News Archive Index
WinNews (tm) - The Monthly PC/Mac News Archive

Prepared & Distributed by:  Baker Enterprises

Assorted press releases  and news articles are available by subject heading in the topic areas shown below or use SEARCH  to find articles listed by company names.

SOFTWARE:	HARDWARE:

Business & Productivity  	PC Systems

Professional/Engineering  	Expansion Products

Personal & Educational  	Peripherals

Games & Entertainment  	Macintosh Specific

System Software & Utilities  	Miscellaneous Hardware

Macintosh Specific

Miscellaneous Software  	GENERAL INTEREST:

Books & Publications

Miscellaneous News

Ordering WinNews

PC Industry Database


About Press Releases
Full Text Press Releases...

Press Releases are distributed electronically with 100% of the entire text included as supplied by the company. Most material is available via the online news areas on America Online and Delphi within several days of receipt. News archives such as this are created at the end of every month. For additional information concerning any product or service mentioned, please contact the company directly. Check the end of the article for the company's mailing address and/or telephone numbers.

Note that additional Backgrounder reports may be available for downloading from our Information Download Libraries on America Online and Delphi.


About SEARCH Capabilities
Using SEARCH to Find Articles by Company Name...

1)	Click on the SEARCH button to see a list of companies referenced

within the various news articles included in the news archive.

2)	Select the desired company from the list, then click on the Show Topics

button (or double click on the company name) to see a list of relevant

articles for that company.

3)	Select an article of interest and click on the Goto button

(or double click on the article title) to display the article text.


About Baker Enterprises
About Baker Enterprises...

Baker Enterprises electronically distributes PC & Macintosh related news and full text press releases  via our New Product Information Service on America Online (Keyword=New Product) and Delphi (GO NEWS PRODUCTS). Monthly news archives such as this are created at the end of each month and include all news processed during the previous month. Besides this Windows-compatible format, the same information is also available in a PKZIP collection of standard ASCII text files with a simple index, but requires your own text file utilities to read. News archive files are available from a download library on AOL, Delphi, and selected Internet archive sites, or direct via mail from Baker Enterprises.

Baker Enterprises also maintains a reference database listing companies and products from throughout the PC industry. The database appears as an online searchable database via America Online in the PC Vendors Database within our New Product Information area. The same data is also distributed monthly on diskette by EMS Professional Software.

Ordering WinNews

PC Industry Database


Ordering WinNews
Ordering WinNews...

News archives are available in either this WinNews format for Windows users, or optionally in a PKZIP collection of standard ASCII text files with a simple index that requires your own utilities to read. A one year subscription for either format, mailed on 3.5" 720K diskettes, is $60 for first class mail within the USA, $75 elsewhere via AirMail. Single copies are $5 postpaid. NJ orders include 6% sales tax. This material MAY NOT be redistributed for profit without obtaining prior written permission from Baker Enterprises. Contact us direct for more information.

All correspondence, including news submissions for FREE distribution  or orders for the monthly news archives, should be addressed to:

BAKER ENTERPRISES

20 Ferro Drive	(609) 582-9203   Voice

Sewell, NJ 08080 USA	(609) 582-9204   Fax

Electronic Mail (including news submissions) may be addressed to:

RBakerPC@delphi.com	(Internet)

RBakerPC	(AOL/Delphi)


Free Distribution
FREE News Distribution...

Our services are provided at no cost to any companies or shareware authors wishing to have their press releases distributed, or their company and product information included in our database. All submissions should be mailed, faxed or Emailed directly to Baker Enterprises. Press releases are typically processed and available nationwide within one to three days of receipt!


PC Industry Reference Database
PC Industry Reference Database...

Baker Enterprises produces a PC industry reference database that includes information on thousands of companies and authors, plus brief information on their products. More than just a software locator, the database also lists hardware, peripherals, publications, accessories, supplies, shareware and more -- just about anything and everything relating to the PC industry. Company information includes mailing addresses, telephone/fax/BBS numbers, Email addresses and more. The database is available as an online searchable database in our New Product Information area on America Online. The same data is also licensed for monthly worldwide distribution on disk and CD-ROM as the PC Products Database sold by EMS Professional Software. Individual copies on diskette are $25 plus $5 shipping within the USA (contact EMS on foreign orders).

For information on ordering copies of the PC Products Database on disk and CD-ROM, or optional quarterly and monthly subscriptions, please contact:

EMS Professional Software

4505 Buckhurst Cr.	(301) 924-3594   Voice

Olney, MD 20832 USA	(301) 963-2708   Fax


Business & Productivity Software
Business & Productivity Software News:

SYBASE Open Server 2.0

M-USA Pacioli 2000 Ver 2.0

Technical Analysis for Excel

ChartBuilder for Quest

Ready-to-Run Accounting from Intex

Phonedisk USA Quickref+ 1992 Ed.

QuickTrax TimeCard! V1.1

QuickTrax Employee RollCall! V2.3

American Airlines SalesLink Deal

ACT! for Windows Contact Mgmt

Wilson Business Abstracts Expanded

WILSONDISC Software V2.4

SYBASE & SQL Sol. Consolidation

ChiWriter 4.1 Scientific Wordproc

IdeaFisher V4.0 Shipping

Forecast!GFX for 1-2-3 & Windows

Postcard Writer w/Postnet Barcodes


Professional/Engineering Software
Professional/Engineering Software News:

AutoCAD Accelerator Software

ASG Architectural 5.0

Automated Arrythmia Analysis

Automold II Injection Mold Design

CoHort CoPlot, CoDraw & CoStat

Greenhouse Effect Experiment CD-ROM

Hydronet 4.0 Fluid Conveyance Swr

Warpage Design Principles Booklet

Auto-Board Dynamic Routing Option

AEC Productivity Guide/Catalog

PowerTools for SCHEMA


Personal & Educational Software
Personal & Educational Software News:

Darwin Multimedia CD-ROM

Micro Kitchen Companion for Windows

Visions for Windows (Astrology)

Micro Bridge Companion Update

Lifestyle Software DietPro

Physics Simulation Programs


Games & Entertainment Software
Games & Entertainment Software News:

Accolade HARDBALL III

Brief in Accolade/Sega Litigation

ORIGIN Ultima VII: The Black Gate

Conflict Korea & Carrier Strike


System Software & Utilities
System Software & Utilities News:

CLIPWKS Spreadsheet Data Transfer

USR BLAST Remote Control Add-On

Copia AccSys Database C Libraries

QEdit Named Best Pgm Editor

Letter-Art 7.0 Fonts

FasTar Math Libraries for DSP's

AdaptSNA PC-to-Host Communications

OPTIMEM Windows Memory Mgmt DLL

ISS Contact Manager System

Gupta Enhances All Key Products

KEAlink & KEAterm Comm Solutions

Baler Spreadsheet Compilers

XVT Newsletter Vol 3, #2 (Apr'92)

NetRunner LAN Remote Control Pgm

DEBUG & EDIT for Windows NT

ISICAD & Cabletron Network Mgmt Swr

Free 10NET 5.0 Starter Packs

Multi-Tech Modem Sharing Software

Power Launcher 2.0 Windows Toolbar

Microsoft Flash File System

PC-Kwik MultiPak Packages

Extrasensory Clipper Dev Libraries

PenTOPS Bundled with PenPoint OS

FileRunner File Maintenance Util

LANtastic for Netware V4.1


Macintosh Specific Software
Macintosh Specific Software News:

Sensible Grammar V2.1

Resource Library PD Color Pictures

Resource Navigator II

Instructor's ToolBox

The Diet Balancer

LanRover/L for PowerBook

PC Globe MacUSA Electronic Atlas

LANtastic Connectivity Series


Miscellaneous Software
Miscellaneous Software News:

(No entries for this newsgroup)


System Hardware
System Hardware News:

Dell Models with 50 MHz Power

Micro Express ME 486-50

Wilsondisc Workstation

AST Reduces System Prices


Expansion Hardware
Expansion Hardware News:

Datel Isolated Power Supply Board

Spectrum DSP Audio Boards

Trantor Lowers T338 MiniSCSI

Racal-Datacom Ethernet for OS/2

FreeLAN-E Ethernet Starter Kit

Md/EISA HiRes Display Boards

Dalanco Spry Model 500 DSP Board

Artisoft Sounding Board Adapter

SCRAMNET Price Reductions


Peripheral Hardware
Peripheral Hardware News:

10 New US Robotics Fax/Data Modems

USR 14.4Kbps V.32 Sportster Modem

Lexmark Peripherals for IBM

Lexmark Keyboards & Accessories

Kalok Lawsuit with Xebec

Facit T400 Thermal Printer

Kalok Hard Drive Mfg Pact

Kristal Clear Monitor Filters

DPT SCSI Performance Package

Multi-Tech 14.4Kbps Pocket Modem

Automatic Aperture Card Scanner

Facit Industrial Printer Brochure

Kalok & Xebec HDD Agreement

Lasernet ShareCard

Floptical Technology Explained

TEFAX Includes AutoFax for Windows


Macintosh Specific Hardware
Macintosh Specific Hardware News:

Tefax System with AutoFax


Miscellaneous Hardware
Miscellaneous Hardware News:

Ensoniq Personal Music Studios

ASP SNAP Printer Sharing Network

Weitek Abacus 4167 Math Chip

JetLAN/P Printer Network Adapter

CNC Easytalk Multi-Port Machine Ctl


Books & Publications
Books & Publications:

1992 Computer Industry Almanac

Assorted Que Book Titles

Recent Sams Book Titles

New Riders Networking Titles

Que & Hayden Macintosh Books

Tab/McGraw-Hill Books

Microsoft Press Books (April)

Osborne/McGraw-Hill April Books

Que, Sams, NRP & Brady Titles

TAB Books/McGraw-Hill Titles

Microsoft Pub & Apple Mac Book

EcoLinking Online Info Guide

Computer Buyer's Handbook

Osborne Windows 3.1 Books


Miscellaneous News
Miscellaneous News:

SPA PC Software Sales Report

SPA-ABM Legal Settlements

TWAIN Application Pgm Interface

CDTV Educational Packages

Entrepreneurial Excellence Award

SPA 1992 Industry Honors

SPA Raids Grand Central Cameras

1992 Sawtooth Software Conference

Corvette Mouse

COMPUEXPO Sept 21-24

US Software Sales in Japan

SPA vs Burnett Companies


10 New US Robotics Fax/Data Modems
SKOKIE, Ill. -- March 23,1992 -- U.S. Robotics today announced the addition of ten new fax/data modems to its Sportster and WorldPort product lines. The first of these products to ship will be the WorldPort Palmtop Fax/Data modem (March) and the Sportster high-speed fax products (April). All of U.S. Robotics' fax/data modems, which include 9600 bps Group III fax and data speeds ranging from 2400 bps to 14,400 bps, will be shown in April during Spring COMDEX, Booth #W2347.

"Adding fax/data modems to these popular product lines provides a strong one-vendor solution for any customer's data communications needs," said Marshall Toplansky, U.S. Robotics vice president of marketing. "Our new fax/data modem lineup gives U.S. Robotics resellers a product for every customer, including products for home office, entry-level, small business and portable use."

The new Sportster and WorldPort fax products are designed for ease of use. The included fax software is intuitive and user-friendly, even for complex operations such as sending broadcast, or group faxes, performing background operations, and sending delayed faxes with a specific date and time for transmission. The fax products include these features, plus phone books to store frequently-used phone numbers and fax groups, logs that record both incoming and outgoing faxes, and "quick fax" or "express fax" capabilities for short faxes.

What sets these fax modems apart from others is that they include U.S. Robotics-designed software, providing complete compatibility and allowing them to function seamlessly as integrated products. With the exception of the Sportster products for the Apple Macintosh, all the new fax products include fax software designed and developed by U.S. Robotics.

"We've leveraged our hardware and software design expertise to produce hardware and software that functions as one product," added Toplansky. "We've made our easy-to-use data modems into easy-to-use fax/data products."

Sportster Products

The first fax products to ship in the Sportster product line, designed for entry-level, home-office and small business customers, will be high-speed fax/data modems. Sportster fax modems, with the exception of the products designed for the Apple Macintosh, will be available in external and internal form factors, and range in price from $229 to $599. The products will include 9600 bps Group III fax capabilities, BLAST FAX software, designed and developed by U.S. Robotics, and a choice of data speeds ranging from 2400 bps to 14,400 bps (V.22bis, V.32 or V.32bis data transmission).

BLAST FAX software makes sending a fax as easy as printing a document. A document is selected with simple commands and sent via BLAST FAX's dialing directory, which allows users to pre-program frequently-used fax numbers.

With BLAST FAX, What You See Is What You Get

BLAST FAX performs advanced features not found in many fax software packages, including attribute retention, which permits users to fax a document and retain such attributes as bold type, italics, etc. Using attribute retention, users have "WYSIWYG" capabilities; the document they see onscreen will look exactly the same when faxed.

Other important features of BLAST FAX software include: background operation; delayed send capabilities; and group broadcast capabilities. Background operation enables the sending and receiving of faxes in the background while working in other applications. Delayed send allows users to prepare documents in advance, specifying a time and date for transmission. This feature reduces fax costs by allowing the user to send faxes when phone line costs are lower. Group broadcast capabilities allow the sending of multiple faxes simultaneously, each with an automatically-generated custom cover sheet.

Sportster high-speed fax modem products will ship in April; Sportster 2400 bps medium-speed fax modem products will ship in May.

Macintosh Products

U.S. Robotics' fax/data products designed for the Apple Macintosh include Macintosh-compatible FAXSTF software from STF Technologies, Inc. The Sportster 14,400 Mac&Fax has 9600 bps Group III fax capability with a 14,400 bps CCITT V.32bis data channel, and is scheduled to ship in April. The Sportster 2400 Mac&Fax has 9600 bps Group III fax capability with a 2400 bps data channel, and will ship in May. The bundled FAXSTF software includes features such as background operations, delayed send and group broadcast. The modems are priced at $599 and $329, respectively.

WorldPort Products

The WorldPort portable product line currently includes eight products, three of which have fax capabilities. The WorldPort products, widely known as the most complete portable modems, include features such as dual phone jacks, LEDs, speakers and an acoustic interface.

The WorldPort brand, which includes the world's first portable V.32 modem, now scores another coup with the fully-featured WorldPort 9696, the first portable modem to combine V.32/9600 bps data capability with send-and-receive Group III fax capability and MNP 2-5 error control and data compression. The WorldPort 9696 features 9600 bps CCITT V.32 data transmission, and with MNP 5, has a maximum effective throughput of 19,200 bps. It includes WorldPort Fax Software, and will ship May 31 for a list price of $699.

All WorldPort fax/data modems with WorldPort Fax Software include delayed send capabilities, allowing users to prepare documents in advance, specifying a time and date for transmission. WorldPort fax modem users can also send and receive faxes in the background while working in other applications, and can send group faxes, which allow the sending of multiple faxes simultaneously.

