192.48.96.14 153.39.128.1

256.7.2137.39. 7.1

192.48.96

UUNET

Washington DC S2

S1

S0 AGS+/4 9.1(1)

College Park MD S1

E0 CGS/4 9.1(1) E

192.31.50.3

E E1 E0 AGS+/4 9.1(1) VA Church 2

Falls^{S0}

S3

S1

512 FR

Palo Alto 1 CA S0

AGS+/4 9.1(1)

Austin TX AGS 9.0(1)

Portland OR S0 AGS/49.1(4) S9

512

Cambridge PIPEX UK 128 S0

S1

E0 E1

AGS+/4 9.1(1)VA

Church 1

Falls_{S4}

Boston MA_{S1}

AGS+/4 9.1(2) S0 S2 S5

E1

E NetBlazer1

T1

149.20.1.2

149.20.1.1

PSInet

CERFnet

CA Berkeley S0

S1

AGS+9.0(1) S1

E0

.2 137.39.74.1

Backbone

Stockholm TIPnet SE

256 FR

T1

Toronto

UUNET

CA

CANADA

SwipNet

Stockholm

SE NORDUnet

CIX-West

192.130.130.11

192.130.130.10

Helsinki DataNet FI 192.130.130.12

1.10

New

S1 AGS+/49.1(4) 2E2T S0

T1 SprintLink

SprintLink

ICMnet

E

137.39.29.1

137.39.29.2

Dallas TX S0 AGS+ 9.0(1)

T1

S4

137.39.18.2

137.39.43.1

137.39.18.1

Brunswick NJ

37 2-12

LEASED

Thailand

192.121.154.242

.241

10 3-1

DIAL

Russia

137.39.39.1

137.39.39.2

T1

S0

Palo Alto 2 CA AGS+/49.1(4)

S0

E0 E1

E1

E

137.39.47.1

137.39.47.4

AGS+ 9.1(1)

S0 New York NY E0

Chicago IL

S0

AGS+ 9.0(1)

Tokyo Japan

E0

T1

E E0

THEnet T1

T1

Sesquinet

BARRNet

S1

137.39.110.2 .110.1

128.241.5.226

Bombay India IN 64 .109.2

137.39.109.1

S14

E1 .248

.9

192.41.177.248

.245

.253

.241

.240

192.41.177.249

SURAnet

NSFNET

NSFNET

NSFNET

NSFNET

E 153.39

.6 SURAnet

AGS+ 9.0(1)

137.39.128.1

137.39.128.2

137.39.128.3

San Diego CA CGS 9.1(1)

S0

Los Angeles CA AGS+ 9.1(1)

T1

T1

S0 2E2T

2E2T 2E2T 4S

2E2T 4T 4T

2E2T 4T 4S 2E2T 4T 4T 4S

2E2T 2E2T 4S 4S 2E2T 2E2S 4S 4S

2E2T 2E2S 2E2T 4T 4S 4S

2E2T 2E2T 4T 4S 4S

2E2T 4T 4S 4S

2E2T 4T

S1

S7

S1

137.39.150.1

.150.2

137.39.151.1

137.39.151.2

2E2T 4T 4T 4S 4S 4S

2E2T 4T 2E2T

2E2T 2E2T 4T 4S 4S 4S 2E2T 4T 4S 4S 4S

S2 S1 T1

.179.1

.179.2

.178.1

.178.2

E

137.39.174.2

137.39.174.1

E0

E1

Flash

Flash

Flash

Flash

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 2 of 8

T1

ICMnet

SprintLink

NSFNET T1

E

512 FR

NEARnet

Amsterdam EUnet

T1

NL

E

0

T1

T1

T1

256

E

San Jose 1 CA

Cambridge MA

San Jose 2 CA

T1T1

E E

T1256

Washington DC College Park MD E

E T1

Palo Alto 2 CA

512

Cambridge PIPEX UK 128

VA Church 1

Falls E NetBlazer

T1

PSInet

CERFnet

CA Berkeley

BARRNet

256 FR

SURAnet

Toronto CA

CIX-West

0000.0000.0004.00

0000.0000.0006.00

0000.0000.0003.00 0000.0000.0001.00

0000.0000.0002.00

0000.0001.0001.00

MITRE

AlterNet-AA.0000.0102

AlterNet-AA = 47.0005.80FF.F800 AlterNet Backbone area = AlterNet-AA.0000.0001.0001

