UHUNIX 3

neptune cnx500

NIS

WellFleetIMP cnx500

Internet

Chantry NIC NEWS

Campus

FDDI

[128.171.3.X]

Computer Center

FDDI

[128.171.44.X]

IBM TokenRing

[128.171.8.X]

Campus Ethernet [128.171.1.X]

Torben’s Private Wire [132.160.3.X]

Interconnect [132.160.1.X]

.200.20

.200

.223

.20

.20 .4

.1.81

.8

.8

Computer Center Ethernet [128.171.7.X]

.6.7

.6

.7

.52

.1

.6.7.52

.61.62.63

.61

.62

.63

.3

.5

.201

[128.171.41.X]

UHCCMVSUHCCVM

.12.152

IBM ES/9000

Dial up

Lines

956-9333

300-14.4Kbs

Campus

Terminals

.9

UH Computing Center^{This map is available via}

anonymous ftp from:

Host: ftp.Hawaii.Edu

Directory: /pub/maps/hawaii

Questions and comments:

Last updated on:

Oct. 5, 1993

Filename:

Ryan S. Lee

U.H. Computer Center ryanl@Hawaii.Edu

UHCC.v303.ps

UHUNIX

SPARC

Server 690

UHUNIX 2

SPARC

Center 2000

SPARC Server 10

UHCCVX

Starmaster

VAX 8550

NFS1

NFS2

NFS3

MAC Lab Workstation Lab

PC Lab

Serial Line(s)

Ethernet

.200

.200

SPARC Station 10

SPARC Server 10

SPARC Station 10SPARC

Station IPC

.200

Network Operation Center [128.171.33.X]

Sun Network Terminal Server

pearl.Hawaii.Edu

.100

Dial Up Lines

956-5080

300-14.4kbs