

                   Move The Current file to Another Directory

   If you click the YES gadget, the listed file will be moved to another
directory. You will select the destination of the move via the Directory
Selection Requester. The destination directory must be on the same device
and partition as the current directory, because the AmigaDos Rename function
is used to accomplish the move. To Move to a different device or partition
you must use the Copy function, and then use the Delete function to remove
the old file.

   If you click the NO or CANCEL gadgets this operation will be aborted.


