** File: TPPlot6.hlp
** Index: 36

** Plot View's Option Menu commands


Û  Option menu

    The Option menu contains commands that
change the plot editing options, change
axes options, and add quality control
lines.


Û  Auto Redraw

    The Option | Auto Redraw command lets
you turn the auto redraw option on / off.
If the auto redraw option is on, there is
a '>' mark on the left side of the menu
command and the Plot View client area is
redrawn each time when you finish a plot
editing action.


Û  Auto Pick

    The Option | Auto Pick command lets
you turn the auto pick option on / off.
If the auto pick option is on, there is a
'>' mark on the left side of the menu
command and the tool is automatically set
to the pick tool each time after you used
the plot edit tools.


Û  Group

    The Option | Group command lets you
group a set of plot objects together.
Once plot objects are grouped, you can
treat them as one object, then you may
move, resize the grouped object.


Û  UnGroup

    The Option | UnGroup command lets you
ungroup a grouped object.  After a grouped
object is ungrouped, they are independent
objects again.  You may then move or
resize them individually.


Û  Add Axis

    The Option | Add Axis command lets you
add an axis to a selected 2D rectangular
graph.


Û  Hide Axis

    The Option | Hide Axis command lets
you hide a selected axis.  Once an axis
is hidden, it will not be shown on the
graph.  You may then use the Show Axis
command to make it shown.


Û  Show Axis

    The Option | Show Axis command lets
you show all hidden axes.


Û  Switch Axis

    The Option | Switch Axis command lets
you change the axis of a curve.  You must
select a curve first before you invoke
this command.


Û  Add QC Line

    The Option | Add QC Line command lets
you add quality control lines to a 2D
rectangular graph.


