Alternet

Xylogics Powertech

Blackwell FFAD GGR

Speedware

Logica Scottish Hydro

ICL

EDS-Scicon Loot, Manchester

IXI

EOS

DLB Systems Shape Data Ernst & Y oung

cam-gw1

Smallworld

Leica

Support/T esting

BNR cam-pt1 Loot, Kilburn Microfocus cam-gw1

MSI

APM DIALUP arabiosis brand clarion colloquium eoefegsfirefox fleetgreleafmsibasel ncsndlulthcse

Aspentech

IBMPCUG

Harlequin

West London POP

PSS

EUNET East London POP

Unipalm

London POP

Loot, Long Eaton

SPARCStation IPC

SunOS 4.1.2

48 MB RAM 3GB disk

pipe

AGS+/3

9.0(4.2)

2E 6T 20S

cam-gw2

NETBLAZER

1.5(12)

N18-1E

cam-du1

SPARCStation IPC

SunOS 4.1.3

48 MB RAM 2GB disk

tank

AGS+/3

9.0(4.2) X.25

2E 4T 20S

cam-gw1

PIPEX Cambridge

POP Configuration

End-May-93

[Last Updated

27-May-93, version

1.3, ftp.pipex.net:/pub/maps/Pipex-Cam.ps.Z]

JANET

pipe Toshiba SunSolve Visionware Tadpole

Microvitec

Royal Society Chemistry

BNS

Internet Systems

Viewlogic

Xyplex 6220

3.0B30

cam-gw4

Ethernet

Ethernet

Cisco IGS/R 9.1 cam-pt1