UTC:
6
HOURS FROM UTC
Enter the time offset in hours from your computer's clock
to UTC.  UTC is used for all logging functions.

F1  - Display this help screen.
F10 - Exit program.
SCALL:
5
STATION CALL
Enter the call used by your contest station.

F1  - Display this help screen.
F10 - Exit program.
SGRID:
7
STATION GRID
Enter the grid square you are operating from.  This
information will be used in calculating direction and
distance to other grids and is saved with each log entry.

F1  - Display this help screen.
F10 - Exit program.
SSTATE:
6
STATION STATE
Enter the state you are operating from.  This information
is saved with each log entry.

F1  - Display this help screen.
F10 - Exit program.
LOGKEYS:
11

F1  - Display this help screen.
F2  - To chose, then edit or delete a previous log entry.
F3  - Select new map grid for display.
F4  - Compute direction & distance to target grid.
F5  - Schedule contacts entry.
F6  - Show QSOs for a call.
F7  - Show QSOs for a grid not contacted in current grid.
F8  - Set XMIT speed.
F9  - Send CW from keyboard.
F10 - Exit program.
ALOGKEYS:
9

ALT F1  - Display this help screen.
ALT F2  - Enter new station grid.
ALT F3  - Toggle printing of log entries.
ALT F4  - Toggle keeping backup of log entries on diskette.
ALT F5  - Enter code to store in functions keys.
ALT F6  - Toggle between score for current grid and total
          for all grids.
ALT F10 - Shell to DOS
CBAND:
6
BAND
Enter the letter associated with the band you are working.
The definition of the letters is on the scoreboard.  The 
default will be the last band worked.  To accept the default
press <ENTER>.
:?LOGKEYS
CMODE:
4
MODE
Push space to toggle between transmit modes (AM,FM,CW,SSB)
Push <ENTER> to accept.
:?LOGKEYS
CCALL:
3
CALL
Enter the call of the station you are working.
:?LOGKEYS
CDATE:
5
Edit Date
The contact's original date has been filled in by the
computer.  To accept this date, press <ENTER>.  To change
the date, type in the new date for the contact.
:?LOGKEYS
CTIME:
5
Edit Time
The contact's original time has been filled in by the
computer.  To accept this time, press <ENTER>.  To change
the time, type in the new time for the contact in UTC.
:?LOGKEYS
CGRID:
3
GRID
Enter the grid square of the station you are working.
:?LOGKEYS
SCHKEYS:
4

F1  - Display this help screen.
F2  - To chose, then edit or delete a previous schedule.
ESC - End schedule entry.
SCFREQ:
5
FREQUENCY
Enter the frequency for the scheduled contact you are
entering.  The entry is not validated and any frequency
may be entered or none at all.
:SCHKEYS
SCCALL:
5
CALL
Enter the call of the station you are setting up the
schedule with.  The call sign is not validated and any
ten character message may be entered
:SCHKEYS
SCDATE:
6
DATE
The computer has filled in the current date.  To accept
this date as the date of the scheduled contact, press
<ENTER>, otherwise enter the date for the schedule
in MMDDYY format.
:SCHKEYS
SCTIME:
7
TIME
The computer has filled in the current time.  Since you
are schedulling contacts in the future, you need to enter
the time for the schedule.  The program will alert you
15 minutes, 10 minutes, 5 minutes and 1 minute before the
scheduled time.
:SCHKEYS
SCGRID:
4
GRID
Enter the grid square of the station you are scheduling.
This field is validated, however a blank entry is valid.
:SCHKEYS
MAPKEYS:
3

F1  - Display this help screen.
ESC - Return to map scroll.
MGRID:
4
GRID
Enter the two letter prefix for the grid map you want
to have displayed.
:MAPKEYS
MBAND:
5
BAND
Enter the letter associated with the band you would like
to have displayed on the map.  The definition of the 
letters are on the scoreboard.
:MAPKEYS
OGRID:
4
Compare Grid
Enter the grid you want to compare your current grid to.
Push <ENTER> to accept the default.
:MAPKEYS
MMAP:
11
Scroll Grid Map with arrows
Use the four arrow keys to scroll the Grid Map one grid
square at a time. Use PG-UP & PG-DN to change the Band that
is displayed.  Push ½ RETURN to save map change and return
to logging section.

