             Welcome to G1EMM's little old TCP/IP system.
             --------------------------------------------

    The KA9Q Tcp/Ip networking software currently running on this system
is NOS 901029(G1EMM ver.1.1). The machine in use is an Acorn  Archimedes
running the PC Emulator V1.33 and has a pair of 720kb floppies on it.

    Any problems detected should be mailed to  bugs@g1emm.ampr.org.

If  you  wish to obtain a copy of this version of the tcp/ip  networking
software,   then  contact  me  either by SMTP  mail  using  the  address
"g1emm@g1emm.ampr.org", or mail using the PBBS network using the address
"g1emm@gb3xp" from your own local BBS station.
