
	Now you must select your monitor.  If your monitor is not
	listed in the database, choose the VESA/Generic modes (the
	first ones on the list).  You can then use the tuning
	features of the configuration system to tune these modes
	to match your monitor.

	If you use the generic modes and/or tune any of the specific
	modes, please follow the instructions in the accompanying
	documentation on how to create and submit a new monitor
	database entry.