WorldPort Palmtop: Only Palmtop Modem With ASCII Fax Capability

In addition, the WorldPort line will include the new WorldPort Palmtop Fax/Data modem, a 9600 bps send-fax modem with 2400 bps data communications capabilities. Designed specifically for palmtop or hand-held computers, such as the Hewlett-Packard 95LX and the Sharp Wizard, the WorldPort Palmtop is the only palmtop modem in the world capable of sending ASCII text as a fax without using fax software.

The product bypasses the need for software by automatically converting ASCII text into fax format for transmission. Its ability to fax documents without fax software saves the palmtop's valuable memory space for other applications. The WorldPort Palmtop Fax/Data modem will ship in March, at a suggested list price of $249.

U.S. Robotics Fax Modems Provide Cost Savings

Computer-based fax has several advantages over stand-alone fax machines, including cost-savings and increased time-efficiency. According to the International Computer Facsimile Association, it takes approximately I () minutes to send a conventional document via fax (time includes printing a document, retrieving it from the printer, walking to the fax machine, feeding the document, and waiting for transmission to be completed). In contrast, sending a document via computer-based fax takes approximately one minute -- or one-tenth of the time.

"Fax has complete acceptance in the business world," added U.S. Robotics' Toplansky. "Everyone takes advantage of the simplicity and convenience of faxing. Now U.S. Robotics modems provide the added convenience of an easy-to-use, fully-functional fax machine and a high or medium-speed modem integrated in one piece of hardware."

Higher Image Quality Via Computer-Based Fax

Conventional fax machines scan documents, the primary cause of image distortion. Images sent via fax modem bypass the scanning process and are significantly clearer than traditionally-faxed documents.

U. S. Robotics, Inc., (NASDAQ: USRX) is a leading designer, manufacturer and marketer of data communications hardware and software. Product lines include the Shared Access communications resource-sharing products; Total Control modem management system for central data sites; BLAST software products for terminal emulation, file transfer and remote control; Courier modems for corporate users; WorldPort portable modems for traveling professionals; and Sportster modems for small business, home office and entry-level users. Both corporate headquarters and manufacturing operations are based in Skokie, Ill. U.S. Robotics owns and operates Miracom Technology Ltd., Slough, England, and U.S. Robotics, s.a., Lille, France. The company markets its products to business, industry, government agencies and original equipment manufacturers.

--------------------------------------------------------

                 FAX Q&A

Q: What exactly does a fax modem do?

A: A fax modem can send documents from a computer to a fax machine or to another computer connected to a fax modem. For example, a user who would normally print out a document, take it to the fax machine and wait for it to transmit can now send it right from his or her computer with a few simple commands.

Fax modems are similar in appearance to data modems, and use the same RS-232 cable to connect to the computer and RJ- 11 phone cord to connect to the phone line.

Q: How important is fax software?

A: Fax software is an integral part of the fax modem. U.S. Robotics designs and develops its own fax software to work in tandem with the fax modem hardware. The software provides many important features, such as background operations, telephone number storage, logging capabilities and others. The fax software is the interface between the user and the fax modem; thus, a well designed, easy-to-use package with an intuitive user interface is important.

Q: What advantages do fax modems have over fax machines?

A: Computer-based fax products have several important advantages over standalone fax machines.

1) Fax modems provide better image quality because documents aren't scanned as they are with standalone fax machines.

2) Fax modems are time- and money-savers. According to the International Computer Facsimile Association, it takes approximately 10 minutes to send a conventional document via fax (time includes printing a document, retrieving it from the printer, walking to the fax machine, feeding the document, and waiting for transmission to be completed). Sending a document via fax modem takes approximately one minute -- or one-tenth of the time.

3) Users of U.S. Robotics fax modems can schedule faxes to arrive at a specified date and time. T his allows users the convenience of preparing documents in advance, in addition to the ability to schedule faxes at times when phone rates are lower.

Q: Do U.S. Robotics fax modems run in the "background?"

A: Yes. U.S. Robotics fax modems support background operations. The software uses less than 60K of RAM. Users may receive faxes in the background while working in other applications. U.S. Robotics fax modems can also fax documents in the background, allowing users to go on to other tasks.

Q: Can a U.S. Robotics fax modem send graphics files?

A: Yes. BLAST FAX supports .PCX, .DCX and PCL printer formats. WorldPort Fax Software modems support .PCX graphics files. Third-party vendors provide programs, such as Hijack, that convert files to .PCX format for transmission.

Q: What printers do U.S. Robotics fax modems support?

A: U.S. Robotics fax modems provide support for Hewlett-Packard, Epson, and Diconix printers.

Q: Do I have a record of what's been sent?

A: Yes. U.S. Robotics fax modems have a "logging" capability that keeps a running log of faxes that have been sent and received.

WorldPort Portable Fax/Data Modems

==================================

Q: Can I use a U.S. Robotics fax modem with my palmtop computer?

A: Yes. The WorldPort Palmtop Fax/Data modem is designed specifically for palmtop users, and supports any handheld or portable computer with the capability to send ASCII data through its serial port. The WorldPort Palmtop is designed for use with any standard data communications software, eliminating the need for fax software and freeing disk space for other applications.

Q: How can the WorldPort Palmtop Fax/Data modem send faxes without fax software ?

A: When faxes are sent, the information must be converted to fax format, a process defined by the CCITT T.4 protocol. In most cases, the computer performs this function. However, the WorldPort Palmtop modem contains the necessary intelligence to convert an ASCII file to fax format using the T.4 protocol.

Q: What third-party applications are available for use with WorldPort fax modems?

A: Many third-party applications are available for use with the WorldPort fax modems. Products include: Windows applications; print drivers; network fax applications; and programs for use with Macintosh, OS/2, UNIX, Sun and other systems.

Q: Will WorldPort fax modems work over cellular connections?

A: The WorldPort modems are not designed for cellular use. However, they may be adapted for cellular connections with a cable available through third-party sources such as Telular, Wilmette, III., and Cell Labs, Canoga Park, Calif.

Fax Standards and Protocols

===========================

Q: What is Group III fax?

A: Group III is the CCITT protocol used in fax devices. It is a digital fax standard that defines high-speed fax transmission. It does not necessarily specify a speed, in bits per second, but a Group III fax modem can send one page of data in approximately 12-60 seconds.

Q: What is Class II? Is U.S. Robotics Class II compliant?

A: Class I and II are fax modem standards developed by the EIA/TIA (Electronics Industry Association/ Telecommunications Industry Association) that define how a computer talks to a fax modem. Using Class 1, an approved standard, the phases of a fax call are handled entirely in the computer. Class II is not an approved standard, but Class II modems allow the modem to handle these phases in conjunction with a set of fax "AT" commands from the computer. There are advantages to both Class I and Class II; one standard is not necessarily better than the other.

WorldPort fax modems have an HLF (or pseudo-Class II) interface. Sportster modems are Class I modems.

Q: What is the difference between fax classes and groups?

A: Classes are defined by the EIA/TIA, and relate to the fax modem's RS-232 interface. Groups are defined by the CCITT (Consultative Committee on International Telephone and Telegraph), an international body of technical experts responsible for developing international data communications standards. Groups specify modulation standards, encoding and compression methods and the phases of a fax call.

Q: What are the CCITT fax standards?

A: V.27ter is the CCITT protocol for 4800 bps fax, with a fallback speed of 2400 bps. V.29 is the CCITT protocol more commonly used today, providing 9600 bps faxing with 7200 bps fallback. V.21 is also a CCITT protocol, used on a low-speed channel to negotiate the fax call.


USR 14.4Kbps V.32 Sportster Modem
SKOKIE, Ill. -- March 23, 1992 -- U.S. Robotics today announced the addition of 14,400 bps products to its value-added Sportster product line. The new products include two CCITT V.32 bis data modems, the Sportster 14,400 and the Sportster 14,400/PC, priced at $519 and $475, respectively. The products are scheduled to ship in March.

"The data communications industry is moving inexorably toward high-speed standards," said Marshall Toplansky, U.S. Robotics vice president of marketing. "The small business and home office target market is realizing that the slightly higher cost of a V.32bis product can be almost immediately offset by the significant savings in phone line charges."

The new modems include complete compatibility with the CCITT V.32bis standard for 14,400 bps communication, the fastest CClTT-approved standard for dial-up modems. The Sportster 14,400 modems also support the slower CCITT data transmission standards. The products include the

CCITT V.42 and V.42bis error control and data compression standards, for a theoretical maximum throughput speed of 38,400 bps.

The Sportster 14,400/PC, an internal high-speed modem for PC-compatibles, includes Crosstalk Communicator communications software

U. S. Robotics, Inc., (NASDAQ: USRX) is a leading designer, manufacturer and marketer of data communications hardware and software. Product lines include the Shared Access communications resource sharing products; Total Control modem management system for central data sites; BLAST software products for terminal emulation, file transfer and remote control; Courier modems for corporate users; WorldPort portable modems for traveling professionals; and Sportster modems for small business, home office and entry-level users. Both corporate headquarters and manufacturing operations are based in Skokie, Ill. U.S. Robotics owns and operates Miracom Technology Ltd., Slough, England, and U.S. Robotics, s.a., Lille, France. The company markets its products to business, industry, government agencies and original equipment manufacturers.

U.S. Robotics, Inc.

8100 North McCormick Blvd. Skokie, IL 60076

708/982-5010


1992 Computer Industry Almanac
INCLINE VILLAGE, NV, March 17. 1992 - The 1992 Computer Industry Almanac is an annual reference book for and about the computer marketplace The 1992 and fifth edition is an 816-page book that is authored by two experienced computer industry observers and computer users--Egil and Karen Juliussen. The Computer Industry Almanac has hundreds of thousands of facts that summarize the whole computer industry. There are numerous directories such as:

Directories                         #Entries

Computer Companies                   2,502

Computer People                      6,018

Computer Conferences                   244

Magazines & Newspapers                 374

Newsletters & Periodicals              444

Computer Book Publishers                59

Market Research Companies              208

E-Mail & Online Services                55

Testing Companies                       41

Organizations & Associations           241

High-tech PR Companies                 186

User Groups                             88

The Almanac is filled with rankings and awards for companies, people and products. One of the most popular chapters is the salary and wealth rankings of the top computer people as well as the average salaries of computer occupations. The 1992 CIA has 82 computer market summaries ranging from PCs and workstations to X-terminals and CAD/CAM software. There are also estimates of the number of computers in use for the main industrialized countries of the world. A technology forecast focusing on mid- to late 1990s reviews the expected advances and product capabilities.

An introductory chapter reviews the structure of the computer industry and defines the computer categories from personal computers to massively parallel computers. Software, peripherals and service product categories are also explained. Additionally, there is also a history of the computer, educational statistics, employment data, computer comedy and much, much more. The Computer Industry Almanac was compiled using PCs and desktop publishing.

The 1992 Computer Industry Almanac is $45 and available directly from the authors. Computer Industry Almanac, 225 Allen Way, Incline Village, NV 89451, 702/831-2288, Fax 702/831-8610


Accolade HARDBALL III
SAN JOSE, CA - MARCH 18, 1992 - Accolade today announced plans to release Al Michaels announces HARDBALL III for IBM PC and compatible computers in time for the opening of baseball season. As the third game in the well known HardBall! series, Al Michaels Announces HARDBALL III takes baseball enthusiasts as far as they want to go in action, strategy and pure fun. Its predecessor, HardBall II, was the winner of the Software Publishers Association's Excellence in Software Award for Best Sports Program of 1989. HardBall! and HardBall II are two of the most successful baseball simulations of all time, having sold well over three quarters of a million copies.

HardBall III has many new features and improvements over its popular predecessor. The most exciting new feature is the play-by-by commentary by sportscaster Al Michaels. "We looked at what other baseball games offered as well as what our customers wanted in a baseball game and created HardBall III," states Pam Levins, the producer of the game. "We've added new features such as play-by-play commentary by Al Michaels, one of today's most well known sportscasters, as well as "team effort" play where your teammates will actually back you up during a play. The detailed graphics have been improved greatly with the use of 256 color VGA technology. If your friends own HardBall 11, Earl Weaver Baseball II or Tony La Russa's Ultimate Baseball, you can import their favorite team into HardBall III."

HardBall III is a one or two player game in which players assume the role of team manager supervising the players and controlling their performance. Play exhibition games, a complete 162 game season including an all-star game, play-offs and championship games. Keep track of upcoming games via the month-by-month on-screen calendar. Team and player statistics can be saved and printed right from the HardBall III program. Over 25 different statistical categories are available, appearing on-screen in "baseball card format." Action game fans will be thrilled with the detailed graphics and realistic player movements. As in HardBall 11, you can watch key plays again and again with the "instant replay" feature. Or create your own "highlight reel" by saving your favorite plays to disk for later viewing.

Teams can be selected from the pre-programmed library, or using the Team Editor, new players and their stats can be created, or stats for real professional players can be entered. Be creative with your teams' and players' physical characteristics -- create team logos, change the color of uniforms and caps, or choose individual faces.

Eight actual major league ballparks are featured in the game such as San Francisco, Detroit and Boston. Each ballpark has been accurately rendered to include such authentic characteristics as the correct distances to walls, and foul territories.

An add-on disk that includes the remaining 18 major league stadiums will be available at a later date.

--------------------------------------------------------

SAN JOSE, CA - MARCH 23, 1992 - Accolade, a leading publisher of entertainment software, today announced that renowned sportscaster, Al Michaels, has signed an exclusive multi-year agreement to provide play-by-play commentary in a variety of Accolade's sports simulation computer and video game products.

The first product to utilize Mr. Michaels' talents is Al Michaels Announces HardBall III, the sequel to HardBall II, voted Best Sports Program of 1989 by members of the Software Publishers Association. HardBall III is an IBM PC and compatible computer baseball simulation scheduled for release in early April. A Sega Genesis version of the game will be available later this year. HardBall III challenges both the avid baseball enthusiast and action game fan with its wide array of statistical options and endless hours of pitching, hitting and fielding.

Al Michaels has enjoyed a lively career as a sportscaster since he began broadcasting games for the Hawaii Islanders in 1968. He is widely acclaimed for his knowledge and insightful reporting as the play-by-play broadcaster on ABC's coverage of Major League Baseball. He was named national "Sportscaster cf the Year" in 1980,1983 and 1986 and also captured his second Emmy Award for Outstanding Sports Personality - Host in 1985'.

"We are very pleased to begin our long term association with Al Michaels with the debut of Al Michaels Announces HardBall III," said Alan Miller, CEO and president of Accolade. "Mr. Michaels is one of the best known and most respected sportscasters in the sports broadcasting field. We feel his expertise will add the extra realism and excitement sports fans expect in a top-of-the-line computer or video game -- the realism and excitement that have helped to build Accolade's reputation as the best in its field." Al Michaels himself added, "It's exciting to see the technical advancements being made that are bringing computer sports games closer to the real thing, and I'm looking forward to being a part of that with Accolade's prestigious line of sports simulations."

