The R command is used to read messages that appear when you do a L command
After the letter R and a space you should enter the number of the msg
to read. To see the complete forwarding information use RH in place of R.
The command RM can be used to read all unread mail addressed to you.
You may also give more than one msg # to read:      R 1424 2876 3210
If you have used the X command to set your lines per screen size, when
you get the message "More?", you can reply N to stop at that point, C
to display the rest of the message without any more pauses, or Y to continue
to the next pause (as determined by the value you set for X).
You may also type any command at the prompt which will terminate the Read
and then do the command (command can't start with C, N or Y).
RN msg#'s  can be used to read text of messages only (no header info at all).
#RS can be used to read all messages to SYSOP (sysop only).
#RE Reads given msg(s) and displays them in export format
