Los Alamos National Laboratory Integrated Computing Network

L Address: os Alamos National Laboratory g B Attn: C-DO, External Computin 260 Los Alamos, NM 87545

P E-mail: skf@lanl.gov

hone: (505) 667-9463

T Description he computer environment at the Los Alamos National Laboratory (LANL) is supported by a - c multi-security level Integrated Computing Network (ICN) which integrates large host super omputers, a file server, a batch server, a printer and graphics output server and numerous s s other general purpose and specialized systems. Among the latter are experimental machine uch as the Intel Hypercube, the FPS T-series machine and two Connection Machines. In d d addition to unclassified network access, remote, secure access over LANL installed encrypte ata links is supported for classified computing up to the Secret level for NSI, FRD and o Y CNWDI information categories. Current (August, 1989) production host systems include tw -MP/832s, two X-MP/416s, one X-MP/48, one X-MP/24 and an X-MP/14. The latter

N machine runs UNICOS while the others run CTSS.

etwork access External networks connected to the ICN include MILNET, ESNET, NMFENET, HEPNET, a BITNET, CSNET, SPAN, NSFNET, NWCNET and TELENET. In addition, LANL maintains national T-1 backbone network supporting point-to-point, unclassified and secure data links c to major users of the ICN. Dial-in access at up to 9600 bps is also supported for both lassified and unclassified connections.

U Who Can Use the Network

S Government agencies and their contractors requiring services uniquely provided by LANL. For further information, please call Kay Fletcher (skf@lanl.gov) at (505) 667-9463.

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

August 8, 1989 NNSC Section 5.14, Page