##base ComplexBase *the name of our base used by C glue code and C PRAGMAS
##name complex     *the name of our library (i.e. simple.library)
##vers 1           *version #
##revs 0           *revision #
##open OpenUp      *to be called for each app that opens the lib
##clos CloseUp     *to be called for each app that closes the lib
##libid complex asm lib (ver 1.0)
##bias 30         *first function is always at an offset of -30 from lib base
*Here are all of the lib functions callable by an application
##ret struct Window *
MakeWindow()
##ret void
PrintMsg(x,y,window,msg)(D0,D1,A0,A1)
RemWindow(window)(A0)
##end
