Perf. Signal

Integrity

Luce

McQuillin

129.250.1. To

NSFNET

T3 NSS

253

192.5.146.

pgh3-gw 6

129.250.45.

1

129.250.54.

1

128.129.

2 cgi-gw

3.240

1

UPghRTR

gw.pitt.edu

1.57

8

136.142.

1.1

130.49.

1.1

1

2 fore-gw 2

192.88.243.

19

129.250.58.

mdvl1-gw

1

2

141.195.

2

5.201

alleg-gw

192.189.113.

cdi-gw 2

1

1 ccac-gw 2

163.129.

1.1

129.250.3.

192149.1.

cmu-gw

psc-gw

2 gateway.

sei.cmu.edu

comet.psc.

edu

1

16

129.250.10.

2

7 gateway.

cert.org

254

128.237.

192.58.107.

192.88.209

2

128.2.2.

pgh1-gw

3

2

1

129.250.9.

129.250.23.

1 uss-gw 2

192.5.39.

2

1 ansoft-gw 2

2

129.250.66.

cmu.default.

net.cmu.edu

3

128.2.

1.2

129

128

254.254

129.250.61.

129.250.67.

ssh-gw 2

1.1

157.229.

129.250.65

129.250.35.

129.250.39.

iup-gw 2

192.231.220.

3

129.250.37.

2

1

1

1

1

pgh2-gw

transarc-gw

2

3

tartan-gw

2

192.5.56.

253 maya-gw

2

192.70.254.

1

usbm-gw

2

2.1

129.250.8.

129.250.25.

192.76.184.

VISUS

1

129.250.33.

asri-gw

2

192.5.7.

100 nic-gw 2

192.156.226

1

1

1

129.250.40.

192.102.243.

1

1

129.250.75.

stc1-gw

129.250.12.

128.118.74.

2

1 hrb-gw 2

192.68.227.

2

1

129.250.52.

192.112.102.

2 juniata-gw 1

1

128.118.1

128.118.80

128.118.100

192.5.158.

1

3

3

1

2

2

PSU Campus

JvNCnet

1

129.250.56.

To phl3

Children’s Hosp.

151.195.0.0

Magee-Womens

Hosp.

pgh2-gw 1

1

1 1 1 1

1.59

2 pitt-gw 2

129.250.11

1

129.250.200

SMDS hrbg1-gw 2

1

1

1

1

1

2

gettysburg

-gw

138.234.

4.1

192.77.143.

1 lvc-gw 2

192.102.232.

dickinson-

gw

10

2

2 fandm-gw

155.68.

1.1

messiah-gw

2

2.1

etown-gw

2

192.146.186

1

129.250.62.

129.250.74.

153.42.

192.102.245.

Commonweqlth

Commonweqlth

Commonweqlth

2

129.250.49

129.250.50.

129.250.51.

129.250.57

1

1

1

State library

192.54.226.

4 pgh-nb1

100

CMU

101

BPA

192.124.34.

PREPnet west

July 1, 1993

ftp.prepnet.com: prepnet/maps/topology-west.ps

Proteon

cisco

Terminal Server

NetBlazer

non-PREPnet

equipment

Legend

T1

56K

9.6

Backdoor

Other

router

137.227.

129.250.46.

1

129.250.77.

legent-gw

155.35.

2

0.228

SSHEnet

router

To SSHEnet

200

1

2

To SSHEnet doe-petc-gw

192.65.179.

2

89

switch-gw

192.206.133.

2

10

129.250.82.

1

129.250.83.

102

TMS

192.152.191

2

1 cic-gw

129.250.70.

1

2

19 fcasd-gw 3

duq-gw

192.88.240.

2

1

1

129.250.36.

5 pgh-nb2

CLP branches x24

60 - 79 chatham-gw

192.204.6.

2

1

129.250.85.

pgh4-gw

7

27

192.204.30.

nttc-gw

1

2

2

19 clpgh-gw 1

192.204.3.

2

19

stc2-gw

192.188.119.

nttc-gw.

psc.edu

1

Pgh Dist.

Library

Center

pader-gw

2

192.204.18.

1

129.250.88.

1 swanson-gw

192.104.24.

2

65

129.250.96.

1 geisinger-

gw

1

159.240.1

2 nomos-gw

192.104.24.

2

65

129.250.97.

106

AIU

westminster-

gw

192.204.20.

2

1

129.250.90.

1

192.204.50.

2

1 gannon-gw

129.250.93.