Listed below are all the fatal error messages that can occur.
   Fatal errors are program problems that can not be corrected
   within the program itself.  All fatal errors, starting with
   "Error", are described along with their meaning and corrective
   action.    

Caution:
   Since most of these errors are file related, be sure to read
   the "Restoring Files" section that follows these error 
   message descriptions.

Enter A Bill - Error Messages:
   "Error 101: Read error on VEN"
   "Error 102: Read error on CAT"

   These error messages indicate that the company or catagory 
   you selected from the list box could not be read.  Since this
   is a memory resident window, exit completely out of the 
   program and try again.  Do not take a back-up while exiting.
   If the problem persists, restore the company file (VEN) or
   catagory file (CAT). 

Company Information - Error Message:
   "Error 201: Delete error on VEN"

   This error message indicates the company you selected to delete
   could not be read.  Since this is a memory resident window,
   exit completely out of the program and try again.  Do not 
   take a back-up while exiting, as if the problem persists, you
   will need to restore the company file.

Company Special Options - Error Message:
   "Error 301: Read error on VEN"

   This error message indicates that the company you selected on
   the previous "Company Information" window could not be read.
   Exit completely out of the program and try again.  Do not take
   a back-up while exiting.  If the problem persists, restore
   the company file.

Company Summary Information - Error Message:
   "Error 401: Read error on VEN"

   This error message indicates that the company you selected on
   the previous "Company Information" window could not be read.
   Exit completely out of the program and try again.  Do not take
   a back-up while exiting.  If the problem persists, restore
   the company file.

Pay Bills - Error Messages:
   "Error 501: Read error on VEN"
   "Error 502: Read error on CAT"

   These error messages indicate that the company or catagory 
   you selected from the list box could not be read.  Since this
   is a memory resident window, exit completely out of the 
   program and try again.  Do not take a back-up while exiting.
   If the problem persists, restore the company file (VEN) or
   catagory file (CAT). 

Select Bills to Pay - Error Message:
   "Error 601: Read error on VOU"

   This error message indicates that the bill you selected in the 
   list box could not be read.  Exit completely out of the program 
   and try again.  Do not take a back-up while exiting.  If the 
   problem persists, restore the bill file.

Change a Bill - Error Message:
   "Error 701: Read error on VEN"

   This error message indicates that the company for the bill you 
   are changing has been deleted.  Probably the company file
   was restored without restoring the bill file.  To correct this 
   error, delete the incorrect bill, then re-enter both the 
   company and bill.  If the problem persists, restore all 
   files. 

   "Error 702: Read error on CAT"

   This error message indicates that the catagory for the bill you 
   are changing has been deleted.  Probably the catagory file 
   was restored without restoring the bill file, or a catagory was
   deleted with outstanding bills.  To correct this error, delete
   the incorrect bill, then re-enter it.  If the problem persists,
   restore all files. 

Print Checks - Error Message:
   "Error 801: Read error on FRM"
   
   This error message indicates that the check form record could
   not be read.  Exit completely out of the program and try again.
   Do not take a back-up while exiting.  If the problem persists,
   restore the form file.
  
Check Form Setup - Error Message:
   "Error 901: Read error on FRM"
   
   This error message indicates that the check form record could
   not be read.  Exit completely out of the program and try again.
   Do not take a back-up while exiting.  If the problem persists,
   restore the form file.

Catagory Information - Error Message:
   "Error 1001: Delete error on CAT"

   This error message indicates the catagory you selected to delete
   could not be read.  Since this is a memory resident window,
   exit completely out of the program and try again.  Do not 
   take a back-up while exiting, as if the problem persists, you
   will need to restore the catagory file.

Bank Account Information - Error Message:
   "Error 1101: Read error on BNK"

   This error message indicates the bank you selected to delete
   could not be read.  Since this is a memory resident window,
   exit completely out of the program and try again.  Do not 
   take a back-up while exiting, as if the problem persists, you
   will need to restore the bank file.

Check Register - Error Message:
   "Error 1201: Read error on HST"

   This error message indicates the check you selected in the 
   list box could not be read.  Since this is a memory resident 
   window, exit completely out of the program and try again.  Do
   not take a back-up while exiting, as if the problem persists,
   you will need to restore the history file.

Enter a Check - Error Message:
   "Error 1801: Read error on CAT"
   
   This error message indicates that the catagory you selected in 
   the list box could not be read.  Exit completely out of the 
   program and try again.  Do not take a back-up while exiting.  
   If the problem persists, restore the catagory file.

Enter a Withdrawl - Error Message:
   "Error 2001: Read error on CAT"
   
   This error message indicates that the catagory you selected in 
   the list box could not be read.  Exit completely out of the 
   program and try again.  Do not take a back-up while exiting.  
   If the problem persists, restore the catagory file.

The Bill Drawer - Main Menu - Error Message:
   "Error 9001: Read error on BNK"

   This error message indicates the bank you selected in the list 
   box could not be read.  Since this is a memory resident window,
   exit completely out of the program and try again.  Do not 
   take a back-up while exiting, as if the problem persists, you
   will need to restore the bank file.

General File Errors: 
   "Error 9901: Index capacity exceeded on VEN"
   You have exceeded the capacity to store companies in the file
   index.  Presently, 200 companies are supported.

   "Error 9902: Delete error on VEN"
   The company name could not be found in the file index.
   Restore the company file.

   "Error 9903: Index capacity exceeded on VOU"
   You have exceeded the capacity to store bills in the file
   index.  Presently, 500 unpaid bills are supported.

   "Error 9904: Delete error on VOU"
   The internal record number could not be found in the file 
   index.  Restore the bill file.

   "Error 9905: Delete error on CAT"
   The catagory name could not be found in the file index.
   Restore the catagory file.

   "Error 9906: Index capacity exceeded on CAT"
   You have exceeded the capacity to store catagories in the file
   index.  Presently, 50 catagories are supported.

   "Error 9907: Help text file not found"
   The requested help text file, DOS extension ".HLP", could
   not be found.  Perhaps they were deleted, or not copied to 
   the current directory.  Restore them from the install diskette.

   "Error 9908: Seek error on VEN"
   The company internal record number is incorrect, according to the
   file index.  Restore the company file.
 
   "Error 9909: Seek error on CAT"
   The catagory internal record number is incorrect, according to the
   file index.  Restore the catagory file.

Restoring Files:
   The bill file contains pointers to the associated company and 
   catagory files.  Do not restore the company and catagory files,
   without also restoring the bill file.

   The history file contains a pointer to the bank file.  Do not 
   restore the history file, without also restoring the bank file.

   The safest approach is to always back-up and restore all files
   together.
   
