** File: Base6.hlp
** Index: 16

** TechPlot Interface Basic (6)


Û Window management

    The following table shows a quick
rundown of GraphVision window management.

  þ Open a window:  Choose New or Open
    command from the File Menu or press
    <F3>.

  þ Close a window:  Choose Window|Close
    command, or click the close box of
    the window.

  þ Activate a window:  Click anywhere in
    the window, or choose Window | List and
    select the window from the list or
    choose the Window | Next or Window |
    Previous to make the next or previous
    window active.

  þ Move a window:  Drag the title bar of
    the window, or choose Window | Move and
    use arrow keys to place the window
    where you want it then press <Enter>.

  þ Resize a window:  Drag any corner, or
    choose Window | Size and press the
    arrow keys to resize the window then
    press <Enter>.

  þ Zoom a window:  Click the zoom box or
    choose Window | Zoom.

  þ Minimize a window:  Click the minimize
    box or choose Window | Minimize
    command.
