** File: TPSheet8.hlp
** Index: 28

** Sheet View's Window Menu Commands


Û  Window menu

    The Window Menu contains window
management commands.  At the bottom of the
Window Menu, the Mouse command is listed.


Û  Previous

    Choose this command to make the
previous window (the last active window)
active, which makes it the topmost open
window.


Û  Next

    Choose this command to make the next
window active, which makes it the topmost
open window.


Û  Close

    Choose this command to close the active
window.  You can also click on the close
box in the upper left corner of the window
to close a window.


Û  List

    Choose this command to get a list of
all open windows.  The list contains all
files that are currently open.  The active
window appears on the top of the list.
When you select a file and click OK,
TechPlot will bring the window to the front
and make it active.


Û  Mouse

    Choose this command to change the
sensitivity of mouse.  It displays the
Mouse dialog box.  You can change the speed
of the mouse response in this dialog box.
