NLS – University of Wisconsin s Madison and Milwaukee Campuse Network Library System (NLS)

A Address:

utomation Help Desk y U 212F Memorial Librar

niversity of Wisconsin M 728 State Street

adison, WI 53706 u P Email: glshelp@vms.macc.wisc.ed

hone: (608) 262-8880

T Description he Network Library System (NLS) is the online public catalog of the libraries at the Univer- s sity of Wisconsin-Madison and the University of Wisconsin-Milwaukee. NLS supports a eparate online catalog for each campus.

The UW-Madison online catalog contains more than 1.7 million titles cataloged since 1976 - c located in twenty-five libraries on the campus and at the Center for Research Libraries in Chi ago. This represents roughly fifty percent of their collections. The UW-Milwaukee catalog e g contains approximately nine hundred thousand titles and represents eighty-five percent of th eneral collection.

I Network Access: f it is available on your system, please use tn3270 (telnet supporting 3270 emulation) to u f access blue.adp.w isc.edu (128.104.198.10). When connected you are presented with a men rom which you select NLS, the library catalog. Either use function keys to select an option or T tab to the option you want and press enter. elnet access is also available via a gateway machine providing the necessary 3270 emulation. p From your local host use telnet to access nls.adp. wisc.edu (128.104.198.20). You will be rompted to enter a terminal type (VT100 is the default, or you can enter the command list to f display a list of supported terminal types). After entering a valid terminal type, select NLS rom the menu to connect to the library catalog. Upon entering NLS, a screen is displayed at which you either press enter to search the - m Madison catalog or type Mil and press enter to search the Milwaukee catalog. Enter the com and exit on any screen to return to the main menu. To exit from NLS, return to the main

W menu and select the option to quit. This returns control to your local host.

ho Can Use NLS: The University of Wisconsin library catalogs for the Madison and Milwaukee campuses are currently available to all interested parties.

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

1 February 21, 1991 NNSC Section 2.14, Page

Miscellaneous Information: Xterm users or other windowing software users must set their window size to 80 characters x F 25 lines. or help using NLS or to obtain a free NLS Computer Catalog User’s Guide, contact the : d Memorial Library Information Desk at (608) 262-3193, or Dennis Hill via the Internet hill@vms.macc.wisc.edu. More detailed information on accessing NLS via the Internet is documented in: TCP/IP Net- o work Access To The NLSCatalog Via Tn3270 And Telnet. For a copy of this document, or any ther information, contact the Automation Help Desk at (608) 262-8880, or via the Internet at

N glshelp@vms.macc.wisc.edu.

ote on keyboard mappings:

Because keyboard mappings are defined by the tn3270 software on the client’s host computer, c we are not able to tell you definitively how your keyboard will be mapped. The following hart shows a selection of the tn3270 keyboard mapping used on many UW Madison VAX d b computers. These definitions are also used when accessing NLS via telnet as they are provide y the 3270 software on the gateway machine.

N S KEY PURPOSE KEYBOARD DEFINITIO end (called the BLUE key in NLS) Enter or Return Erase-to-end-of-field

(called the YELLOW key in NLS) Ctrl-e d E Delete character Ctrlscape key PF11 (default mapping) F Insert/Overstrike toggle Escape space unction keys PF1-PF9 Escape 1-Escape 9 F Function key PF10 Escape 0 unction key PF11 Escape - =

F

Function key PF12 Escape

ebruary 21, 1991 NNSC Section 2.14, Page 2