Accolade has long been known as the premiere publisher of sports simulation products covering a multitude of different sports genres. Some of Accolade's most well known and best selling products include Hardball! and Hardball II baseball simulations, the Test Drive series of driving simulations, the Jack Nicklaus series of golf simulations, and Mike Ditka Ultimate Football.


Ensoniq Personal Music Studios
Malvern PA--ENSONIQ Corp has introduced new 32 note polyphonic versions of their SQ series Personal Music Studios. The new SQ-l PLUS 32 Voice and SQ-2 32 Voice keyboards, as well as the SQ-R PLUS 32 Voice Synthesizer Sound Module all feature the addition of 11 more voices (for a total of 32) and a new extra Megabyte of 16-bit expansion waveforms. These 43 new waves cover a wide variety of sounds, including the following:

Viola Sect, Solo Violin, Nylon Guitar, Harp, Shamizen, Elec Piano 1, Elec Piano 2, Perc Organ, Mute Trumpet, Soprano Sax, Accordion, Fretles Bass, Slap Bass, Synth Bass-3, Choir, Shakuhachi, Timpani, Vibes, Full PipeOrg, Shekere, Taiko, Whistle, Shaker, Conga Slap, Triangle, Castanets, Hyoshigi, Synth Kiss, Hiphop Kick1, Syn Rimshot, Vocal Aah, Vocal Unh, Vocal Uhh, Vocal Teh, Dance Kick, Enka Kick, Long Rap Kik, Dance Snare, Hiphop Snare, Hiphop Kick2

Along with these new waves are an additional 80 programs loaded into RAM, which gives the user a total of 180 different sounds to play with. The SQ-l PLUS 32 Voice and SQ-2 32 Voice keyboards feature Dynamic Component Synthesis, with a total of 3 Megabytes of waveform data, 24-bit dynamic effects processing, and a 16-track sequencer with 8,500 note memory, expandable to 58,000 notes. The SQ-l PLUS 32 Voice has a 61-key velocity sensitive keyboard, and the SQ-2 32 Voice has a 76-key velocity and pressure sensitive keyboard. The SQ-R PLUS 32 Voice is a rackmount version of these instruments minus the sequencing capability.

Model.............   Pricing      Availability......

SQ-l PLUS 32 Voice    $1595       Late March 1992

SQ-2 32 Voice          1795       Late March 1992

SQ-R PLUS 32 Voice      995       Late March 1992

Current SQ series owners can upgrade their instrument to full 32 Voice status. For more information contact: ENSONIQ Corp, 155 Great Valley Parkway, Malvern, PA 19355, or call 1(800) 553-5151.


AutoCAD Accelerator Software
LONDONDERRY, NH -- March 23, 1992 -- Panacea Inc. announced today a licensing agreement with VideoLogic Inc., an international multimedia supplier headquartered in Cambridge, MA. Under the terms of the agreement, VideoLogic will include Panacea's DLD386Deluxe for TIGA with its recently announced Rapier 24 two page graphics processor, a $299 value for VideoLogic customers.

The Rapier 24 is a workstation-class, 24-bit true color graphics processor for PCs. Designed to run Windows, TIGA and multimedia applications, the Rapier 24 provides up to 16.7 million colors at resolutions up to 1152 x 882. The Rapier 24 brings to the PC platform unprecedented graphics performance, with processing power in excess of 1 billion pixels per second. A testament to the multimedia capabilities of the Rapier 24 is its gamma correction capability as well as NTS and PAL video output.

According to Trevor Wing, Marketing Director of VideoLogic, "The Rapier 24 represents an extremely high quality and versatile graphics processing solution for PCs. Our working with Panacea proves our commitment to serving varied needs and markets, including those graphics-intensive PC users working with AutoCAD."

Added Jake Richter, President of Panacea, "Panacea is committed to providing AutoCAD Display List Driver support for leading edge graphics platforms, and the Rapier 24 is a truly worthy AutoCAD engine. In addition, it is simply the best graphics board we've seen for accelerating Microsoft Windows in true color operation. We are very pleased to be associated with this product."

Panacea's DLD386Deluxe for TIGA produces significant performance improvements in AutoCAD, as much as 17X when redrawing, panning or zooming, typically the most time consuming tasks. The product also includes "The Big Picture", a movable and sizable "bird's eye" view of the current AutoCAD drawing with the active editing area highlighted. In addition to supporting AutoCAD Release 11 and earlier versions of AutoCAD, the DLD386Deluxe enables users to render and display images in Autodesk AutoShade 2 with RenderMan and Autodesk 3D Studio

The Rapier 24 is priced at $2995 and is available through a network of resellers and distributors in 37 countries worldwide.

The DLDDeluxe386 for TIGA, sold via retail and available directly from Panacea, is priced at $299. Versions of the DLDDeluxe386 for VGA/SuperVGA, XGA and 8514/A display adapters are available at prices ranging from $249 and $299.

VideoLogic Inc. is the leading independent, international multimedia supplier with subsidiaries and resellers in 37 countries worldwide. VideoLogic Inc.'s corporate headquarters are located at 245 First Street, Cambridge, MA 02142. Phone: 617-4940530. VideoLogic Inc.'s West Coast sales office is located at 1250 Oakmead Parkway, Suite 210, Sunnyvale, CA 94088. Phone: 408-524-2920.

Panacea Inc. is the world's leading provider of commercial and OEM display drivers and software-only applications accelerators for graphics-intensive applications. Panacea specializes in PC-based software for graphics processors and graphics boards. In addition to supporting leading SuperVGA adapters, Panacea markets products that work with the IBM 8514/A, TIGA and XGA graphics standards. Corporate headquarters are located at 24 Orchard View Drive, Suite 4, Londonderry, NH 03053. Phone: 603-437-5022.


ASG Architectural 5.0
SAUSALITO, CA.--March 18, 1992. ASG, the leading developer of integrated software applications for architects, engineers, and contractors who use AutoCAD, has released a major upgrade to its architectural design and drafting product.

ASG Architectural 5.0 is the first of ASG's AutoCAD applications to use the new power of the 5.0 series, and the upgrade takes the speed and accuracy of architectural drawing to new levels. The following new features are included:

* Automatic construction of 2-D roof plans and 3-D roof

  models

* Automatic storefront insertion

* One-step generation of schedules

* Two-way database (ASCII and DBF-compatible), for easy

  extraction, modification, and posting of data back into

  the drawing

* Enhanced Tree and People symbols, including 2-D people and

  detailed 3-D trees

* Ability to draw veneer line (for indicating cavity or

  sandwich construction), and automatic clean-up of lines

* Option to draw walls with centerlines, for easy generation

  of square footage take-offs

* Faster, easier generation of walls through new settings

  and commands, plus automatic wall hatching and dean-up

* Automatic sizing of text within space diagrams

* Faster door and window insertion

ASG Architectural users benefit from all the features of ASG Core 5.0, the foundation for the system 5.0 series. Released in January, 1992, ASG Core 5.0 is a powerful AutoCAD productivity tool and the means for integration of the ASG line. Core 5.0 gives all system 5.0 applications full AutoCAD Release 11 support, network compatibility, Metric and Imperial support, a direct link to specifications and cost estimations from within the drawing session, a layering system that conforms to layer names proposed by the American Institute of Architects, and more.

ASG's recent merger with Vertex Design Systems has created the only company in the world that offers a total solution for architects. With one system of software, they can now design, draft, detail, generate full specifications and cost estimations, and create animated presentations of any structure for clients.

ASG Architectural is the successor to AutoCAD AEC Architectural, originally developed for Autodesk, Inc. by ASG and still licensed to Autodesk in the U.K. The product became the industry-standard architectural application in the U.S. upon its return to ASG in 1989, when it was significantly improved and renamed "ASG Architectural." Version 5.0 is the first major upgrade of ASG Architectural since the transition from AutoCAD AEC, and remains the only compatible upgrade to the Autodesk product.

The product line now features 14 fully integrated architectural, structural, mechanical (HVAC and plumbing), electrical, piping, civil engineering, and modeling/rendering/animation software applications for the personal computer. ASG's Vertex Division counts among its 30 strategic partners Du Pont, 3M, Pella/Rolscreen Co., Boise Cascade Co., Allied-Signal, Inc., Fry Reglet Corp., SuperSpec, and Timberline Software Corp.

ASG

400 Bridgeway, Suite 309

Sausalito, CA 94965-1451

415-332-2123


CLIPWKS Spreadsheet Data Transfer
If you need to transfer data between Lotus or Quattro spreadsheets, the only sensible choice is CLIPWKS. CLIPWKS is written by Joseph D. Booth, co-author of "Clipper 5: A Developer's Guide and distributed by Grumpfish, Inc. (home of the Aquarium, Grumpfish Library, and Grumpfish Menu), so you know it's got to be good. But if you're not convinced, compare the following features against any other Clipper add-on.

META FUNCTIONS plug quickly into your application to import/export spreadsheets and to produce Lotus/Quattro files from your report form files.

DIRECT FUNCTIONS provide a finer degree of control, allowing any size spreadsheet to be created (including formulas). You can write dates, logical values, @ formulas, and numeric data into the spreadsheet at any given cell. You can specify the print range, headers, footers, setup string, sort range and columns, global protection, etc. You can also read individual cells from existing spreadsheets, and update their values. You can fill an array with a range of cells from the spreadsheet file and determine the number of rows and columns in the spreadsheet.

ALL SOURCE CODE IS INCLUDED (both Summer '87 and optimized Clipper 5.01 versions).

MINIMAL MEMORY REQUIREMENTS, 100% Dynamically Overlayable, thus saving you significant overhead as compared to the other guys.

Supports Lotus 2.x spreadsheets, and is the only Clipper add-on that currently supports the following additional formats: Lotus 3.x, Quattro, and Quattro Pro.

Includes printed documentation and Norton Guides reference database.

30 days money-back guarantee, 30 days free voice support, and one year free BBS support on Grumpfish Land, the premiere Clipper BBS.

Grumpfish, Inc.

2450 Lancaster Dr. NE, Suite 206, Salem OR 97305-1200

Phone 503-588-1815 Fax 503-588-1980


USR BLAST Remote Control Add-On
SKOKIE, Ill. -- March 23, 1992 -- U.S. Robotics today announced its newest software product, BLAST Remote Control for Procomm Plus. It adds remote control capability to Procomm Plus, using the same menu interface and giving the vast installed base of Procomm users the ability to remotely control another PC. The product is available immediately for a list price of $69, and will be unveiled at Spring COMDEX, Booth # W2347.

"BLAST Remote Control for Procomm Plus is the perfect add-on for Procomm Plus users," said Marshall Toplansky, vice president of marketing, U.S. Robotics. "The product seamlessly hooks into Procomm, providing easy, fully-functional remote control capabilities."

Remote control allows remote access to files and applications on another computer, giving users the ability to actually run programs on another PC as if they were actually sitting at the remote keyboard.

BLAST Remote Control for Procomm Plus extends BLAST's robust functionality and multiplatform interoperability in the PC world. U.S. Robotics' software division, formed by the acquisition of Communications Research Group, has designed and developed communications software since 1980. BLAST software products are leaders in the terminal emulation, file transfer and local and wide area network remote control markets. AT&T, Exxon, General Motors and other Fortune 1,000 corporations are BLAST customers.

According to industry sources, Procomm Plus holds a 50 to 70 percent share of the PC-to-PC data communications software market, and is the leading product in that market segment. Procomm Plus was one of the overall top-selling PC' software products in 1991.

BLAST Remote Control for Procomm Plus adds transparent PC-to-PC remote control functionality to Procomm Plus. The product includes easy-to-install software for the control PC that adds itself to Procomm's dialing directory by automatically editing the Procomm dialing directory database file. It also includes the software module for the host PC that allows callers to perform remote control. Important features of BLAST Remote Control for Procomm Plus include: dial-back security; remote mouse support; color graphics capability; and video scaling, to increase the speed of graphics transmission.

Complete BLAST Compatibility With PC-to-PC File Transfer

Procomm users who install BLAST Remote Control for Procomm Plus assure themselves of 100 percent compatibility with other PC versions of BLAST. BLAST Remote Control for Procomm Plus also includes the BLAST file transfer protocol, known for its ability to transmit error-free data under even the most adverse telephone line conditions, giving users PC-to-PC file transfer capabilities.

U. S. Robotics, Inc., (NASDAQ: USRX) is a leading designer, manufacturer and marketer of data communications hardware and software. Product lines include Shared Access communications resource sharing products; Total Control modem management system for central data sites; BLAST software products for terminal emulation, file transfer and remote control; Courier modems for corporate users; WorldPort portable modems for traveling professionals; and Sportster modems for small business, home office and entry-level users. Both corporate headquarters and manufacturing operations are based in Skokie, Ill. U.S. Robotics owns and operates Miracom Technology Ltd., Slough, England, and U.S. Robotics, s.a., Lille, France. The company markets its products to business, industry, government agencies and original equipment manufacturers.

U.S. Robotics, Inc.

8100 North McCormick Blvd. Skokie, IL 60076

708/982-5010

--------------------------------------------------------

Q&A: BLAST REMOTE CONTROL FOR PROCOMM PLUS

Q: Why do I need remote control capabilities?

A: Remote control allows remote access to files and applications on other computers. For example, a sales rep who carries a laptop can use that laptop to access files on the office computer. The sales rep can both view the screen of the remote computer, and download and upload files, change files and edit documents. Remote control gives users the ability to actually run programs on another PC.

Q: Does remote control work across applications?

A: Yes. Any application or file can be remotely accessed with BLAST Remote Control for Procomm Plus. However, the product is not recommended for Windows applications.

Q: Does remote control involve a lot of complicated commands?

A: No. The remote control module provided by BLAST is completely transparent to the user. Once the remote application is opened, keyboard and menu commands remain the same; it's just like being at the remote keyboard.

Q: How do I connect to my remote PC?

A: Procomm users can communicate with a remote PC via modem. Two PCs may also be "hard wired" together via a direct PC-to-PC connection.

Q: How can I be sure that my computer will be secure?

A: BLAST Remote Control for Procomm Plus provides security features at many levels. The product provides both password security and dial-back security features to safeguard data.

Q: Will BLAST Remote Control for Procomm Plus work with my version of Procomm Plus?

A: The product is recommended and designed for use with Procomm Plus 2.0; however, it will work with previous versions of Procomm.

Q: Will I have to learn new commands?

A: No. BLAST Remote Control for Procomm Plus' user interface is identical to Procomm's user interface. No familiarity with BLAST is necessary.

Q: Is the product compatible with other versions of BLAST?

A: Yes. BLAST Remote Control for Procomm Plus is fully compatible with all BLAST products for DOS machines, including U.S. Robotics' flagship software product, BLAST Professional DOS 10.5.

Q: Does BLAST Remote Control for Procomm Plus include file transfer capabilities?

