HGMP-RC – UK Human Genome Mapping Project Resource Centre

Address:

UK HGMP Resource Centre W Clinical Research Centre

atford Road Harrow MIDDX HA1 3UJ

E United Kingdom

mail: c.bates@CRC.AC.UK

Phone: + 44 81 3466

FAX: + 44 81 869 3807

I Description n 1990, the UK Medical Research Council (MRC) founded, as part of the UK Human e ( Genome Mapping Project, a Resource Centre (HGMP-RC) at the Clinical Research Centr CRC), Harrow, Middlesex. The objectives of the HGMP-RC computing are to establish and c make available databases of genes, genetic markers and map locations, and to develop new omputing environments and methods for acquisition and analysis of such data. Computing o t and networking facilities were developed by the MRC to provide online computing support t he Project.

The facilities are connected to a number of other computing systems in centres of genetics and a n molecular biology research excellence worldwide through national and international wide are etworks (WAN’s) including the European Research Backbone Network (EBONE), INTER- , r NET, Public Data Networks (Packet Switching and Telephone) in the UK and overseas esearch and academic networks in the UK and overseas, European Molecular Biology Net- h work (EMBNet) and others. Direct connectivity to US laboratories was implemented using a igh-speed communication link, the UK-US ’fat pipe’. . M A great deal of effort has been spent on improving services to the scientific community olecular genetics databases, application software and miscellaneous services are available on M the HGMP computer systems and other systems around the world through the HGMP-RC enu system using workstations, personal computers or terminals from number of manufactur- a ers, equipped with appropriate networking and graphical facilities and connected to any of the bove WAN’s. s T Network Acces he HGMP-RC computing facilities can be accessed in two ways: • • by using the IP (Internet Protocol) service

by making an X29 call, using a PAD (packet assembler/disassembler)

R Who Can Use the UK HGMP-RC Facilities egistration is open, subject to the rules of HGMP, to any bona fide academic who applies, c whether based in the UK or elsewhere. To register as a UK HGMP-RC facilities user please ontact the address above (email is not used for registration applications).

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

August 29, 1992 NNSC Section 5.48, Page

References For a detailed description of the system and services available see Rysavy, F.R.,Bishop, M.J. at t al., "The UK Human Genome Mapping Project online computing service." Computer Applicaions in the Biosciences, Vol.8, no.2. 1992 , Pages 149-154. Several user manuals describing o r the usage of the HGMP-RC computing facilities have been written and are available t egistered users. The user support desk is maintained during working hours, providing practical t t help with users’ problems. A programme of courses aimed at giving an understanding of wha he facilities can provide are run regularly.

August 29, 1992 NNSC Section 5.48, Page 2