##base SimpleBase *the name of our base used by C glue code and C PRAGMAS
##name simple     *the name of our library (i.e. simple.library)
##vers 1          *version #
##revs 0          *revision #
##libid simple asm lib (ver 1.0)
##bias 30         *first function is always at an offset of -30 from lib base
*Here are all of the lib functions callable by an application
*These 3 return ULONG
##ret ULONG
Add2Numbers(num1,num2)(D0,D1)
Sub2Numbers(num1,num2)(D0,D1)
Mult2Numbers(num1,num2)(D0,D1)
##end