A: Yes. The product may be used for PC-to-PC file transfer, and includes the BLAST file transfer protocol for 100 percent error-free transmission.

Q: What if I need to use a mouse in my remote application?

A: The BLAST product provides mouse support; the mouse at the control PC commands the application at the remote PC.

Q: I want to remotely access programs that involve graphics; will this significantly slow down my transmission rates?

A: BLAST Remote Control for Procomm Plus provides "video scaling," which essentially reduces the number of pixels sent to the control PC. By reducing that number, users can increase speed by as much as 50-to-1.


Copia AccSys Database C Libraries
WHEATON, IL -- Delivering more product at a greater savings, Copia has dropped the additional cost for network support for their AccSys database C libraries. Now, for the low price of $395.00, you receive not only the AccSys capabilities but you also receive network and Windows support. In addition, Source is available for an affordable $995.00. Copia is able to pass this remarkable savings on to the customer because of the proven stability of the AccSys products and lower technical support cost.

Applications that work under environments such as VisualBasic can use the AccSys Windows (DLL) to fully utilize the file access routines from within VisualBasic. C programmers are able to develop for Windows using either the DLL or the C Library. DOS, DOS Extenders and OS/2 are also supported.

Also addressed by the AccSys for dBASE and AccSys for Paradox products is portability. "We understand the programmer's need for portability and have given them the ability to run under numerous platforms and environments" said Dorothy Gaden, Vice President of Marketing for Copia. "Product flexibility and compatibility is the key design element for the AccSys for dBASE and AccSys for Paradox products".

Designed for C and VisualBasic programmers, the AccSys libraries provide quick and easy access to the files of their respective databases. All the popular C compilers are supported by AccSys for Paradox and AccSys for dBASE.

To receive information on the AccSys libraries via FaxFacts, Copia's 24-hour Fax-On-Demand system, call 1-708-924-3030 and request document number 88982 (AccSys for Paradox) and/or document number 88983 (AccSys for dBASE). To speak with an AccSys representative, call 1708-682-8898


Datel Isolated Power Supply Board
Isolated PC/AT Power Supply Board Programs Under WINDOWS

Delivering a full 22 Watt output, a precision programmable power supply and input monitor, configured on an IBM-PC/AT board, has been announced by DATEL, Inc. The Mansfield, MA company is offering the multi-channel isolated board for programmable linear test applications, custom PC-based Automatic Test Equipment (ATE) and software-controlled manufacturing usage. The system is excellent for testing power supply variation rejection on development circuits.

The new board, model PC-462, includes two unipolar channels of 0 to +20.475 Volts and 0 to -20.475 Volts at 250 mA maximum, intended for linear test circuits. Also included are two 0 to +6.1425 Volt and 0 to -6.1425 Volt channels, each delivering 1 Ampere maximum, typically for logic circuits.

All four output channels are isolated from the host PC/AT bus by 250 Volts RMS. Each channel is controlled by an independent 12-bit D/A converter under software control. Sense feedback offers precise load regulation. The output channels are unconditionally stable under all load conditions with 0.025% accuracy and linearity on the +/-20 Volt channels. Transient response is 200 microseconds.

Both the current and voltage may be monitored on all output channels with an on-board, fully isolated 16-channel analog input system. A 12-bit A/D converter is used. Four independent external analog inputs and four calibration channels may also be measured. Triggering can be either internal or external.

Four software programmable isolated digital channels (two inputs, two power MOSFET outputs) can control discrete devices. One input may be configured as a PC/AT interrupt to flash alarms or do emergency shutdown.

A comprehensive graphic software package, model PC-462SET, written in WINDOWS Visual BASIC, offers multi-channel voltmeter display and control, engineering unit conversion, digital I/O, calibration, time-stamped file save/display mode, automatic overlimit warning and shutdown. Prerecorded test sequences from disk may be played back using the system clock for automated ramp testing applications. PC-462SET runs under Microsoft WINDOWS 3.0.

The PC-462 is configured on a 4.5 inch by 13.31 inch (11,43 x 33,81 cm) board filling a long PC/AT slot. PC/AT power is used at +5 Volts 4 Amps max and +12 V., 1.5 A max. The PC-462 is $1195 in single quantity with generous quantity discounts. A free disk of "C" subroutine library software is included. The PC-462SET is $95 and the source code, model PC-462SRC, is $395. Delivery is stock to four weeks.

DATEL, Inc., 11 Cabot Boulevard, Mansfield, MA 02048

(508) 339-3000    FAX: (508) 339-6356


SYBASE Open Server 2.0
EMERYVILLE, CA, March 31, 1992 -- Sybase, Inc. today announced Release 2.0 of the SYBASE Open Server product, the leading product in the industry to integrate heterogeneous data sources and services into a cohesive client/server environment. The SYBASE Open Server product, introduced in 1989, is a key component of Sybase's advanced client/server architecture.

SYBASE Open Server Release 2.0 enhances and simplifies SYBASE's data integration capabilities, enabling a new class of applications that can combine such diverse data sources as non-relational databases, real-time data feeds, and application services. New features include event notification, increased performance capacity, increased ease-of development, and support for OS/2 and a wider range of UNIX platforms.

Stewart Schuster, Sybase vice president of marketing, commented, "We define open systems as our customers do -- the freedom to choose the hardware, software, and networks that they want to use. We pioneered this concept of open systems when we introduced the Open Server product in 1989, and we are still the only company to provide this degree of interoperability. In response to customers' needs, we have enhanced our Open Server interface to make the task of integrating disparate data even easier."

The SYBASE Open Server product is part of the SYBASE family of Open Interoperability products, which were the first to provide: access to any data source through common application programming interfaces; the ability to invoke heterogeneous applications and services; and an open client/server architecture that provides a consistent framework to integrate any software system. Another of the SYBASE Open Interoperability products is the SYBASE Open Client interface, a client-based application programming interface (API) used to enable third party products or 3GL programs to access SQL Server and Open Server applications.

Sybase ended 1991 with over 1300 SYBASE Open Server licenses sold. In addition to sales to end user customers, Sybase has licensed the Open Server interface to over 80 major Value Added Resellers (VARs) including: Applied Information Sciences, Hill Arts & Entertainment and NCR/Teradata/Sharebase. Through the use of the Open Server interface, VARs' products automatically have access to the over 400 third party products that support SQL Server and Open Server applications.

The SYBASE Open Server Product

The SYBASE Open Server interface is an API that offers customers unique features for integrating non-SYBASE data, applications, and application services into client/server environments. With the Open Server product, client tools and applications interact with non-SYBASE data and applications as if they were the SYBASE SQL Server database. The SYBASE Open Server interface can be used independently of the SYBASE SQL Server product to build distributed systems based on the client/server model.

The SYBASE Open Server product also provides the capability for generic client/server communication between previously incompatible data, applications, and application services. The Open Server interface supports communication through both data language calls (such as SQL) or database remote procedure calls (RPCs). This allows developers to build applications which utilize diverse server functions. Because the remote procedure calls are not restricted to a particular language, these calls can be used to initiate tasks on all types of software systems.

Stewart Schuster added, "We are dedicated to meeting the integration needs of our customers' entire organization. Integrating relational, or SOL-based, data is just the tip of the iceberg. Our entire interoperability strategy is based on an understanding that there is a whole lot more out there than just relational data. Our Open Server product is a critical component of this strategy because it is the only product of its kind which truly allows integration of any kind of data, from real-time feeds to network services to legacy applications."

Release 2.0

Fred Mangiameli, Teradata manager of gateway products, said, "We recognize the Open Server product as a de facto standard which provides our customers expanded data access from hundreds of tools. We selected the Open Server interface because it best met our objective -- an environment where as many client applications as possible can have access to our products. We are very excited and optimistic about the market opportunities that the latest SYBASE Open Server release provides.

The enhancements made in Release 2.0 are critical, particularly the multi-threaded architecture, because we support large numbers of users."

SYBASE Open Server Release 2.0 enhancements include the following features and benefits for customers:

Event notification: The SYBASE Open Server 2.0 event notification function allows any data source to initiate a trigger to notify client applications of a particular data event. Unlike other event notification services, SYBASE's Open Server product provides notice of non-database events, as well as database events. The SYBASE Open Server 2.0 event notifier monitors information from any data source, such as the price of a specified stock from a real-time newswire, and then triggers an external process, such as automatically sending an electronic mail message to a stock analyst, or automatically initiating a trade when the stock reaches a certain price. This feature works as an extension of Sybase's programmable server, which provides client-to-server and server-to-server communication via remote procedure calls (RPCs).

The benefits of the event notification enhancement are that it increases ease-of-programming and reduces network traffic because it eliminates the need for polling mechanisms. This means that events are triggered to client applications only when a specified event actually occurs, rather than using system resources to constantly poll for these events.

Increased performance capacity: SYBASE Open Server 2.0 provides increased performance capacity because of its new multi-threaded architecture. With this architecture, customers can now achieve much higher performance with an increased number of users. For example, a beta customer using Open Server 2.0 has been able to improve an application's performance by 25% while doubling the number of users. Open Server 2.0 has additional performance enhancements, such as a negotiated client/server packets feature, which allows Open Client and Open Server products to communicate and agree on the maximum size of information to be passed over the network. This results in reduced network traffic between client and server applications.

Increased ease-of-development: Sybase has increased the ease-of-development of Open Server applications with three enhancements: supplied development procedures; application debugging tools; and new configuration options. Open Server 2.0 now supplies development procedures to create Open Server routines and to monitor Open Server users. For example, these routines can be used to implement security administration, monitor Open Server usage, or terminate processes that exceed specified limits. In addition, Open Server 2.0 application debugging tools decrease maintenance costs by allowing customers to monitor Open Server requests. Finally, Open Server 2.0 provides new configuration options. These new configuration options include new buffer sizes and process scheduling, allowing developers to optimize Open Server applications for their specialized requirements.

Support for a wider set of platforms: Open Server 2.0 now supports a wider range of UNIX platforms, including IBM RS/6000 and NCR Series 3000, and OS/2. In addition to these newly supported platforms, the Open Server product is currently available on DEC RISC, Hewlett Packard 9000 Series, IBM MVS, Pyramid, Sequent, Silicon Graphics, Sun, and VAX/VMS.

Pricing and Availability

SYBASE Open Server Release 2.0 is available in production now on UNIX and DEC VMS. A beta release of Open Server 2.0 for OS/2 will be available in mid-1992. Pricing ranges from $1,130 to $94,850 based on CPU size, number of CPUs, and the number of users. Open Server 2.0 licenses are also available for both the source code and protocol specifications.

The SYBASE System

The SYBASE system is a leading client/server-based relational database management systems (RDBMS) for the on-line enterprise. It consists of proven online RDBMS technology, complete SQL lifecycle tools, and open interoperability products. The SYBASE SQL Server product features scalable high performance, server enforced integrity, high application availability, and on-line distributed DBMS capabilities. The SYBASE SQL Lifecycle tools provide graphical tools for the complete SQL development lifecycle, including design, application development, and operational control. Sybase, Inc.

Sybase, Inc. (NASDAQ: SYB) develops and markets the SYBASE system, a leading client/server-based RDBMS product family for on-line, enterprise-wide applications. The company offers proven technology combined with services and partnerships to provide customers with complete desktop to mainframe solutions. Headquartered in Emeryville, CA, Sybase markets its products worldwide through its direct sales force, distributors, OEMs, VARs, and systems integrators.

Sybase Inc, 6475 Christie Ave, Emeryville, CA 94608

510-596-3500


QEdit Named Best Pgm Editor
March 2, 1992 - Marietta, GA (USA) - QEdit has received the 1991 Readers Choice Award for "Best Program Editor" from the readers of Data Based Advisor magazine. The annual award is based on votes received from the magazine's 40,000 plus readers. Users cite QEdit's speed, compact size, and ease of use as reasons for their choice.

QEdit, the flagship product of SemWare, currently has a customer base of over 100,000 licensed users.

Founded in 1985 by Sammy Mitchell, the author of QEdit, SemWare initially began distributing QEdit via electronic bulletin board systems, offering the product as "shareware". During the past six years, the company has expanded its product offerings and now designs, develops and produces a line of editing software primarily for the personal computer market.

From its location near Atlanta, Georgia, SemWare ships its software throughout the US and to more than 70 countries around the world. QEdit users range from PC novices to the most highly skilled programmers in some of the world's largest corporations.

QEdit also won the "Best Program Editor" award in 1989.

SemWare, Suite C3A, 4343 Shallowford Rd, Marietta, GA 30062

404-641-9002


Letter-Art 7.0 Fonts
Symbol Graphics, Corona, Ca, has increased the number of fonts now shipping with Letter-Art 7.0. The new base package includes 32 of the firm's best selling fonts, while the full package (base plus options) contains 50 fonts. Over 200 licensed Agfa-Compugraphic fonts are available from the Symbol Graphics library.

Registered 7.0 users may receive the new font packages for a $25.00 shipping and handling fee. Users of earlier versions should contact their Letter-Art dealers or Symbol Graphics for upgrade details.

Symbol Graphics, 1047 W. Sixth St. Corona, CA 91720

(714) 736-4040 FAX: (714) 737-0652


Lexmark Peripherals for IBM
GREENWICH, Conn., March 26, 1992 . . . "One year ago, we created a $2 billion company out of the Blue." The company: Lexmark International Inc., which will celebrate its first anniversary tomorrow with that headline appearing in national ads and with the announcement of several new products today.

The "Blue," of course, is IBM, often colloquially referred to as "Big Blue." Lexmark was created in 1991 when IBM's information products business of approximately $2 billion became an independent company. The worldwide information products company develops, manufactures and markets personal printers, typing workstations, computer system keyboards and some 1,600 related supplies.

On the occasion of its anniversary, Lexmark made significant product announcements in each of its four businesses:

* Four new models of its award-winning 4029 Series IBM LaserPrinter family, including two models for direct attachment to Macintosh computers.

* The first generally available product bearing the Lexmark logo: six models of an IBM PC-compatible keyboard to be sold via direct mail catalogs to end-users. Lexmark products currently carry the IBM logo. The Lexmark logo will be phased in over time.

* The addition of Microsoft Windows software preloaded on the IBM PTS-386SX typing workstation.

* The IBM 4683/4684 Auto-Inking ribbon for point-of-sale terminals. A self-inking device prolongs the ribbon's life by two times longer than its predecessor ribbons.

Chairman Reviews Accomplishments of First Year

"It's been an exciting first year," said Marvin L. Mann, chairman and CEO, "and we're off to a great start:

"We substantially exceeded our profit plan and exceeded our gross profit and operating margins by reducing costs and expenses significantly. Strong cash flow from operations and effective asset management made it possible to prepay some debt and also cancel 20 percent of our credit line because we won't need it. Today, we have approximately $300 million less debt than we anticipated.

"We refreshed the whole personal printer line with 13 new models, added the PTS-386SX, four new keyboards, and grew the supplies business in the United States 17 percent year-to-year. The latter is very important since supplies are a significant contributor to Lexmark's profit performance.