SM

0000.0000.0009.00 0000.0000.0007.00

0000.0000.0008.00

0000.0000.000A.00

0000.0000.000B.00

47.0005.80FF.F100

0000.0000.0005.00

AlterNet OSI

39 47

T1

UUNET

T1

Dallas TX

Portland OR Boston MA

Stockholm TIPnet SE

Helsinki

DataNet FI

47.0005.80FF.EE00

UUNET CANADA

New

T1

SprintLink

Austin TX

T1

SM

Brunswick NJ

LEASED

Thailand

DIAL

Russia

Palo Alto 1 CA

E

Tokyo Japan

Chicago IL

New York NY T1

E

T1

THEnet

Sesquinet

T1

0000.0000.000D.00

0000.0000.000E.00

56 EPRI-DA

AlterNet-AA.0000.0104

56 EPRI-PA

AlterNet-AA.0000.0105

Bombay India IN 64

NSFNET

NSFNET

NSFNET

PSInet

SwipNet

Stockholm

SE NORDUnet

47.0023

E

SURAnet

VA Church 2

Falls

Los Angeles CA

San Diego CA

T1

T1

E

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 3 of 8

64 UUNET-IN 56 SITA 56 Baily

DIAL

PubNix 198.84.4-7

Sylvest DIAL

198.3.176-191 20 1-9

T1 IBMBET 129.41

56 SofTech S17

DIAL

AMSInc 162.70

56 LMI S13

160.1

160.2

198.3.128

56(S)

VideoCart

160.153 S15 99.1

99.2

DIAL AF

To San Jose 1 CA T1

Amsterdam EUnet NL

137.39.

27.1

137.39.1.14

1.1.1.2T1

256 .1

192.221.254.242

134.222.5.2

137.39.1.1 E

E

.27.2T1

192.48.96.14 153.39.128.1 256 .7.2 137.39.7.1

192.48.96

UUNET

Washington DC S2

S1

S0 AGS+/4 9.1(1) E

Cambridge PIPEX UK 128 S0

S1

E0 E1

AGS+/4 9.1(1) VA Church 1

Falls_{S4}

E1

E .2 137.39.74.1

192.41.177.248

SURAnet

Toronto CA

56(W)

192.41.205

EPRI-Fl S8 S9

56(S)

S19

S6

56(S) 59.1

59.2

129.91

T1

Citibank

Encore S18 41.1

41.2

56(S)

ATT Tridom

148.62

S10 15.1

15.2 56 192.41.137 Verdix W 56 26.1

26.2

Verdix

S11 21.1

21.2 56 129.135

Intergraph

67.1

67.2

66.1

66.2

153.40

CNRI

ISOC

132.151

DIAL T1 5.2 5.1

192.33.112 S5 Sparta MD

192.84.120

TIS MD

137.39.12.1

To Boston MA

T1

BSDI-VA

DIAL 14 1-5

15 1-6

23 1-11

31 2-9

22 1-10

DIAL

DIAL

DIAL

DIAL

DIAL

DIAL

DIAL

Sparta

OTA

RTKNET

MRJ

IRS

FED

FBI

Wonderworks

PAE

BDS

192.48.111

198.3.148

192.101.175

192.26.200

192.108.246

192.203.206

192.203.167

6.2 6.1

DIAL

DIAL

152.63

24 1-12 192.107.237

10 1-1

Performix

DIAL

16 1-7

Maxm

DIAL

11 1-2

192.147.28

192.124.128

S11

S8 S9 171.1171.2

38.1 38.2

56(W) 165.27

149.174

S7

S2

56(S)

34.1 34.2

138.20

61.1 61.2 T1 *MITRE’s Addresses 7 128.19 128.29 129.83

192.47.242

192.68.173

134.182

192.48.114 192.48.115

192.80.55

192.12.24

*See box

S6

192.100.71

56(S)

USCC

Compuserve

MSTAN

MITRE

S12 56 Penril

56(S)

