ask_for_usdir   80



80
This entry should contain a complete DOS path to your
MicroStation directory. It should have the following format:

drive:\directory

Type or edit the DOS path using the keys indicated at the
bottom of your screen, then press <Enter> to accept.

The installation program assumes that the source files are to
be copied there from the default directory. (i.e., the drive
and directory where you initiated this installation.)
Normally this would be your floppy diskette drive A:

Press <Esc> to abort the driver installation.



-1