"We significantly expanded our reseller network to more than 3,500 in the United States alone and added new types of outlets for selected products such as office and electronic superstores and distributors. We're being equally aggressive in the more than 100 countries where we do business, including Eastern Europe.

"We are increasing our U.S. sales force by 60 percent this year to work directly with end-users in large accounts, in cooperation with our dealers.

"We reduced our overhead structure dramatically, eliminated bureaucracy, and made changes to make us more responsive to our customers. We streamlined our organization, eliminated unneeded staffs, so there are generally only four management levels between the employee and the CEO.

"We reduced costs and development cycle time while improving the quality and reliability of our products. And, we implemented Operation ReSource, a laser printer cartridge recycling program."

Growing Customer Base

"IBM is still our largest customer," said Mr. Mann. "But we also have succeeded in expanding our customer base. We negotiated a number of OEM contracts that greatly expanded the market for our products. We've also been fortunate to get many large customer orders from companies such as Wal-Mart Stores, Inc., Sears Roebuck and Co., General Motors Corp., and Allstate Insurance Companies. Approximately 10 percent of our customers today are brand new; we didn't have them a year ago.

"We established a stock option program for our employees that can be exercised if the decision is made to take the company public at some future date. The stock set aside for this purpose represents about 15 percent of the equity in the business. Earlier this month, we announced a new incentive program for U.S. employees under which they can earn payments in 1992 of up to six percent of their salaries. The feeling of ownership and commitment our employees have makes us very optimistic about Lexmark's future.

"There's been a culture change at Lexmark. The teamwork system is in, and it's working well," the chairman stated.

IBM Heritage Cited

"We are extremely proud of our IBM heritage and the values and foundation it has given us to build a successful business. Being independent has brought a greater focus to this business, a focus that makes us more responsive to customers, lighter on our feet, quicker to get products to market and easier to do business with. It seems to be working. The letters and feedback from customers and resellers tell us it's working.

"All in all, I feel very good about our first year. However, it's only chapter one. There are many challenges ahead . . . but the future looks very bright."

--------------------------------------------------------

LEXINGTON, Ky., March 26, 1992 . . . New IBM LaserPrinters announced today by Lexmark International Inc. attach directly to Macintosh computers, offering Apple users up to four times higher resolution than most other desktop PostScript printers.

The IBM LaserPrinters 10A and 6A are the latest products to be introduced by Lexmark -- a former IBM business unit that has refreshed the product line offered to it when the company was formed one year ago.

"Lexmark's first year has been highlighted by the introduction of 13 new laser and dot matrix printers," said Donald C. Shropshire, Jr., Lexmark's vice president of marketing and sales for the Americas and the Far East. "We have transformed the IBM personal printer product line in response to customers' needs for enhanced performance, ease-of-use, print quality and versatility."

Lexmark recently set a new standard for the industry with the announcement of true 600 x 600 dots-per-inch (dpi) resolution in the IBM LaserPrinter 4029 Series. Th s new standard is now extended to Macintosh and IBM PC users in the form of machines fully-configured with Adobe's PostScript interpreter and high resolution printing enabled.

Easy to Use, Easy to Learn

The new IBM LaserPrinters for Macintosh computers are designed to accommodate the Apple user's demand for easy to use products. To get up and running users simply unpack. plug in and print. And becoming more familiar with the printer is just as easy thanks to the specially, designed operator's manual which reads with the clarity that Macintosh computer users have come to expect. This ready-to-use printer is made even simpler to operate by the "easy-view" control panel with liquid crystal display that indicates menu options and printer status in plain English (or seven other languages).

"With the new IBM LaserPrinters 10A and 6A, Lexmark is stepping up to the toughest ease-of-use standards around and delivering a printing solution that brings a wealth of new benefits to the Apple computer user," said Mr. Shropshire.

Mr. Shropshire said that the advantages of the IBM LaserPrinter 4029 Series 10A printer over current printer offerings in the Apple computer environment include:

* true 600 x 600 dpi resolution, and the ability to adjust line width, and control print contrast and darkness

* paper handling advantages such as multi-media input capability, increased output paper capacity, and wrinkle-free envelope printing

* 'smart' mechanisms that automatically sense paper size, link primary and secondary trays, and prevent output paper capacity from being exceeded

In addition to the A models, Lexmark also introduced today two new PostScript printers in the IBM LaserPrinter 4029 Series for attachment to IBM PCs and PCs compatible with IBM systems. The 4029 Series P printers offer the same print quality and paper handling benefits as the A models, including connectivity in the most popular IBM computer networks.

Prices and Availability

The IBM LaserPrinter 4029 Series A models consist of the 10A priced at $3,995 and the 6A priced at $2,695. The IBM LaserPrinter 4029 Series P models consist of the 10P priced at $3,795 and the 6P priced at $2,295 (dealer prices vary). All models feature a one-year manufacturer's warranty, in addition to value-added service contracts available through authorized dealers. All A and P models in the 4029 Series are available now in the United States and Canada through Lexmark and IBM authorized resellers, and through IBM and Lexmark direct.

Lexmark International Inc., which celebrates its first anniversary tomorrow, is a $2 billion worldwide information products company that develops, manufactures and markets personal printers, typing workstations, computer keyboards and related supplies. A former business unit of IBM, Lexmark became an independent company in March 1991.

Lexmark International Inc

PO Box 2868

55 Railroad Ave, Greenwich, CT 06836


M-USA Pacioli 2000 Ver 2.0
ACCOUNTING SOFTWARE MAVERICK BREAKS RULES--AGAIN!

DALLAS, TEXAS--March 15, 1992--Since its release in May, 1990, Pacioli 2000, M-USA's award-winning accounting software, has skyrocketed to first place. Now Jose Hurtado, President and Chief Executive Officer of M-USA Business Systems and acknowledged innovator of low-cost accounting software, announces the release of Pacioli 2000 Version 2.0. The new product begins shipping in early April, 1992. While most upgrades add complex features and a price increase, the new Pacioli 2000 is designed to makes its customers' lives easier while maintaining Hurtado's trademark $49.95 suggested retail price point. M-USA makes the new program even more appealing by offering end-users an opportunity to upgrade from the competition for only $29.95.

From laser printer support to faster account entry, from easier period opening to an improved report generator, from recurring entries to account consolidation - Pacioli 2000 Version 2.0 is improved from top to bottom. "Our new design not only simplifies the operation - it also adds important new features WITHOUT sacrificing any of the power that made Pacioli 2000 such a smash hit in the first place. Every new feature was evaluated based on its impact to bottom-line ease-of-use," says Hurtado. "And it's still the only accounting software that's fully networkable right out of the box, with no additional user fees," he continues.

Since its introduction, Pacioli 2000 has become the best-selling accounting software and is the only one among the top twenty sellers in the business software category (PC Computing, January, 1992). Its mass appeal has captured the attention of CNN's: "Moneyline" and "Headline News, "The New York Times, USA Today, The Miami Herald, The San Jose Mercury News and many other consumer media giants. In the awards category Pacioli 2000 has won PC WORLD's "Best Buy," Computer Buyer's Guide and Handbook's "Best Buy," PC Computing's "Best Value" and Compute's Choice Award for "Best Financial Software of the Year."

Hurtado attributes M-USA's success to rigid adherence to its company philosophy "Customer Takes Priority" (CTP). In addition to modifying Pacioli 2000 to meet customer demand, M-USA also makes available an impressive upgrade offer for its current user base or users of any other financial software. For a limited time, owners of accounting, spreadsheet, tax preparation, checkwriter or personal finance programs can purchase Pacioli 2000 Version 2.0 for only $29.95. Then upon registration, customers can order free personalized computer checks, a free video and disk tutorial and a free payroll system. A shipping and handling charge of only $7.50 each applies.

M-USA Business Systems is headquartered in Dallas, Texas and it distributes Pacioli 2000 internationally in foreign language versions including Spanish and Polish. The program is widely available through distribution channels and can also be ordered directly from M-USA.

Customers wanting additional information should call 800-933-6872.

M-USA Business Systems

15806 Midway Rd, Dallas, TX 75244

214-386-6100


ASP SNAP Printer Sharing Network
COMDEX, CHICAGO, IL, (April 6, 1992) - ASP Computer Products, Inc., today announced the latest version of SNAP, ASP's easy to install, economical printer sharing solution. Introduced in 1990, the original version of SNAP supported from two to 16 users and a total cable configuration of up to 1200 feet. "The simplicity, flexibility and economy of the SNAP design have made it popular with major corporations, small businesses, home offices and schools alike. ASP's new version of the product, called SNAP II, allows as many as 20 computers to share a printer, with a total cable configuration of up to 1400 feet. The product will ship on April 15. SNAP II transmitters will retail for $59, and receivers will retail for $69.

Users install the SNAP II network by plugging SNAP II transmitters onto the parallel ports of their PCs, plugging a receiver onto the parallel port of their printer, and connecting them with up to 1400 feet of easy-to-use, RJ11, telephone-type cable. The PCs are then able to print as if they had their "own" printer, with printer access on a first-come, first served basis. Businesses can add more computers as needed by simply plugging in more SNAP II transmitters. SNAP II requires no training, special software, or expensive network cards.

SNAP II's modular design allows users to configure their printer-sharing network without the need to relocate their PCs or printer. ASP provides two and  three-way connectors that enable users to link their PCs in practically any configuration. Users can quickly create an efficient printer-sharing workgroup without rewiring or remodeling. The compact SNAP II units take up no desktop work space, and do not require a power supply.

"SNAP II is designed for users who want a printer-sharing solution that will grow as their office grows," said Amnon Even-Kesef, president of ASP Computer Products. "SNAP was improved based on feedback from customers who loved the product but wanted the capability to add more users. They had started with two or three PCs and had reached the 16-PC limitation of the previous model. SNAP II epitomizes our 'hassle-free printer sharing' at an economical price."

Manufactured in the Silicon Valley, SNAP II comes with a one-year warranty and includes unlimited technical support from ASP.

ASP Computer Products, Inc. manufactures and markets a full range of hassle-free workgroup solutions. ASP provides both network-based and network-independent printer-sharing options to enable users to choose a printer-sharing solution tailored to their needs. Other connectivity products in the ASP line include the popular ServerJet, JetWay, and Port Authority peripheral sharing devices, and the recently introduced JetLAN family of network print servers. The company's headquarters are in Sunnyvale, California.

For more information on SNAP II, contact ASP at 1-800-445-6190, or fax ASP at 408-746-2803.

ASP Computer Products Inc

160 San Gabriel Dr, Sunnyvale, CA 94086

408-746-2965


SPA PC Software Sales Report
March 26, 1992 (Washington, DC)- The Software Publishers Association announced today that North American personal computer application software sales for 1991 increased to an estimated $5.71 Billion, measured at retail. Applications sales grew 24.6% over 1990. For the full year, international sales of US firms grew 34.6% over 1990. Combined North American and international sales were up 28.0% for 1991.

The industry ended 1991 with a record quarter: North American sales in the fourth quarter of 1991 were $1.77 Billion, 33.6% higher than the fourth quarter of 1990. For the first time since the Software Publishers Association started tracking international sales in 1988, North American sales in the quarter grew faster at 33.6% than did international sales at 23.0%. For all of 1991, however, international sales grew faster than North American sales, 34.6% VS. 24.6% when compared with the prior period.

Sales of Windows applications continue to lead the growth in the industry. Windows application sales were up 228% in the fourth quarter of 1991 and 196% for the full year. Sales of Macintosh applications continue to grow faster than the industry average: Compared with the prior periods, Macintosh applications grew 36.1% in the fourth quarter of 1991 and 37.0% for the full year. DOS remains the largest selling application format. DOS applications sales grew 7.9% for the fourth quarter of 1991 and 5.9% for the full year.

For the full year, spreadsheet sales grew faster than other major categories. Compared with 1990, spreadsheet sales in 1991 were up 35%, to an estimated $947M. Word processors remained the largest category, with estimated 1991 sales of $1,136M, an increase of 23.8% over 1990. The word processor category had a banner fourth quarter, with sales Up 65% to nearly $410M, on the strength of some major product shipments. The languages and tools category also had an outstanding 1991, with growth of 33.1% over 1990. Much of that growth was in the systems utilities segment, which grew 61.8%. (Systems utilities include back-up, file recovery, and anti-virus programs as well as keyboard macro generators, printer enhancements and calculator programs.)

"Our figures show that 1991 was a truly outstanding year for the PC applications software business," said David Tremblay, Research Director for Software Publishers Association. "The fourth quarter growth in the domestic market was the highest of the year. Strong shipments of new products in North America, the softening of European economies, and the strengthening of the dollar resulted in North American sales growth exceeding international growth for the first time since we began tracking international sales in 1988. The growth of Windows applications continues to be the story in the industry. By our calculations, Windows applications growth accounted for two-thirds of the total revenue growth for 1991."

--------------------------------------------------------

March 30, 1992 (Washington, DC) - North American software firms' sales increased 32% in Europe in 1991, the Software Publishers Association announced today.

Thirty-seven US-based software firms, including Lotus, Microsoft, WordPerfect, Aldus, Claris, Software Publishing, Borland, Symantec, Wordstar, Enable, T/Maker and others participated in the SPAIs data program by submitting confidential data to the accounting firm of Arthur Andersen, who prepared the report for the SPA. The data was collected in 16 software categories (including word processors, graphics, spreadsheets and others) and in six different software formats (including Macintosh, MS-DOS, and Windows).

The 37 firms reported aggregate European software sales of $426.5M in the fourth quarter of 1991 and $1,383M for the full year. Fourth quarter sales grew 26% compared with the fourth quarter of 1990, while sales for 1991 grew 32% over the full year 1990.

With $415.3M in sales, Germany/Austria continue to be the largest European region for US publishers' software sales; it also was the region with the highest growth rate. The United Kingdom and Ireland was the second largest region with sales of $296.7M, followed by France with $278.9M in sales in 1991. Among the European regions tracked, only France and Germany/Austria grew faster than the overall European growth rate. These figures should not be considered estimates of market size, since the sample only includes the sales of the major North American software firms in each market. Generally in European software markets, sales of North American personal computer software products are approximately 70% of the total market in each country.

Although DOS was the largest selling application format in Europe in 1991, sales of DOS applications increased only 2% above the 1990 level. Sales of Macintosh applications were up 12%, while Windows applications grew 174% in Europe. "Windows applications sales continue to drive the growth of applications in Europe," said David Tremblay, Research Director of SPA. "In five of the 16 categories we track, the Windows format was the top seller in 1991. Windows applications accounted for one-third of applications revenue in Europe in 1991, up from 16% in 1990."

The Software Publishers Association is the principal trade association of the personal computer software industry. Its 900 members represent the leading publishers in the business, consumer, and education software markets. The SPA has offices in Washington, DC, and Paris La Defense, France.