GMEDS

68.1 68.2

139.73 192.57.6-9 192.57.17-39

S13 42.1 42.2

56(S) 147.243 192.103.16-19

SYBUS

137.39.43.1

Washington D.C. detail

1.10

MRJ-2 DIAL

192.101.175

17 1-8

25 2-2

13 1-4

UUNET CANADA

NetBlazer1

N26-1E

33 2-4

T1

SwipNet

Stockholm SE

NORDUnet

SprintLink ICMnet

E

155.93

Westinghouse DIAL

192.124.132 30 2-5

DIAL

Maxim

192.156.166 32 2-3

84.1 84.2

T1 CSC

56(W) Wyvern

Gams

DIAL 192.70.162 26 2-8

192.203.51

S4 137.39.18.1

S3 192.5.222

T1 FED 198.3.221

152.216

Grebyn

DIAL 192.70.213 12 1-3

S4

E 1.19

NetBlazer2 N18-1E

LEASED

Thailand 37 2-12

192.121.154.242

.241

DIAL

CCCI

3-3 12

96.2 96.1

166.1

166.2

192.101.187

192.188.104

192.195.208-210 DIAL SSA 3-6 15 137.200

DIAL

Apexgrp

3-9 20 192.189.127

DIAL

ANDI

4-4 27 161.70

DIAL Pix 3-8 17 192.111.45

DIAL

NTTData

3-11 22 192.58.97-101

192.135.81

192.83.157

192.193.194

T1 To Dallas TX

T1 To New Brunswick NJ

DIAL

IBEK

3-7 16 192.203.75

College

Park MD S1

E0 CGS/4 9.1(1)

To New York NY

E

E0

192.229.32-63

S10 56(W) 198.3.134 ITG

56(S)

Group1-PA

173.1173.2

S16

DIAL

Escript

5-4 13 192.124.143,145

56(S)

AII S12

134.175 97.1

97.2

192.41.177.253 192.41.177.241 192.41.177.240

192.41.177.249

NSFNET

.248

.9

NSFNET

E1

19.2 Autometric S17 161.1 161.2

198.49.5

56 NCUBE-DC S15 183.1183.2

198.3.131

Bombay India IN 64 .109.2

137.39.109.1

117.1 117.2

DIAL

Sterling

4-6 31

DIAL

FedData

3-12 23 192.124.150

DIAL AOT 4-7 32 192.203.68

DIAL

JGVanDyke

4-2 25 158.189

S14

56(S)

Entropic S14

192.86.164 134.1

134.2

118.1 118.2

E1 E0 AGS+/4 9.1(1) VA Church 2

Falls S0

S3

S1

192.251.42

T1 BAH 122.1

122.2

156.80 S5

137.39.110.1

56(W)

TrueVision S16

192.124.146-147

198.3.4

4-8 33

E 153.39

131.163 148.53 192.107.241-245

DIAL

KWD 198.17.65

3-1 10

192.41.177.6

SURAnet

192.41.177.245

PSInet

137.39.128.1

To Chicago IL

DIAL

City 198.3.7

133.1

133.2

DIAL

192.91.186 Russia 27 2-1

2E2T 4T

2E2T 2E2T 4T 4S 4S 4S

2E2T

2E2T 4T 4S 4S 4S

144.206

198.3.80-95

192.190.177 89.1

89.2

154.1154.2 198.22.1

198.62.86

DIAL EPR 3-10 21

198.3.211

167.1 167.2 S5

192.92.161

198.3.160-175

GTSI DIAL

192.254.16-31 35 2-7

SHL-DC DIAL

198.3.204-7 36 2-11

DIAL

Syscon/HII 139.69

DIAL

RSSI

5-1 10 198.3.220

DIAL

Csoft

5-2 11 198.3.223

Flash

4-3 26

VTI DIAL

192.231.134 34 2-6

DIAL

CCR 198.3.0

LEASED

Coplex 192.107.41

DIAL

FCC 192.104.54

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 4 of 8 To Los Angeles CA

Cppus S10 56(S)

FileNet S11 56(S)

137.39.43.2

137.39.44.1

137.39.44.2

137.39.45.2

137.39.45.1 E

137.39.46.1

T1 S0

T1

T1

137.39.17.1

137.39.50.2

137.39.17.2

T1 149.20.1.2

149.20.1.1

CA Berkeley

S0 S1 AGS+ 9.0(1)

512137.39.8.1

To Portland OR

E1 E0

S0 S4 AGS+/4 9.1(2)

