EZ4 EZ2CPTEZ1X25TR2EG1ZH1TR1SMA ALC ABB SG1ITRNTB

LS1EL3PS1BAL BA1 BE1BE3BE2RSA BUR BUE PTTBIEEL1EL2FR1NE1MAR YVE GE1CE1MA1 MA2 FWE LUG LUZ NEL ?LSLITULIMUBISGL

BE4TR3BRU

August 18. 92 � T. Stalder <stalder@switch.ch>

NSFnet Cornellvia EASIgate / T1& RIPE

NSFnet Cornellvia INRIA

IXIBelWue

SWITCHlan mapThe PostScript� version of this map can be fetchedby anonymous ftp from nic.switch.ch [130.59.1.40]in the directory /network/SWITCHlan/map

.2.1.1.2.205.11.22.12.1.202.202.202.37.204.39.204.204.36.201.201.201.10129.132.35

.2.2.2.2.2.2.1.1.1.1.1.1.105.101.32.160.161192.54.132

130.82.1

192.54.122

.1130.198.1

.1.2192.86.166

.30146.136.1

.6192.33.170.30

129.129.100

.2.48.250.2141.249.3

.1.96.102.2.2.4.201.6.1.2.2.52.251.2.152.2.2130.60.128

.17.152.1.2148.187.10

.1.159.2.2.1.1148.187.11

.153.2192.101.176

.164.1.104192.33.111

.1.1138.190.116

.1192.82.124

.103.33.1.2130.92.1

.56.2.1.5.4.3.2147.87.1

.1.1.163.106.1.2.2131.152.254

.253192.52.40

.2.1.251130.223.4

.6.72.5128.178.47

.4.3.1.1.3.73.1.2.1.64.69.162.254.1.92.1.2.2.2.1.1.1.2.2134.21.1

130.125.100

.165.2.1.2192.33.221

192.42.185

.2.153.84.1.1.91.1.2.2.2.101129.194.0

192.65.185

.130.1.1.1.2ip 130.59

.53.2.1.2.3.2.166.2.1.1147.88.16

.9.2.166130.125.206

130.125.94

.2.1.1.107.2.1.108.1.2.1156.106

192.136.41

.202.1.7.2.100.109.2.1192.153.89

.34.2.1.248.11.4.3.205.192.33.110

.201.202.12.11.3.204.3.158.2.1.168.2.1147.86.1 .2