                      View and change File Comment

    You can change the comment assciated with a file. When the window opens,
the current comment(if any)  is displayed in the string gadget. you may edit
the text in this gadget. A comment may contain up to 80 characters. When
the comment is correct, click the UPDATE gadget to write it to disk. If you
decide not to change the comment click the CANCEL gadget.