San Jose 2 CA S1

T1 To Washington DC

S2

S10 S11

51.2

51.1

56(S)

32.2

32.1 56 31.2

31.1

T1 T1 S3 Pyramid

Retix

Viewlogic

Frame

129.214

163.182

192.5.151

153.32

53.2

53.1 192.111.118

192.108.252-253

56(S) Chthonic 192.108.251 S12 65.2

65.1

S5 T1 KPC

Olivetti

14.2

14.1

22.2

22.1

10.2

10.1

S2

S3

S8

T1

T1

129.18

129.189

131.146.14.2

130.187

128(S)

56 Tymnet 131.146

131.1

BSDI-CO S8 56(S)

64.2

64.1 192.65.171

UPL E&S 56

49.2

49.1 S7 143.191 56 DIAL UniForum 192.100.82

Telebit

S4 T1 SCO

131.219

E0 E 57.1

Dial Ups \ 6

Franz 3002

192.132.95

ANNEX 57.3

57.2

E1 131.106.1.252

TCS WRS Premenos 56

S6

S7

13.2 13.1

35.2 35.1

137.134

147.11 56

56 150.105 S8 54.2 54.1

E MTXINU

USENIX

131.106

PE-Nelson

Dial Ups

3002 192.52.153

45.3

44.3

44.4 12\ ANNEX

11 2-11

3002

Sumitomo

DIAL 192.84.118 23.1 23.2 13 2-9 Larse 192.159.78-9

San Jose 1 CA E1 E0

AGS+/4 9.1(2)

San Francisco Bay Area detail

S0

NeXT

PSInet

CERFNet

CIX-West

10 2-12

78.2

78.1 144.52

77.2

77.1

132.147 150.126 192.31.224 192.138.128-130

12 2-10

NetBlazer N26-2E

NetBlazer N10-1E

3002 ProCase 10 2-12

SprintLink

198.84.0-4

56(S) S13

3002 Sunlight

BSDI-UT

56 192.108.245

93.2

93.1 SHL

159.249

DSC 56(S)

Perspecta DIAL 11 2-11

SBEI 3002 13 2-9

192.75.61

192.203.128-129

17 2-5 198.3.122

192.146.147 102.2

102.1

Cygnus-AZ S12 56(S) 192.195.187 S13

S5 T1 Imagen 161.33

IDE S2

106.2 106.1 T1

192.188.249

192.195.207

BSDI-CA DIAL

192.135.134 14 2-8

137.39.46.2

137.39.50.1

192.31.50.3

E Palo Alto 1 CA S0

AGS+/4 9.1(1)

