DEFINITION MODULE MyScreen;
(*
This module initializes the window and screen for
use by any program.

Created: 5/24/86 by Richie Bielak

Modified: 08/Feb/88 by Garth Thornton
          It's more versatile with IDCMPFlags global so i can use it
          for more progs without recompiling.

Copyright (c) 1986 by Richard Bielak

This program maybe freely copied. But please
leave my name in. Thanks.....Richie

*)
FROM Intuition IMPORT WindowPtr, ScreenPtr, IDCMPFlagSet;
FROM Views IMPORT ModeSet;

  PROCEDURE SetUpScreen (VAR wp : WindowPtr;
                         VAR sp : ScreenPtr;
                         width, height, depth : INTEGER;
                         modes : ModeSet );

  VAR  MyIDCMPFlagSet : IDCMPFlagSet;

END MyScreen.

