                       Make a New Directory

   You may enter the name of a directory that will be created under the
current directory.A the name may be up to 30 characters long.

   When you have entered your name , click the OK gadget. If you want
to abort the creation, click CANCEL. You may also choose a name from
the history list by clicking on it. Any new strings you enter are saved in
the history list until the list contains 10 items. Then the least recently
used used item will be deleted to make room. You can make a frequently used
item permanent in the history list by clicking the STICKY gadget when the
history cursor is on it. An at sign (@) appears in front of any item that
has been stuck. To release a stuck item, click the STICKY gadget again.

