                      General Help and Guidelines

This is a Mini BBS and not a full featured BBS.  There are limited
Mail functions, including send and recieve.  To use the mail you must
first choose a password and wait until the Sysop validates that password.
Once you have been validated your name will be given to the mailperson
so that you can be given a mailbox.  

If you wish to choose a password you will be given the opportunity to
do so when you log off.  You password can be only a combination of eight
letters, numbers, and the _ key.  Such as _JON_DOE.

All functions will "time out" in specific periods of time.  If no input is  
recieved before the time alloted then Mini BBS will proceed.  If no input is 
received at all Mini BBS will time out and hang up.  Input not finished before
the timeout will be sent incomplete.  Usually more than enough time is alloted.
If asked for input, please be careful to input the correct response.  If asked
for a full word, enter the word.  If asked for a letter enter only that letter.
Return for Help Menu.
