** File: TPPlot9.hlp
** Index: 39

** Plot View's Window & Help Menu commands


Û  Window menu

    The Window Menu contains window
management commands.  At the bottom of the
Window Menu, the Mouse command is listed.


Û  Previous

    Choose this command to make the
previous window (the last active window)
active, which makes it the topmost open
window.


Û  Next

    Choose this command to make the next
window active, which makes it the topmost
open window.


Û  Close

    Choose this command to close the active
window.  You can also click on the close
box in the upper left corner of the window
to close a window.


Û  List

    Choose this command to get a list of
all open windows.  The list contains all
files that are currently open.  The active
window appears on the top of the list.
When you select a file and click OK,
TechPlot will bring the window to the front
and make it active.


Û  Mouse

    Choose this command to change the
sensitivity of mouse.  It displays the
Mouse dialog box.  You can change the speed
of the mouse response in this dialog box.


Û  Help menu

    This menu contains Help commands
that gives you on-line help.  The
user interaction is the same as
described in the Base View Reference
section.


Û  Index

    This command opens the TechPlot Help
dialog box with the tpindex.hlp in the 
Viewer.  The tpindex.hlp contains a full 
list of help topics.  Each topic has a 
unique index which corresponds to a help 
file.  You can type in a proper index in
the Current Index field and click on the
View button to view that help topic.


Û  Keyboard

    Keyboard related help information:
Hot keys and short cuts.


Û  About

    This command displays a dialog box
that shows the copyright and version 
information for TechPlot.  Press <ESC> or
click OK button to close the dialog box.

