** File: TPHLPHLP.hlp
** Index: 2

*** Help on Using TechPlot Help ***


Û  How to use TechPlot help system

    The Help Menu gives you access to the
TechPlot on-line help system in a special
dialog box.

    To open the TechPlot Help dialog box,
do one of the following actions:

    ú Press <F1> at any time except from
      a dialog box or when a menu command
      is selected.

    ú Choose one of the command under the
      Help Menu, except About command.

    To close the TechPlot Help dialog box,
press <ESC> or click the Done button in
the dialog box.

    The TechPlot Help dialog box contains
several buttons and an inputline.

  File Viewer:  This is the area that
    displays the help file text.  You can
    use up and down arrow keys or
    <Page Up> and <Page Dn> keys to scroll
    the text in the File Viewer.

  Index Button:  Click this button to
    display the TechPlot help index list
    file which contains a full list of
    help topics.

  Previous Button:  Click this button to
    display the help file which has the
    index preceding the current index.
    For example, if the current index is
    5, then the previous index is 4.
    The index of the TechPlot Index file
    is 0.

  Next Button:  Click this button to
    display the help file which has the
    index one greater than the current
    index.

  Topic Button:  Click this button to
    display the TechPlot help topic list
    file which contains a full list of
    help topics.

  Current Index:  This inputline has two
    functions:
      1) it displays the current topic
         index;
      2) it can be used as the input for
         a special index request by the
         user.

  View Button:  Click this button to view
    the help topic that has the index
    shown in the Current Index inputline.

  Done Button:  Click this button to close
    the TechPlot Help dialog box.
