[Discontinued] CMR – Commercial Mail Relay - i The Commerical Mail Relay (CMR) at isi.edu, in the USC/Information Sciences Institute, Mar na del Rey, CA is scheduled to cease operations in September 1992.

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

July 10, 1992 NNSC Section 5.20, Page