E1

Phillips-PA

Renaissance

Dial Ups

137.39.47.1

47.3 \ 12 47.2

11

13 DIAL

192.102.94

192.88.206

3002

ANNEX

2-11

2-9

15 3002 2-7

Practic

192.124.121

OBJY 17

DIAL 149.7 2-5

IBM-PA

Cetia W

Panasonic

E

T1

E2

S2 S3

S8

16.1.0.17

9.2 9.1 3.2 3.1

48.2

48.1

16 128.45 130.180

192.70.178

192.70.55

T1

56

192.35.233

56

56

DEC

140.212 S9 55.2

55.1

Adobe T1 S4 130.248

NCUBE

S10 56

63.2

63.1

71.2

71.1

134.242

TIS MTV TLG 140.174

MEW 158.118

E0

BARRNet

RasterOps

S11 19.2

NetBlazer N18-1E

192.124.130

Legato

S7 56

83.2

83.1

192.150.1

92.2

92.1

137.69

OrbSemi 12

3002 192.124.129 2-10

Knex 14

3002 192.190.2 2-8

E 137.39.47.4

16.1.0.7 E

192.31.50.1

EPRI-PA

S6 56

103.2

103.1

144.58

Synopsys

S5 T1

75.2

75.1

146.225

Vix E3 E 192.5.5.252

Interval S1 T1 192.203.6-7 107.1 107.2

T1 LTX-SJ 153.33

DIAL Sharebase 16 2-6 128.177

90.2

90.1

S1

T1 To Tokyo Japan

192.18.78-82

Group1-SF 56

192.101.31 S9

Palo Alto 2 CA S0

AGS+/49.1(4) E0

E1

E2

192.203.48 114.2 114.1

S6 113.2

113.1

56(S) LLU S9 119.2

119.1

DIAL Veritas 14 2-8 192.203.46-47

115.2

115.1

CSI S12 56132.2 132.1

192.203.56-63 FET S13 19.2125.2 125.1

192.203.72-73 NCD S14 56120.2 120.1

138.43

DHL S15 56129.2 129.1

137.98

198.3.1-3

192.43.153-160

192.207.15

NSFNET

139.1 139.2

3002 Netmanage

136.2

136.1

159.75

20 2-4 156.27

192.206.241

198.3.8-15

138.2

138.1

S7

151.112

2E2T 4T 4S 2E2T 4T 4T 4S

137.39.150.1

2E2T 4T 4S 4S

2E2T 2E2T 4T 4S 4S 2E2T 2E2S

192.86.85

Sandia S9 56(S)

192.5.5-6

Qualix S2 56 192.91.182 170.1 170.2

198.3.125

198.37.32-46

3002 Specialix 23 2-1 192.65.145

Flash

Flash

182.2

182.1

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 5 of 8

InterSys 3002 33 3-9

198.133.74

BGS 3002

192.152.96

PharLap 3002

UISInc 3002

NEARnet

T1 137.39.37.1 137.39.37.2

E 192.54.222.9

137.39.12.2

256 FR

Cambridge MA_{E0} S0 IGS/R 9.0(1)

Cetia E

Synnet

E1

S8

E

56

192.74.137.200

192.74.137

56 S6

EFF S3 T1 25.1 25.2

192.88.144

192.70.56 58.1 58.2

SUG STD 192.108.186 E

Pageworks

56 192.88.203 30.1 30.2

Racal-Milgo

S7 56

130.45

52.1 52.2 130.204

192.124.125

To Portland OR 512 FR

To Washington DC

T1

Dial Ups 137.39.16.1

16.2

16.3

LEASED

12

\

ANNEX E

WRS-Boston

192.124.127

USINSET

192.94.75 37

3002

Bruker

192.132.70 23 2-12

MERK 10 2-1

DIAL 192.124.122 72.1

72.2

AAPI 21 2-10

3002 192.133.48

Boston detail

Stockholm TIPnet SE 192.130.130.10

Helsinki DataNet FI 192.130.130.12

Wang

S4 56

79.1 79.2

158.101

3002

192.130.130.11

17 2-8

NetBlazer1 N18-1E

Jeol 3002 20 2-9

192.160.103

16 2-7

SEC-APL 3002

192.108.247

Clam 56

150.124

137.39.29.1

Artel 3002 15 2-6

192.190.23

Aspentec 56

82.1 82.2

86.1 86.2

192.124.136

Mak 12 2-3

3002

192.135.137

S9 S10 S11 88.1 88.2

BSDI-MA

56 192.160.14 S12 94.1 94.2

Easel 13 2-4

DIAL 192.160.173

VIS 14 2-5

3002 192.124.138

192.124.140

AW 56 192.207.117 S13 62.1 62.2

Ratsys 22 2-11

3002 192.124.142 192.231.32

Athena 24 3-1

3002 192.203.45

Village 11 2-2

3002 192.203.76

NSFNET

192.203.74

Harlequin

56 192.124.114 S14 123.1 123.2 ODI 56 198.3.16-31 S15 143.1 143.2

NECtech 56 S16

198.3.36

192.107.36

26 3-3

25 3-2

Orca DIAL

147.1 147.2

30 3-5

27 3-4 198.3.37

Boston MA S1 AGS+/4 9.1(2)

S0

S2

S5 E0 2E2T 4T 4T 4S 4S 4S

Agile 56 S17 157.1 157.2

198.3.104-111

128.191

SciViz 3002 32 3-7

OEC DIAL

198.3.136-143 31 3-6

198.3.124

EPRI-Bos 56

198.3.208-9

156.73 S18 164.1 164.2

Geac/Clsi

56 198.3.222 S19 192.160.20

Bostic DIAL 36 3-8

198.3.132

16.4

Synetics 10 4-1

3002

NetBlazer2 N18-1E

ADRA 11 4-2

3002 198.3.216-219

198.3.135

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 6 of 8

SHL-Hou

56(W)

