DEFINITION MODULE mdgenerallib;

(*      This is a general library of procedures that I like and use in    *)
(* in various ways.  Nothing special about the grouping other than that   *)
(* they are things that I personally think are useful.                    *)
(*         - MD                                                           *)


(*********************************************************)

PROCEDURE MyPause (time : CARDINAL);
        (* Pauses for number of seconds input *)

(********************************************************)

PROCEDURE RealRandom () : REAL;
        (* Returns a random number in the range [0, 1). *)

(********************************************************)

END mdgenerallib.