SPA-ABM Legal Settlements
March 31, 1992 (Washington, DC) - The Software Publishers Association and Advanced Business Microsystems, Inc. ("ABM") announced today that ABM, an Irvine, California based company, will contribute to the SPA Copyright Protection Fund to further the work of that fund as part of the settlement of a copyright infringement suit brought by SPA members Lotus Development Corporation, Microsoft Corporation, Symantec Corporation, WordPerfect Corporation, Wordstar International, Fifth Generation Systems, Inc., Ventura Software, Inc. and Central Point Software, Inc. The suit, filed in U.S. District Court in Orange County, alleges that ABM and its affiliated companies operated unlicensed copies of the plaintiffs' software.

In addition to the monetary contribution, ABM will distribute company-wide various policies aimed at avoiding unauthorized software copying. ABM has also agreed to ensure that all unlicensed copies of computer software have been eliminated from its personal computers.

"We are pleased that ABM cooperated with us to determine the status of all software in use by ABM. Companies such as ABM that experience rapid growth must institute control policies to prevent the inappropriate duplication of software. The agreement with ABM and its affiliated companies confirms that the required attention will be given to overseeing software usage on a continuing basis," said Ilene Rosenthal, SPA Director of Litigation.

Gerald Blackie, President and CEO at ABM, said, "We agree that compliance with all copyright regulations is important. We did find some areas where we were in technical violation, and we took immediate steps to correct the situation. We have also instituted more stringent control procedures to guarantee future compliance, including the use of a system that monitors all software in use on every computer connected to our networks. ABM firmly believes in the right of all software producers to be paid for their products, and we applaud the diligent efforts of the SPA that help protect the copyrights of software manufacturers."

Since 1988, the Software Publishers Association has filed over 100 lawsuits on behalf of its members and obtained numerous search and seizure orders against businesses, computer dealers, bulletin board services, and educational institutions that have violated its members' copyrights. The SPA's anti-piracy hotline, 1-800-388-7478, accepts calls reporting software violations.

The Software Publishers Association also has distributed free of charge self-audit materials designed to help businesses, government entities, and educational institutions manage their internal software practices. To obtain a copy of the SPA Self-Audit Kit and SPAudit, a software inventory management program, companies should write to:

SPAudit

Software Publishers Association

1730 M Street, NW, Suite 700

Washington, DC 20036

The Software Publishers Association is the principal trade association of the personal computer software industry. Its 900 members represent the leading publishers in the business, consumer, and education software markets. The SPA has offices in Washington, DC, and Paris La Defense, France.


Assorted Que Book Titles
(Carmel, Indiana) -- Users of all experience levels find essential information about a best selling operating system inside DR DOS 6 Quick Reference from Que. The book not only provides users with an instant reference to the most often used commands, options, and critical procedures of this software, but also gives them $50 off the software itself.

DR DOS 6 Quick Reference comes complete with descriptions of this operating system's dynamic command set, then ventures through commands, switches, error messages, and correction shortcuts. Learning DR DOS configurations with the CONFIG.SYS file is simplified with this book, and its easy-access style makes reference to command line editing keys and functions quick.

An order form in the back of DR DOS 6 Quick Reference offers readers the opportunity to purchase DR DOS 6 directly from Digital Research at a $50 savings from retail pricing. The combined incentive of fast information and a software discount make this package attractive to current and potential DR DOS users.

DR DOS 6 Quick Reference

Mark Bilbo  $ 9,95 US

ISBN: 0-88022-827-X  148 pp.

--------------------------------------------------------

(Carmel, Indiana) -- Que's Easy series of computer tutorial books are guaranteed to teach PC novices the basics of various applications software programs. The newest books in this series are Easy WordPerfect for Windows and Easy Excel.

Easy WordPerfect for Windows

The friendly, full-color format of Easy WordPerfect for Windows provides an environment conducive to learning. Beginning PC users find this book stuffed with practical, fact-filled pages. One step at a time, users learn how to use WordPerfect for Windows to create letters, memos, reports, term papers, resumes, and more.

Easy WordPerfect for Windows shows users how to save and retrieve word processing documents, polish the appearance of documents, and check documents for spelling errors and typos. Plus, users can access information easily with a glossary of terms called the Quick Reference, and a special guide helps accustom novices to using a mouse.

Easy Excel

Known as the fastest and easiest way to learn Excel, Easy Excel shows users how to keep track of facts and figures in a simple fashion with the PC. Users find that the book's full-color pages reflect exactly what their PC screens show them, so learning is fast and simple.

Easy Excel teaches users how to save and retrieve documents, enhance worksheets with Excel's formatting features, and accurately calculate and update formulas. Financial statements and reports look great after users apply the facts they find in Easy Excel. Plus, the Quick Reference brings information conveniently to their fingertips and refreshes learning.

Easy WordPerfect for Windows

Shelley O'Hara $19.95 US

ISBN: 0-88022-899-7 195 pp.

Easy Excel

Shelley O'Hara $19.95 US

ISBN: 0-88022-820-2 186 pp.

--------------------------------------------------------

(Carmel, IN) -- Using FoxPro 2 gives users a thorough understanding of this leading database management system. The book is designed to enable anyone to become a proficient database user. Because this software has such extensive capabilities, Using FoxPro 2 maintains a fairly rapid pace through FoxPro's various features.

Using FoxPro 2 is logically divided into five major parts and several appendixes. Following a detailed, yet easy-to-use index, users are guided through the following sections: Introducing FoxPro 2; Getting Productive with FoxPro 2 Databases; Building FoxPro 2 Applications; FoxProgramming: Enhanced Use of the Design Tools and Beyond; and Getting to Know FoxPro 2 Commands and Functions. In addition, Using FoxPro 2 features a foreword written by Dr. David Fulton, president of Fox Software, Inc.

Users learn how to take clear advantage of all FoxPro 2 capabilities including RQBE, Rushmore, Screen Builder, Menu Builder, Report Writer, Label Designer, and Program Manager. The book also shows users how to build and maintain customized, high-performance FoxPro applications for utmost productivity. Plus, Using FoxPro 2 makes learning easy with many sample screens, tips, tables, and advanced programming techniques.

Using FoxPro 2

Lisa C. Slater & Steven E. Arnott $29.95 US

ISBN: 0-88022-703-6 870 pp.

--------------------------------------------------------

(Carmel, IN) -- Desktop publishing, integrated software, and money management are featured in Que's latest "Using" books. Using Microsoft Publisher, Using PFS- WindowWorks, and Using Microsoft Money will help users get the most from their software.

Using Microsoft Publisher

Although Microsoft Publisher is an easy-to-use desktop publishing program, Using Microsoft Publisher helps beginning and intermediate users find their way through its many applications. The book features a friendly, example-oriented text that covers the basics, as well as expert tips for designing professional-looking publications.

Using Microsoft Publisher begins with a quick overview of the basics of both Windows and the easy-to-use Publisher environments. Users learn right away how to create and print newsletters, flyers, and brochures. The book explains how to choose page formats, how to use special features, and even offers troubleshooting tips to increase productivity.

Using PFS: WindowWorks

Because PFS: WindowWorks is an integrated software, Using PFS WindowWorks serves as a tour guide, helping users turn this software into a work horse. PFS: WindowWorks includes a word processor, spreadsheet, chart editor, database terminal, address book, and label maker. All these work together in an integrated format.

Using PFS: WindowWorks helps computer novices and intermediate users accomplish many business-related goals. The basics of each WindowWorks application is explained, then the book leads users through the methods for integrating and automating data-exchange between the applications and other programs. Tips and techniques help users sharpen the design of databases and spreadsheets for more efficient use of data and greater presentation impact.

Using Microsoft Money

Users learn how to maximize the features of Microsoft Money and accurately track their finances with Using Microsoft Money. The book provides a tutorial approach, showing users how to capitalize on Microsoft's blockbuster financial management software in the Windows environment. Plus, professional CPA advice gives users an added advantage in managing their finances.

Using Microsoft Money explains how to set up money management and budget accounts, how to enter transactions, track cash expenditures, and reconcile bank accounts. Users learn to create different types of accounts; enter, save, and collect vital finance information; and generate useful reports. Using Microsoft Money is ideal for either personal money management or small business financial management.

Using Microsoft Publisher

Katherine Murray $22.95 US

ISBN: 0-88022-915-2 377 pp.

Using PFS: WindowWorks

Sean Cavanaugh with Deanna Bebb $24.95 US

ISBN: 0-88022-751-6 455 pp.

Using Microsoft Money

Linda A. Flanders $19.95 US

ISBN: 0-88022-914-4 443 pp.

--------------------------------------------------------

Que, 11711 N. College Ave., Suite 140 Carmel, IN 46032

1-800-428-533 1


Recent Sams Book Titles
(Carmel, IN) -- Written in plain English and illustrated with real-screen graphics, Sams' First Books give new users the information they need to become proficient. The latest titles, The First Book of Word for Windows 2 and The First Book of DR DOS 6, follow this popular First Book format.

The First Book of Word for Windows 2

Newly updated for the second version of this powerful word processor, The First Book of Word for Windows 2 gives novice PC users the information they need to produce professional-looking documents.

The book contains step-by-step tutorials, examples and screen shots to illustrate each Word for Windows function. It explains how to manipulate text, format documents and paragraphs, and create tables. All Word for Windows tools are covered, including the spell checker, thesaurus, and new grammar checker.

Users learn how to create form letters, labels, and envelopes; work with templates and macros; and integrate Word for Windows with other programs. Practical advice available only in The First Book of Word for Windows 2 gives users tips on how to embellish publications with professional layout strategies, crisp graphics, and 3-D charts. "FYIdea" tips give users solid ideas for applying Word for Windows' features to everyday business needs.

The First Book of DR DOS 6

Many say DR DOS is more than just an alternative to MS-DOS. They say it is a better disk operation system than DOS itself. With The First Book of DR DOS 6, users learn the differences between the disk operating systems, and put the advanced features of DR DOS to work immediately.

The First Book of DR DOS 6 explains essential DR DOS 6 commands, features, and functions in clear and practical terms. The book focuses on the View MAX user shell and gives step-by-step instructions, examples, and illustrations of how to work with files, as well as the fundamentals of DR DOS file-handling commands.

After mastering the basics, users learn to take advantage of the DR DOS full-screen text editor and the power-packed batch files. Special advanced chapters teach users how to fine-tune DR DOS to work with Windows, Novell NetWare, and other networking systems.

The First Book of Word for Windows 2

Sandra Eddy and John E. Schnyder $18.95 US

ISBN: 0-672-27389-6 377 pp.

The First Book of DR DOS 6

Galen A. Grimes $18.95 US

ISBN: 0-672-27386-1 408 pp.

--------------------------------------------------------

(Carmel, IN) -- Programming is no longer a mysterious process that takes years to master. w l[n Do It Yourself QuickC for Windows, Do It Yourself Visual Basic, and The Waite Group's C++ Programming, Second Edition, users begin programming successfully in record time.

Do It Yourself QuickC for Windows

This book shows beginning and intermediate users how to use the QuickC compiler to program easily with C. Carefully designed, real world examples make sure users get the job done, while step-by-step text covers programming structure and proven programming strategies.

Packed with examples, Do It Yourself QuickC for Windows gives users a guided tour of the menu system and development tools. Users will learn how to adapt C skills to the new world of event-driven logic while learning how to edit, compile, and build fully executable programs.

Do It Yourself QuickC for Windows covers all aspects of QuickC, including the programmer's development environment, debugger, Dialog Editor, Image Editor, and QuickCase:W. Using this book allows anyone to strengthen the design of their software, enhance its appearance, and improve memory management.

Do It Yourself Visual Basic

Visual Basic is Microsoft's powerful new BASIC language that makes Windows programming easy. Its unique, point-and-program operation helps users develop custom software by creating their own Windows interfaces.

Do It Yourself Visual Basic is ideal for first time programmers or programmers making the switch to Windows. The book focuses on proven Programming methods and conventions; and it guides readers through the how-to's of developing viable programs. With Do It Yourself Visual Basic, users discover how to control Visual Basic's Project Manager and Tool Palette while creating graphical user interfaces. Several useful sample programs are included in the text; plus, the book teaches users more advanced topics, including how to program complete Windows events and how to assign properties to objects for personalized programming touches.

Step-by-step tutorials, numerous illustrations, and multiple program examples make Do It Yourself Visual Basic a must for BASIC Windows beginning and intermediate programmers.

The Waite Group's C++ Programming, Second Edition

The perfect primer for all intermediate and advanced C++ programmers, The Waite Group's C++ Programming, Second Edition, provides a new outlook on incorporating object-oriented programming with C++. This completely updated book offers thorough explanations and practical programming examples, enabling readers to advance to "power-programmer" status quickly.

The book features a logical path of learning to guide users through both traditional and new benefits of C++ programming. Users learn how to work with objects, input/output, class data types, multiple inheritance, and constructors and destructors. The many examples included in this book make software development easy.

In-depth and real-world programs expose the secrets of linked lists, derived hierarchies of classes, communications, and UNIX manipulation. Plus, The Waite Group's C++ Programming, Second Edition, teaches users how to develop customized data types, operators, and functions. Both UNIX and DOS programmers will benefit from the information offered in this book.

Do It Yourself QuickC for Windows

Jeb Long $24.95 US

ISBN: 0-672-27391-8 915 pp

Do It Yourself Visual Basic

William J. Orvis $19.95 US

ISBN: 0-672-27382-9 669 pp.

The Waite Group's C++ Programming, Second Edition

John Thomas Berry $29.95 US

ISBN: 0-672-22771-1 408 pp.

--------------------------------------------------------

(Carmel, Indiana) -- LAN Desktop Guide to E-Mail with cc:Mail is a LAN administrator's ideal introduction to electronic mail. Because of the changes that cc:Mail can bring to a network, many LAN administrators need a networking advisor for electronic mail, and this book fills the bill.

Organized as a combination how to/reference book for beginning to intermediate users of all platforms, LAN Desktop Guide to E-Mail with cc:Mail provides clear, concise explanations that guide administrators from installation to configuration and management. Readers learn how to incorporate the endless aspects of E-mail into their everyday business operations.

Examples and advice accompany explanations that show users how to install the Post Office as well as how to build an enterprise-wide cc:Mail system. LAN Desktop Guide to E-Mail with cc:Mail offers in-depth and in-detail information about mastering user functions, dealing with remote users, and building personalized cc:Mail applications. Wide Area Network (WAN) Management with cc:Mail and using import/export functions are covered as advanced topics in the fact-packed reference section.

LAN Desktop Guide to E-Mail with cc:Mail

Bruce Fryer $27.95 US

ISBN: 0-672-30243-8 298 pp.

--------------------------------------------------------

Sams, 11711 N. College Ave., Suite 140 Carmel, Indiana 46032

1-800-428-5331


New Riders Networking Titles
(Carmel, IN) - Sharing information via computer is a must for many of today's businesses. New Riders Publishing (NRP) introduces two fresh texts to make sharing information easy and productive. NRP's latest books, Novell NetWare On Command and Inside Solaris SunOS and OpenWindows provide users with vital information they need to reach for peak productivity.

