O <comand> DOS Gateway                 H           Display this Help Screen
R <file>   Read ASCII file             RP <file>   Read a Program file
W <file>   Write ASCII file            WP <file>   Write a Program file
V <file>   View ASCII file             E  <file>   Edit a ASCII file
CL [1,2,3] Clear window 1, 2 or 3      VE          Show Baycom Version & Data
MY <call>  Set your callsign           DC <call>   Digipeat Callsign
CT <text>  Connect text to be sent     BT <text>   Beacon text to be sent
D          Disconnect                  Q           Disconnect but wait ACK
MAX <n>    Set maximum frames          PAC <n>     Maximum Packet length
TX  <n>    Tx delay time               BE <n>      Beacon timer set above 180
DW  <n>    Digipeat wait time          TI <n>      Info Timer
RET <n>    Max number of retries       IP <n>      Set IPoll time
FR  <n>    Frame ACK time              RESPT <n>   Responce timer setting
LINKT <n>  Link timeout setting        TQ <n>      Set maximum Quit timer
C  <call> [<digipeater>]     Issue a connect request :C CALL or C: CALL v CALL2
MH <option>                  MHEARD List (Option * = 30min  # = Data or CALL)

Keyboard:
PAGE UP/DN Scroll up or down           F9      Toggle cursor to TX/RX/Monitor
CTRL-PAGE UP/DN Move Mon/RX divide     CTRL-HOME/END Move TX/RX Divide
ALT-X     Exit from program.           F1..F8/F10  Port Switch
SHIFT-TAB  Stop Toggle                 ESC         Command mode toggle