AF 14 1-5

DIAL 192.251.42

Palmer 15 1-6

3002

SHL-CO 16 1-7

DIAL

Spectradyne 17 1-8

DIAL 192.67.98

E

To Los Angeles CA

137.39.174.1

WilTel

S4 T1 151.142 180.1 180.2

TKG DIAL 198.3.130 16 1-7

PenCom

DIAL

WAII

56(W)

Digicon

56(W) S10 124.1 124.2

FastTax 56 135.1 135.2

E E1 MCC 192.147.157

192.147.157.20

Austin TX AGS 9.0(1) E0

E Dial Ups 4\

Texas detail

ODS S9 56 160.86 56.1 56.2

20.1

20.2

192.94.73

NetBlazer N18-1E

BSDI-TX

S3 56 192.124.139 95.1 95.2

T1

To Falls Church 2 VA

137.39.39.1

E

Uniplex 10 1-1

DIAL

Dial Ups 6\

AWS 56(W) 192.203.69

131.1 131.2

60.1 60.2

NetBlazer N18-1E

Angus-LA

S6 56(W) 192.207.4 101.1 101.2

S0

Tadpole 17-22

DIAL/4

Angus-IL

S7 56(W) 192.207.5 104.1 104.2

192.107.103

137.39.39.2 T1

LTX-DA

T1 192.195.103

160.104 1-8-11

THEnet

Sesquinet

T1

S1

128.241.5.226

OC T1 192.82.215 192.84.55 192.138.179 192.231.241

S2

S11

112.1 112.2

Dallas TX^{S0}

AGS+ 9.0(1)

S1 E0

FastTax

DIAL 11 1-2

EPRI-DA

S8 56

100.1 100.2

192.124.141

164.57

137.144

192.203.70 198.3.38-39

S12

S3 144.1 144.2

137.39.110.2

S13 146.1 146.2

2E2T 4T

2E2T 4T 4S 4S

BGA 23 1-12

DIAL 198.3.116-119

DalSemi 12 1-3

DIAL 198.3.123

Dp7up 13 1-4

DIAL 192.154.10

198.3.120

198.3.64-79

198.3.200-203 15 1-6

198.3.192-199

E1

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 7 of 8

E E0 anDATAco

San Diego CA CGS 9.1(1) E1

E Dial Ups N\

Los Angeles/San Diego area detail

NetBlazer N18-1E

T1

To San Jose2 CA

E Dial Ups 4\ NetBlazer N18-1E S0 T1 2E2T

Cppus S5 56

FileNet S6 19.2

S3 56 32.2

32.1 Retix

163.182

56 S4 93.2

93.1 SHL

159.249

Usenix-LA 56

192.75.61

TeleDyne S7 56 159.201

S8

56 LLU S2 119.2

119.1

156.2

156.1

136.2

136.1

192.206.241

198.3.8-15

138.2

138.1

Los Angeles CA^{S1}

AGS+ 9.1(1)

S0 E1

2E2T 2E2T 4S

151.112

137.39.151.1 137.39.151.2

137.39.150.2

148.1

148.2

152.2

152.1 HSA DIAL 23 1-12 198.3.114

XXCAL

DIAL 22 1-11 198.3.113

E

To Dallas TX

137.39.174.2 E0

ArteCon

3002 23 1-12 198.3.212-215

anDATAco

DIAL 22 1-11

AlterNet Configuration 4/29/93 SM

UUNET/Alter-91/001 ftp.uu.net:/uunet-info/AlterNet.ps.Z

For more information contact: UUNET Technologies 3110 Fairview Park Drive, Suite 570 Falls Church, Virginia 22042 USA +1 800 4UUNET3(voice) +1 703 204 8000 (voice) +1 703 204 8001 (fax) alternet-info@uunet.uu.net

Page 8 of 8

DataBank

56(S) S

GMEDS 68.2 68.1

139.73 192.57.6-9 192.57.17-39

T1 To New York NY 137.39.178.2

T1 To Chicago IL 137.39.178.1

56 S6

SHL-NY

192.234.246 192.251.132-136

56 S5

PrenHall

T1 To New Brunswick NJ

E E3 Gport

Dial Ups N\ Compuserve

VideoCart 56 99.2 99.1

38.2 38.1

91.2 91.1

56(S)

56(S)