Novell NetWare On Command

Novell NetWare On Command is a task-oriented guide that provides intermediate to advanced users with information on all aspects of the most popular local area network software. It offers easy reference for all Novell NetWare commands and utilities and covers versions 2.X and 3.X.

Starting with simple instructions, Novell NetWare On Command demonstrates the skills users need to become proficient NetWare users. Each page is full of detailed steps that present NetWare commands, tips, tricks, and techniques. All vital elements are explained, illustrated, and then demonstrated. The book also features a solution-oriented trouble-shooting guide, expert information, and shortcuts to optimize NetWare performance.

Inside Solaris: SunOS and OpenWindows

The Sun workstation has long been the system of choice for businesses running multiple tasks simultaneously. It has also proven valuable for those using built-in network communications like computer-aided design (CAD), integrated circuit design and simulation, and numerical analysis.

Inside Solaris: SunOS and OpenWindows is an ideal reference book for understanding the power of Sun systems. It offers a hands-on approach to getting the most effective use from the operating system, the OpenWindows interface, and the DeskSet Tools. Specific examples and text help beginning to intermediate users understand the fundamentals of the Sun operating system.

Users explore both Solaris environments -- UNIX and OpenWindows. They also quickly learn how to manage the OpenWindows DeskSet Tools and UNIX system. Inside Solaris: SunOS and OpenWindows also explains the concepts, functions, and elements behind the OpenWindows graphical user interface, enabling users to take advantage of the Sun workspace, menus, and windows.

Easy-to-follow explanations allow users to customize their OpenWindows system and use communication tools to share files and information. In addition, Inside Solaris: SunOS and OpenWindows provides a Solaris SunOS Command Reference that puts commands, syntax, and options within easy reach.

New Riders Publishing, a leader in computer book publishing, is an imprint of Prentice Hall Computer Publishing (PHCP). PHCP is a division of Simon & Schuster, which is a division of Paramount Communications.

Product Information

Novell NetWare On Command

Drew Heywood and Danny Kusnierz $19.95 US

ISBN: 1-56205-011-7 217 pp.

Inside Solaris: SunOS and OpenWindows

Karla Saari Kitalong, Steven R. Lee, & Paul Marzin $29.95 US

ISBN: 1-56205-032-X 715 pp.

--------------------------------------------------------

New Riders Publishing

11711 N. College Ave., Suite 140 Carmel, Indiana 46032

1-800-428-5331


Que & Hayden Macintosh Books
(Carmel, IN) -- Que's latest Easy book introduces Mac novices to the magic of Macintosh computing. With Que's Easy Macintosh, users get to know the Macintosh via four-color graphics and step-by-step explanations for all its popular tools.

Easy Macintosh is a practical, fact-filled book that gives users fast and easy access to Macintosh computing. Users learn how to use the versatile Macintosh Desktop and Accessories to manage files, organize windows, open documents, and run programs. The book offers simple explanations for how to work with the built-in HyperCard stacks, allowing users quick access to important addresses and appointments at the click of a mouse.

A handy source of vital information, Easy Macintosh specializes in Macintosh software with its software guide and quick reference section. Easy Macintosh is so complete that Que offers users a money-back guarantee if they don't find quick Macintosh success with this book.

Que, the world's leading computer book publisher, is an imprint of Prentice Hall Computer Publishing (PHCP). PHCP is a division of Simon & Schuster, which is a division of Paramount Communications.

Easy Macintosh

Shelley O'Hara $19.95 US

ISBN: 0-88022-819-9 199 pp.

Que, 1711 N. College Ave, Suite 140, Carmel, IN 46032

1-800-428-5331

--------------------------------------------------------

(Carmel, Indiana) -- First in the Cool Mac series of books from Hayden, Cool Mac Stacks brings simplicity to operating HyperCard on the Macintosh. A fun, useful book-and-disk set for Mac users of all experience levels, it's one of a kind in today's computer book market.

Cool Mac Stacks author David Drucker, director of education for the Boston Computer Society Macintosh Group, gives Macintosh users a much-needed, simplified explanation of how to use HyperCard. He helps users stretch their imaginations by giving them ideas for creating personalized stacks, as well as instructions for modifying the stacks provided on the free diskette.

Users find 19 ready-to-use HyperCard stacks stashed on the disk bound inside Cool Mac Stacks. Cool HyperCard stacks like Pizza Navigator, Renaissance Man, Colorizing HyperCard, Say the Numbers, and Balloon Help add extra glitz and glamor to this awesome book!

Cool Mac Stacks introduces Hayden's new publishing philosophy to the computer book-buying public. The innovative expansion of this Prentice Hall Computer Publishing imprint will include not only additional Cool Mac titles, but also the Electronic Publishing Library and Carmen Sandiego books.

Hayden, long known for their Macintosh Library series of books, is an imprint of Prentice Hall Computer Publishing (PHCP). PHCP is a division of Simon & Schuster, which is a division of Paramount Communications.

Cool Mac Stacks

David Drucker $19.95 US (book/disk set)

ISBN: 0-67248522-2 134 pp.

HAYDEN, 11711 N. College Ave., Suite 140 Carmel, IN 46032

1-800428-5331


Lexmark Keyboards & Accessories
LEXINGTON, Ky., March 26, 1992 . . . Lexmark International Inc. announced today that it will offer to computer end-users a full line of IBM PC-compatible keyboards and accessories beginning April 1 via a toll-free telephone number.

Available to customers will be six keyboard models with various features: the Enhanced 101-Key; the Spacesaver 84-Key; the Streamlined 101-Key; the Quiet Touch 84-Key with optional Numpad; and the Enhanced 101-Key with either a 16mm or 25mm-diameter integrated trackball.

The announcement coincides with Lexmark's first anniversary. A $2 billion worldwide information products company, Lexmark develops, manufactures and markets computer keyboards, personal printers, typing workstations and related office supplies. A former business unit of IBM, Lexmark became an independent company in March, 1991.

The keyboards are the first products to carry the Lexmark logo. All come with either the six-pin mini DIN or five-pin DIN connector except for the Enhanced 101-Key trackball versions, which come with only the 6-pin mini DIN.

The Enhanced 101-Key keyboard is available for $129. Its positive tactile feedback and key layout make it the industry standard among PC keyboards.

The Enhanced 101-Key with either a 16mm or 25mm integrated trackball sells for $149. The trackball performs the same function as a mouse by controlling the movement of a pointer on the computer display. The keyboard connects to the computer through a single cable. A mouse driver is included with the keyboard.

The Spacesaver 84-Key keyboard, which lists for $109, is 25 percent smaller than the Enhanced 101-Key, yet it offers many of the features of larger keyboards. It includes 12 function keys for full software capability, separate cursor keys and embedded numeric keypad.

The Streamlined 101-Key, available for $99, provides the user all of the conveniences of a standard, full-function 101-key layout but in a smaller package -- 30 percent less space than the Enhanced 101-Key keyboard.

The Quiet Touch 84-key keyboard, which sells for $89, makes work easier in noise-sensitive environments. The optional "Numpad" sells for $30 and connects to the keyboard with either a 14- or 36-inch cable.

Accessories include a keyboard palm rest for $9.99, a comfortable foam rubber pad that protects and supports the wrists and palms while typing. Also, color-coded keycaps with a variety of letters or graphics are available to those who wish to customize their keyboards for various software packages or foreign languages. Prices for the keycaps are available upon request.

All of the keyboards and accessories are featured in Lexmark's Spring/Summer Business Products Catalog. Customers can call 800/438-2468 to place orders or request a catalog.

Lexmark International Inc

740 New Circle Rd, Lexington, KY 40511


TWAIN Application Pgm Interface
March 25, 1992 -- The TWAIN specification, developed jointly by leading imaging vendors, is now shipping in toolkit form to hardware manufacturers and software developers. TWAIN is a cross-platform application program interface (API) and protocol which permits the easy integration of a wide range of input peripherals with any software application needing the information generated by these devices. The specification was developed by a working group of five industry leaders -- Aldus, Caere, Eastman Kodak, Hewlett-Packard Company, and Logitech -- with input from a coalition of imaging hardware and software companies.

Designed to be portable across several computing platforms, TWAIN provides a powerful link between any compliant software and input peripheral. Version 1.0 of the toolkit will operate under the Macintosh operating system, versions 6.05 up, and Microsoft Windows, version 3.0 and higher. During its creation, the TWAIN specification was also known by the working names "Direct Connect" and "CLASP.

TWAIN describes how to interconnect imaging products, such as desktop and hand-held scanners, slide scanners, frame grabbers, digital cameras, and image databases, with any software application able to handle the data format -- known as "raster" information -- that these sources produce. By implementing TWAIN, software developers can offer direct support for a variety of image sources within a single application, without having to create multiple drivers. In addition, as participating hardware vendors upgrade or change their products, there will be no need to rewrite drivers.

For end users, TWAIN brings the ability to add images quickly and easily to a wide range of documents without having to quit an application, acquire an image and store it as an appropriate file, re-open the initial application, and import the image. The transfer of data is completely transparent, appearing as an integral part of the menu options of the software application.

"The input of images into computers affords tremendous productivity, efficiency, and aesthetic benefits to our world today," states Kristy Holch, director of the Scanner Market Strategies division at BIS Strategic Decisions, an international industry research firm. "Until now, the use of graphic and text-based images has been held back by the variety of hardware and software products and their inability to communicate among themselves. The new TWAIN specification confronts the problem by offering a 'grand central station,' or common language, through which TWAIN-speaking products can communicate. This greatly simplifies the task of development, and opens the field to a much wider choice of compatible hardware and software for users. If it is broadly adopted by vendors, TWAIN will bring about the proliferation of images in computer-based applications."

The core element of TWAIN's architecture is the Source Manager (SM), a code resource on the Macintosh and a DLL under Microsoft Windows. The Source Manager's primary role is to establish and manage connections between an application and an image source. It allows the user to select a source, loads and unloads the selected source, and makes sure that all calls from a particular application are correctly routed to the appropriate source.

Members of the Working Group and Coalition have cooperated closely over the past 18 months to meet a widely recognized need, putting aside competitive concerns in an effort to grow the market for all players. To date, more than 175 companies have reviewed preliminary Drafts of the specification and provided comments and suggestions. The following companies are presently implementing TWAIN compliance in their products:

Aldus, Bear River Associates, Caere, Canon U.S.A.,, Hammerlab, Hewlett-Packard Company, Image-In, Intel Corp., Kofax, LightSource, Logitech, Lotus Development Corp., Media Cybernetics, Micrografx, Microtek, Ocron, OCR Systems, Orion Systems, Pixel Translations, Recognita, Ricoh Corp., Seiko, Vividata, Zedcor, ZSoft.

In addition, the following companies have endorsed TWAIN as a viable API that answers both developer and end-user demands:

Adobe, Agfa-Gavaert Belgium, Calera Recognition Systems, Corel Systems, Diamond Flower Electric Inst., Eastman Kodak, Howtek, KYE International Genius, Letraset, Marstek, Mitsubishi International, Mouse Systems, NBI, Nikon, Nisca, on the Go Software, Pentax Technologies, Pre-Press Technologies, Primax Electronics, Software Architects, The Complete PC, Ventura Software.

The five members of the Working Group will provide advice and support for TWAIN implementors. Vendors of compliant products will be encouraged to use the TWAIN logo on packaging and in promotional materials.


Tab/McGraw-Hill Books
Hard Disk Management with DOS 5, 3rd Edition by Dan Gookin

Now updated to include information on the newest version of DOS, this bestselling book remains the best source of tips and techniques available to general users who want to maximize the performance of their hard disks. Packed with valuable applications, utility programs, and management advice, this new edition describes how to:

* Reorganize jumbled files and data into manageable units

* Use DOS batch files, menu systems and shells to aid in

  the everyday management of disk files

* Secure data from accidental loss, hard disk failure or

  unauthorized use

* Improve system performance with a variety of disk storage

  and access strategies

. . . and much more. Dan Gookin not only shows users how to survive disaster. such as disk crashes, memory wipeouts, and overloads--he thoroughly describes what steps can be taken to avoid them. In addition, a 5.25" disk with management utilities from PC-SIG is included to help readers boost their hard disk's performance. Readers can spend hundreds of dollars for disk management/utility software . . . and still not match the value of this revised and expanded edition.

Dan Gookin is a regular contributor to PC/Computing and Computer Buying World magazines. Also the host of a weekly radio talk show on computers, Gookin holds a degree in communications from the University of California at San Diego. He is the author of Windcrest's Advanced Batch File Programming--3rd Edition and Working with Magellan.

Hard Disk Management with DOS 5 -- 3rd Edition

Order No. 4072 * Available: March * 424 pp., 124 illus.

Paper $29.95 ISBN 0-8306-3520-3,

Hard $39.95 ISBN 0-8306-3521-1

--------------------------------------------------------

Database Design

Applications of Library Cataloging Techniques

by David L. Clark

Combines concepts in database management with the standards used in library cataloging.

BLUE RIDGE SUMMIT, PA--Professionals in all fields today are so flooded with data that many find it difficult to locate information when they need it. Database Design was written to help solve this problem. This outstanding book will allow frustrated information managers to regain control ova their files, so they can find the facts they need fast.

David L. Clark shows how anyone can take advantage of the efficient standards and practices used in library cataloging, applying them to the creation and organization of all kinds of databases. Clark covers all major distributed database platforms and library cataloging standards:

* PICK, R-BASE, and IN MAGIC database systems

* Machine-Readable Cataloging (MARC) methodology

* Anglo-American cataloging rules

* Library of Congress Subject Headings

* Data validation and normalization

* Record identification and categorization criteria

Clark explains how to use these elements in all phases of database development, from initial system set-up to daily operation. Readers will find step-by-step instructions that demonstrate several specific applications, including the management of warehouse inventories, photo and art collections, historical and statistical research, and more. With the clear guidance of Database Design, readers will be able to bring any database under strict control, and quickly get the information they need.

About the Author:

David L. Clark is the chairman of the History Computerization Project of the Los Angeles City Historical Society and the author of five books, including Programming in IBM PC BASIC and the PICK Database System.

TAB/McGraw-Hill * Database Design: Applications of Library Cataloging Techniques Order No. 3443 * Now Available * 352 pp., with dust jacket * Hard $34.95 ISBN 0-8306-3443-6

--------------------------------------------------------

The Information Broker's Handbook

By Sue Rugge and Alfred Glossbrenner

Everything there is to know about becoming a successful information broker. Forward by Reva Basch, President, Association of Independent Information Professionals.

The business of information brokering got its start in 1971 when Sue Rugge, an out-of-work librarian in the San Francisco area, decided to contract her research skills out to local businesses, consultants, and professionals who needed information on a given subject. Today, fee-based information retrieval has become a multi-million dollar industry utilizing virtually every conceivable medium for gathering data.

