
                        SUBPROGRAM RPCHECK

This program helps in applying the Maxim filter products which are
programmed using resistors, MAX265/266.

The companion subprogram RP calculates the resistor set needed to
perform a specific filter function. This program is the complement of RP.
Given an operating mode and a set of resistors RPCHECK calculates the
performance of the filter stage.

This program is useful in checking the sensitivity of a design to resistor
tolerances.
***

                           PROGRAM OUTPUT

After all the data has been entered the program calculates the performance
and the result appear on the screen. There is an opportunity to
print this data if a printer is attached. The same data is automatically sent
to a disk files:

           First design: CHECK1.R
           Second design: CHECK2.R, etc.

***
