ECIX – Energy and Climate Information Exchange

Address:

File Distribution Service

Energy and Climate Information Exchange 1 EcoNet 8 de Boom Street 7 E San Francisco, CA 9410

mail: ecixfiles@igc.apc.org

Phone: (415) 442-0220

FAX: (415) 546-1794

T Description he Energy and Climate Information Exchange (ECIX) is a project of EcoNet aimed at educat- a ing the environmental community and the general public on the potential of energy efficiency nd renewable energy to to reduce the use of fossil fuels and their contribution to global cli- , p mate change. The ECIX File Distribution Service provides a wide selection of information olicy statements, newsletters, and other files pertaining to energy and climate issues. Contri- r butions of pertinent materials are encouraged. File listings are updated regularly and the evised file lists are distributed via email to subscribers and several environmentally-oriented T newsgroups and lists.

he ECIX Project is funded by a grant from the Joyce Mertz-Gilmore Foundation.

A Network Access

ll ECIX files are available via anonymous ftp from igc.apc.org (192.82.108.1), in the sub- i directories /pub/ECO, /pub/ECIX, and /pub/ECIXfiles. The current list of all available files is n the subdirectory /pub/ECIXfiles.

A Who Can Use The ECIX Service

ll files provided by the ECIX file distribution service are available free of charge to anyone t with ftp access and/or electronic mail anywhere in the world. Files may be redistributed with he appropriate credit.

A Miscellaneous

number of official documents related to the UNCED meeting in June 1992 are also available c at this site in the subdirectory /pub/UNCED. These are in .zip (DOS PK-Zip), .Z (UNIX ompress), and .sit (Mac compressed) formats.

File listings and the actual files may also be requested via email for those without ftp access. , s To request a file listing, a specific file, or to be placed on the mailing list for future updates end email to ecixfiles@igc.apc.org. Please include your name, affiliation, and reason for p interest. Due to their size, the UNCED documents are NOT available via email, but can be urchased on diskette from EcoNet.

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

1 October 3, 1992 NNSC Section 3.36, Page

All ECIX files and much more energy, climate and UNCED oriented material can also be f found on the EcoNet network, which can be accessed via the Internet for a small subscription ee. For more information about EcoNet, send email to support@igc.apc.org, or contact

R EcoNet at the above address.

eferences Available via anonymous ftp from igc.apc.org (192.82.108.1) or via email from

I ecixfiles@igc.apc.org:

nformation about EcoNet /pub/econet_brochure o I Information about ECIX /pub/ECIXfiles/ECIXinf nformation about File /pub/ECIXfiles/ECIXfileinfo C Distribution Service urrent List of Energy Files /pub/ECIXfiles/EnergyFiles s

O

Current List of Climate Files /pub/ECIXfiles/ClimateFile

ctober 3, 1992 NNSC Section 3.36, Page 2