It is probably a good idea to change your password every so often.  To do
this, select PASS at the main menu.  As an added measure of security, you
will be asked to enter your current password.  Then, you will be able to enter
a new password.  If you simply hit RETURN, your password will remain unchanged.
Otherwise, your password will be changed.