F1  - Display this help screen.
F2  - Enter grid & band to display.
F3  - Enter grid to compare current grid to.
F4  - Toggle between current grid & compare grid.
ESC - Abort map change.
TGRID:
6
Target Grid
Enter the grid square you would like to calculate the
direction and distance to.

F1  - Display this help screen.
ESC - Abort calculation entry.
LEDIT:
11
Pick the log entry to edit
Move the highlight bar up or down using the arrow keys
or the PG UP, PG DN keys to highlight the entry you
wish to edit or delete.
Once the correct entry is highlighted, press F2 or F3.

F1  - Display this help screen.
F2  - Move the entry into the logging section for editing.
      (Not enabled in demo version)
F3  - Delete the entry. (Not enabled in demo version)
ESC - Abort log editing.
SEDIT:
10
Pick the schedule entry to edit
Move the highlight bar up or down using the arrow keys
or the PG UP, PG DN keys to highlight the entry you
wish to edit or delete.
Once the correct entry is highlighted, press F2 or F3.

F1  - Display this help screen.
F2  - Move the entry into the schedule section for editing.
F3  - Delete the entry.
ESC - Abort schedule editing.
QCALL:
8
CALL
Enter call of the station you want to display QSOs for.
If there aren't any QSOs for the call entered the QSO
display is aborted, else the first page of QSOs are
displayed.

F1  - Display this help screen.
ESC - Abort QSO display.
DQSO:
6
Display QSOs for a Call
Use the PG UP & PG DN keys to see all the
QSOs for the entered call.

F1  - Display this help screen.
ESC - End QSO display.
SPEED:
8
CW XMIT Speed
Enter CW XMIT speed in the form XXYY, where XX is the
code speed and YY is the code weight.
Ex. 0513 would send characters at 13 WPM with a spacing
of 5WPM.

F1  - Display this help screen.
ESC - Abort CW speed change.
EFKEY:
15
Enter and edit function key text
Enter up to 3 lines of text to store in a function key for
later CW transmition. There are also text strings that are
replaced with call & grid information at XMIT time.
The replaceable text strings are:
  :1 - Your Station Call
  :2 - Your Station Grid
  :3 - Contacts Call
  :4 - Contacts Grid
To send text string push & hold the CTRL key and then the
desired function key from the logging section.

F1  - Display this help screen.
F2  - Edit previously entered function key text.
ESC - Abort function key entry.
EDESC:
8
Function key description
Enter the 6 character description for the text string.
The description for each text string will be displayed
when the CTRL key is pushed.

F1  - Display this help screen.
F2  - Edit previously entered function key text.
ESC - Abort function key entry.
NGRID:
7
NEW STATION GRID
Enter the new grid square you are operating from.  This
information will be used in calculating direction and
distance to other grids.

F1  - Display this help screen.
ESC - Abort change of station grid.
NSTATE:
6
NEW STATION STATE
Enter the new state you are operating from.  This
information is saved with each log entry.

F1  - Display this help screen.
ESC - Abort change of station grid.
QGRID:
7
GRID
Enter a previous station grid to display unworked QSOs
for. This will show all QSOs from the grid entered that
have not been worked in the current station grid.

F1  - Display this help screen.
ESC - Abort QSO display.
DGRID:
6
Display QSOs not worked from previous station grid
Use the PG UP & PG DN keys to see all the
QSOs not worked for the grid entered.

F1  - Display this help screen.
ESC - End QSO display.
NONE:
2
NO HELP
               There is no help available!
