                           Choosing a Password
To use some of the function on this BBS you will need a password.  You
will be given a opportunity to choose a password when you log off.  Your
password can not be longer than 8 letters, numbers, _ (underline), or
combination there of.  Sample of acceptable passwords are: JOHNSMIT ,
JOHN8544 , cool_guy , and so on.  Upper and lower case do not matter.

It is important that you remember your password, as well as the name you
logged on with.  Your logon name must be the same each time.  If you
logged the first time as John Smith and choose the password JOHNSMIT, you
must logon with you name a s John Smith and use the password Johnsmit
(again upper and lower case do not matter).

If you forget your password or logon name, logon using NEW as your
password and use Feedback to sysop to explain you forgot your password and
leave it there.  Also when you logoff leave the password there also.  Leave
a phone number in case there is a problem with your password.

If you choose a password before and can't logon, try logging on as NEW
and be sure to leave your phone and name either in feedback or when
choosing a password.  This way the SYSOP can clear up any problems.