S

S

S0

160.153

149.174

192.124.135

56(S) S10

Naitc 33.2 33.1

BSDI-MN

138.108

E To New York NY

Chicago IL AGS+/3 9.0(1)

E2 E0

E Dial Ups 4\

56(S) S11 USE

Chicago detail

105.2 105.1

NetBlazer N10-1E

192.207.21

To Washington DC E

EchoLogic

3002

New Brunswick detail

T1 New S0

AGS+/49.1(4)

137.39.18.2

E 128.6.21.8

E1 Rutgers

Brunswick NJ E0

192.231.37

108.2 108.1

UI 3002 192.203.65

23 1-12

Vicorp

56(S) S3

56(S)

56(S)

S2

S8

198.3.32-35 IDA

56 S11

Group1-NY

Fisons

192.203.50

To Washington DC

E

DIAL Murphy

To Chicago IL

New York NY E0 AGS+/3 9.1(1) E2

E Dial Ups 6\

126.1

126.2

56 S

Mstan

192.48.113

New York detail

34.2 34.1

138.20

1-11 22

56(S) S7 192.124.149 130.2 130.1 Intel

Tektronix E E0 56 36.2 36.1

76.2 76.1

40.2 40.1

T1

56

S2

S6

S4

138.95.80.235

138.95

128.181

137.46 137.102

147.28 192.83.230

Sequent

56 S5

Blackwell 69.2 69.1 PSG 192.124.123

To San Jose 2 CA

512137.39.8.2

DIAL Pgroup

512 FR To Boston MA Portland OR S0 AGS/49.1(4) E1

S9

E Dial Ups 4\ 73.1

73.3

56 S7

Chorus

192.124.124

Portland detail

OCSG

DIAL

81.2 81.1

NetBlazer N10-1E

192.156.168

TESSI

DIAL 192.156.163

192.82.231

137.39.29.2

1-11 15

1-10 14

1-9 13

Techbook

DIAL 192.108.254

1-8 12

87.1 87.2

163.33 192.102.209

56 S8

Kentrox

ProTools

DIAL 192.203.66-67 1-7 11

Metheus

DIAL 192.203.163

1-6 10

192.228.32-63

192.231.73-4

AptecSys

DIAL 1-5 24

111.2 111.1

146.183 146.190

Minerva

DIAL

192.203.133

153.40

155.212 192.124.131 192.160.196 192.188.67

192.193.194

192.207.24

T1 S

Citibank 67.2 67.1

56(S) S9 DLB 192.124.133 85.2 85.1

56(S) S10

RISCNET 70.2 70.1

2-1 25 192.88.236

S0

To New York NY T1 S1

22 1-11

192.203.71

137.39.128.2

198.6.128-191

198.3.6

140.2 140.1

142.2 142.1

98.2 98.1

198.6.128.1

2E2T 2E2T 4S 4S

137.39.128.3 .137.1

.137.2 To Washington DC 128.6 192.76.178

Telerate

3002 21 1-10

Datatec

3002 146.99 20 1-9

NetBlazer N18-1E

WADNR

DIAL 2-2 26

NetBlazer N10-1E

2E2T 4T 4T

Hansa

2E2T 2E2S 4S 4S

56(S) S1

NCMS-MO

198.3.40

2E2T

198.3.41

198.3.96-103

56(S) S4

CSCI

Dorsai

DIAL

146.76

56 S3

ICLnet 158.2 158.1

198.3.121

198.3.42-43

Digex-2

DIAL 17 1-8

4Seasons

3002 15 1-6 198.3.126

Group1-CH 56 155.2 155.1 S3 192.203.49

Cummins

56(S) S7

143.222

PSnet

56(S) S6

148.9

NCMS

56(S) 80.2 80.1 S9 192.153.192

160.95 192.158.32-61

198.3.44-47

155.16-17 160.109-110 192.131.83-87

153.2 153.1

3002 MCS 192.160.127 1-12 23

3002 InfoChi 198.3.112 1-10 21

159.2 159.1

198.49.179

198.3.127

3002 Inland 1-9 20

137.39.179.1

1-6 15

163.2 163.1

S1

156.144

S2

169.2 169.1

162.2 162.1

198.3.129

56(S)

NetLink

Flash

198.3.144-147 184.2 184.1

64 S

Demos 96.2 96.1

144.206 192.91.186

192.92.161