                    GENERAL HELP 

From the main menu you may press the horizontal arrow 
keys to move the highlighted menu bar to the main menu 
selection you desire.  Each main menu selection has a 
number of menu options which may be selected by using 
the up and down arrow keys.  Once you have selected the 
menu option you desire, press the [Enter] key to choose 
the selection.  Pressing the [Esc] key at the main menu 
will select the "EXIT to DOS" selection.  Pressing the 
[Enter] key at this point will leave QAPlus. 

Certain monochrome screens (i.e. laptops) emulate color 
as shades of gray.  The highlight may not be visible on 
these monitors.  If you cannot see a highlighted menu 
bar after the startup Hardware Configuration check has 
been completed and you have pressed [Esc] at the prompt: 
press the Right Arrow key once, followed by the Up Arrow 
key two times, followed by the [Enter] key, and then 
the Up Arrow key followed by the [Enter] key to select 
"Color Off".  This should make the highlight visible. 

The "Press any key" message is shown when the program 
pauses to permit you to view information.  After you 
have viewed the information, pressing any key except the 
[Shift], [Caps Lock], [Alt], or [Ctrl] keys will let the 
program continue. 

Pressing the [Esc] key at any point other than within 
the main menu will cause the program to halt what it was 
doing and return you to the previous screen.  If the 
[Esc] key is pressed while the program is busy 
performing tests or printing, it may take a moment 
before it recognizes the [Esc] request. 


                      *** END *** 

