

     Move the Entire Current Directory to Another Directory

   If you click the YES gadget, the current directory and its entire
sub-tree will be moved to another directory. You will select the
destination of the move via the Directory Selection Requester. The
destination directory must be on the same device and partition as the
current directory, because the AmigaDos Rename function is used to
accomplish the move. To Move to a different device or partition you
must use the Copy Tree function, and then use the Prune Tree function
to remove the old Directory Tree.

   If you click the NO or CANCEL gadgets this operation will be aborted.


