** File: TPPlot8.hlp
** Index: 38

** Plot View's FuncPlot Menu commands


Û  FuncPlot menu

    This menu contains commands that
creates new graphs or add plots to a
select graph.  The new graph is created
by a user-defined function inputted via a
dialog box.


Û  XY Curve

    The FuncPlot | XY Curve command lets
you create an XY curve graph.


Û  Polar Curve

    The FuncPlot | Polar Curve command
lets you create a Polar curve graph.


Û  Smith Curve

    The FuncPlot | Smith Curve command lets
you create a Smith curve graph.


Û  3D Curve

    The FuncPlot | 3D Curve command lets
you create a 3D curve graph.


Û  XYZ Surface

    The FuncPlot | 3D XYZ Surface command
lets you create a 3D Cartesian surface.


Û  Sphere Surface

    The FuncPlot | 3D Sphere Surface command
lets you create a 3D Spherical surface.


Û  Cylinder Surface

    The FuncPlot | 3D Cylinder Surface
command lets you create a 3D Cylindrical
surface.