Now, Rugge and PC telecommunications expert Alfred Glossbrenner team up on this one-of-a-kind volume--the definitive guide to starting and running a profitable information brokerage service. The authors provide an in-depth examination of all the search and retrieval options used by today's successful information brokers:

* Online databases

* Electronic bulletin boards

* Special interest groups (SIGs) and forums

* Document delivery services

* Conventional library and telephone research

The authors also address the all-important business end of information retrieval: establishing an office, purchasing hardware and software, marketing and selling information services, pricing and billing, and much more. And the appendices contain a comprehensive listing of resources, associations, trade shows, and software vendors, as well as sample forms and contracts that are included on disk.

In short, this volume provides aspiring information brokers with everything they need to get started, except the clients and Rugge and Glossbrenner offer more than a few helpful tips on how to find them as well.

Sue Rugge is widely recognized as "the first information broker," cofounding the first company of its kind in 1971. She is also founder and former president of Information on Demand, a company she built from scratch into the second largest information brokerage in the U.S., with annual sales of more than $2 million. Today, Sue Rugge is principal of The Rugge Group, which provides research services to corporations and independent professionals. She is regarded as the nation's leading authority on the business aspects of information brokering and presents a seminar on "How to Make Money as an Information Broker." She served as president of the Association of Independent Information Professionals (AIIP), in 1988-89. The bestselling author of several computer books, Alfred Glossbrenner operates a successful shareware distribution business specializing in PC telecommunications software.

5.25" disk of business forms included

Order No. 4104 * APRIL * WINDCREST * 320 pp., 100 illus., 7" x 10" * PAPER $29.95 (FPT) ISBN 0-8306-3797-4 HARD $39.95 ISBN 0-8306-3798-2 * ($39.95 Paper, $52.95 Hard CANADIAN)

--------------------------------------------------------

TAB Books--Blue Ridge Summit, PA 17294-0850

1-800-233-1128/FAX 717-794-2103


Brief in Accolade/Sega Litigation
SAN JOSE, CA-MARCH 26, 1992--Accolade announced today that the American Committee for Interoperable Systems (ACIS) has filed an amicus brief supporting the legality of the reverse-engineering process at issue in Accolade's litigation with Sega. The litigation commenced when Sega filed a complaint in federal district court in San Francisco alleging that Accolade had infringed Sega's trademark. Sega subsequently amended its complaint to allege that Accolade's development practices constituted copyright infringement. Accolade, which develops and markets games compatible with the Sega (Genesis) console without an official license from Sega, then counter-sued, claiming restraint of trade and unfair business practices. The ACIS brief addresses the legal issues involved in Sega's copyright claims against Accolade.

ACIS is an organization of companies in the computer industry that includes: Amdahl, Bull HN Information Systems, Chips and Technologies, Clearpoint Research, Comdisco, Emulex, Forecross, Informix Software, Johnson-Laird, Kapor Enterprises, Landmark Systems, NCR, Phoenix Technologies, Seagate Technology, Software Association of Oregon, Storage Technology, Sun Microsystems, Systems Center, 3Com, Unisys, and Zenith Data Systems.

"The life blood of the computer industry is the ability of any competitor to make and distribute interoperable software and hardware," said Peter Choy, Chairman of ACIS and Deputy General Counsel of Sun Microsystems. "ACIS members favor strong intellectual property protection but are concerned that an improper extension of the scope of protection under copyright law will impede innovation and inhibit fair competition in the computer industry."

"The ACIS brief strengthens our confidence that the freedom to innovate and compete fairly will ultimately prevail in the entertainment software, video game and other computer-related industries," continued Miller.

Accolade, with headquarters in San Jose, California, is a leading developer and marketer of entertainment software for IBM compatible, Macintosh and Amiga personal computers and is a licensed developer and marketer of video game software for Nintendo and NEC video game systems. It is the only independent developer and marketer, and the third largest developer and marketer, of video games for the Sega Genesis system.


Spectrum DSP Audio Boards
VANCOUVER, B.C. - March 23 -- Spectrum Signal Processing today joined with Motorola to introduce a four-layer, multi-interface digital audio evaluation board based on Motorola's new DSP56401 audio transceiver. The DSP56401 serves the fast-growing multi-media and professional audio markets by providing industry standard digital audio transmission interfaces.

Spectrum's DSP56401 evaluation board, designed around the DSP56401 AES/EBU/CP340 compliant digital audio transceiver, is outfitted with interfaces to virtually any type of audio equipment or DSP device. It includes digital audio input/output ports for balanced, unbalanced and optical transmission media, and ports to communicate with Motorola's DSP56001 and new DSP56002 devices, and with the DSP56156, the company's 16-bit DSP with on-chip sigma delta analog-to-digital conversion designed for digital cellular applications. The evaluation board also features Philips International standard (I2S), Burr-Brown and Japanese converter interfaces. In addition to multi-media and professional audio users, the board can also be applied in sophisticated data acquisition systems.

"Spectrum's DSP56401 evaluation board provides customers with a complete development system to design digital audio subsystems for applications such as multimedia workstations and home entertainment recording systems," said Bryant Wilder, Motorola's DSP operations manager. "We're pleased to partner with Spectrum to serve our customers' migration from analog to digital audio application."

"We are delighted to be working closely with Motorola on its new family of DSPs," said Barry Jinks, Spectrum president. "Both Motorola and Spectrum recognize the high growth potential for DSP technology in the Multi-media and professional audio markets, and we believe these new ICs and boards will find an eager audience in each."

Among the DSP56401 board's features are ports that permit designers to link multiple DSP56401 EVBs in time-division multiplexed series. Separate balanced-line XLR connectors and unbalanced-line RCA connectors are included for audio applications. A total of 76 jumpers enable various combinations of connections, adding flexibility as yet unavailable from any competitive product.

"Digital audio system developers need to be able to adapt to a broad range of equipment and devices, so the board has been designed to be as flexible and versatile as possible, in the same spirit that Motorola has designed the 56401," said Jinks. "These are still very new and fragmented markets characterized by users who want to work with various interfaces, and we want to serve as many of them as we can."

Jinks added that developers of professional audio systems based on digital processing represents one of the fastest-growing groups of enthusiastic DSP device users.

The DSP56401 board requires +5 VDC and includes an on-board DC-DC converter to get the 12V needed for VCO circuitry. A key feature is an optical interface that can be used with emerging standards such as digital audio tape.

The new board will be available from Spectrum Signal Processing at the end of the second quarter. Pricing will begin at $US495 each in single quantities.

Spectrum Signal Processing is a leading developer of system and processor boards, software tools, hardware systems and other digital signal processing products for the PC, VME and SBus environments. These systems support Digital Signal Processors from Motorola including the DSP96002 and DSP56001). Spectrum's unique modular DSP hardware allows users to interface off-the-shelf peripheral I/O boards with the DSP processor of their choice via the DSP~LINK system expansion interface. Spectrum Signal Processing Inc. is publicly traded on the Vancouver Stock Exchange under the symbol SSY.

Spectrum Signal Processing Inc

Suite 301-3700 Gilmore Way, Burnaby, BC, Canada V5G 4M1


FasTar Math Libraries for DSP's
VANCOUVER, Canada, and San Francisco, March 23,1992 -- Spectrum Signal Processing, the largest supplier of high performance DSP boards and development systems, will market Tartan, Inc.'s FasTar math libraries for customers using C language to program the TMS320C30, TMS320C31, and TMS320C40.

Spectrum will provide Tartan's package; of math routines, a fast-executing superset of the math libraries supplied by the standard C routines on the Texas Instruments' digital signal processors.

FasTar can compute these routines, including sine, cosine, square root and tangent, much faster than those available with Tl's C Compiler. Most were computed 1.5 to 5 times faster, with average speed improvements of approximately 2 times. Users can easily replace the C routines with FasTar routines by copying the new math library over the old one, then compiling C code.

"The FasTar math libraries will advance almost any DSP code development project and allow users to generate DSP code that runs faster and performs optimally," said Warren Cope, director of DSP Software Engineering for Spectrum. "Until FasTar was completed, DSP code with the speeds, sampling rates, and MFLOPs we have obtained in our analysis at Spectrum was beyond reach."

FasTar was created in 1989 for use in Tartan's Ada C30 Development Systems. It provides the highest performance and speeds of any set of libraries available for DSP development.

FasTar is available now from Spectrum for use in DSP code development with boards based on the Texas Instruments C3x/C4x DSPs. Pricing for the package begins at US$495.

Spectrum is a leading developer of system and processor boards, software tools, hardware systems and other digital signal processing products for the PC, VME and SBus environments. These systems support Digital Signal Processors from Texas Instruments (TMS320C40/30/25/50), Analog Devices (ADSP-21020/2101/2100), AT&T (DSP32C) and Motorola (DSP96002/56001). Spectrum's unique modular DSP hardware allows users to interface off-the-shelf peripheral I/O boards with the DSP processor of their choice via the DSP~LINK system expansion interface. Spectrum Signal Processing Inc. is publicly traded on the Vancouver Stock Exchange under the symbol SSY.

Tartan develops, markets and supports software for producing embedded, real-time applications. Products include optimizing cross-compilers, runtime systems, debuggers and software tools for the Ada language targeted to TI's 320C30, 'C31, and 'C40 DSPs, Intel's i960MC processor, the MIL-STD-1750A, and Motorola's MC680X0. Tartan's clients include many of the largest defense, aerospace, and commercial companies operating in the US and in Europe.

Spectrum Signal Processing Inc

Suite 301-3700 Gilmore Way, Burnaby, BC, Canada V5G 4M1


Technical Analysis for Excel
FOR IMMEDIATE RELEASE - March 20, 1992

Spreadware is now shipping push button market analysis to chart the volatile investment markets! push button market analysis is made available in response to requests for a technical analysis program that is flexible, sophisticated and inexpensive. Microsoft provides the flexibility. Spreadware provides the sophistication.

Many investors make investment decisions based on technical analysis, a form of market analysis that studies the demand and supply for securities and commodities based on trading volume and price studies. Using charts and modelling techniques, technical analysts attempt to identify price trends in a market, which they think will foretell price movements.

push button market analysis from Spreadware helps investors use technical analysis by providing a complete pallet of techniques. These techniques include Stochastics, Relative Strength Indicator, Japanese Candlestick Charting, Bar charts, Line charts and more.

Microsoft Excel provides a natural environment for technical analysis, due to its power and flexibility. Data is easily moved in and out of the environment, as well as easily manipulated. push button market analysis takes advantage of these and other powers. Using push button market analysis is as easy as pressing a button on a pallet and selecting the desired analysis. The analysis is automatically created, quickly.

Though push button market analysis: is an extremely capable program, it is designed for ease-of-use. Users do not need to be technical analysts, and those unfamiliar with the techniques will find solace in the documentation, which gives a complete description of all techniques, as well as how they can be interpreted.

push button market analysis will operate on any computer running Microsoft Excel 3.0 or 4.0. Spreadware is offering the $189 program at the introductory price of $99, through July 1, 1992'.

Spreadware has been publishing and marketing spreadsheet based analytical and management software since 1988. Spreadware's products are based on Excel, Wingz and Resolve, the most popular and powerful GUI spreadsheets.

Spreadware, PO Box 4552, Palm Desert CA 92261-4552

619/347-2365 * Fax: 619/347-6045


Sensible Grammar V2.1
Sensible Software has released version 2.1 of Sensible Grammar. Using the most advanced technology for checking grammar, Sensible Grammar checks for errors like dangling clauses and squinting modifiers while flagging the fewest false errors.

Sensible Grammar includes a unique Control Panel that adds a Grammar menu to your writing programs (like a spelling checker) when using MultiFinder or System 7. To check a selection, you highlight the text to be checked and choose Check Grammar. Sensible Grammar automatically runs, checks the selection, returns to the writing program, and pastes in the corrected text.

Sensible Grammar also features Clipboard Checking. Simply copy part of your document to the clipboard and have Sensible Grammar check that part of the document. It even retains formatting (in PageMaker 4, Microsoft Word, WordPerfect, MacWrite II, Microsoft Works, MacWrite, and HyperCard). This feature works best when using MultiFinder or System 7.

Sensible Grammar is System 7 Savvy and also works with System 5.0 and later. You can customize Sensible Grammar by choosing from nine different writing styles, or even create your own.

Sensible Grammar works with PageMaker 4 (using clipboard checking), WordPerfect, Microsoft Word, Microsoft Works, WriteNow, Microsoft Write, MacWrite, and MacWrite II. Sensible Grammar requires a Mac Plus or later and a hard drive.

Sensible Grammar retails for $99.95. If purchased within the last 30 days, you can get a free update (with proof of purchase). Registered owners can update for $30 (updates for overseas addresses are $40 in U. S. funds).

Sensible Software has moved. Our new address is 20200 E. 9 Mile Rd., Suite 150, St. Clair Shores, Ml 48080. The new phone numbers are (800) 394-4669 (sales and customer service), (313) 774-7215 (technical support), and (313) 774-2698 (FAX).


Kalok Lawsuit with Xebec
Sunnyvale, CA--March 18, 1992 - Kalok, developer and marketer of a line of 3.5 inch hard disk drives, today initiated a lawsuit in Federal Court with Xebec Co. Ltd., Tokyo, Japan, for breach of contract, patent and copyright infringement.

Xebec was producing Kalok-designed disk drives under contract in the Philippines for Kalok in a manufacturing arrangement whereby Kalok retained exclusive marketing and sales rights to the products and associated technology.

Barry McGriff, Kalok's vice president of sales and marketing, stated that Xebec has severely damaged Kalok's business and image. "They have interfered with and damaged our customer and supplier relationships by selling Kalok disk drives directly to customers without Kalok's authorization."

Kalok disclosed in the suit that its customer relationships the past three to four months have suffered as a result of these activities. Based on information supplied by Xebec, Kalok had been putting drives on allocation, creating dissatisfaction with Kalok's ability to meet customer requirements. Kalok drives, with capacities of 105MB and 120MB, are in great demand as they serve the most dynamic system market segments. The situation became aggravated when Kalok customers became aware of volume shipments of these disk drives to the U.S. through unauthorized channels, when Kalok's own customers could not receive shipments against long-standing purchase orders.

In addition, in its suit Kalok says that Xebec damaged supplier relationships by sending a letter to key component supplier partners, which contained misleading statements regarding Kalok.

McGriff pointed out that Kalok is moving forward in an $80 million manufacturing partnership with Daeyoung Electronics of Korea to manufacture Kalok's KL3100 and KL3120 drives in volume. The Daeyoung agreement, signed nearly a month ago, is expected to produce KL3100 and KL3120 disk drives for shipment to U.S. customers in April.

In addition, the new half-inch high Point5, at 3.5-inches and 250 megabytes, is to be shipped shortly in evaluation unit quantities to OEMs world-wide. McGriff said that the market reception has been "overwhelmingly positive," and that systems designers are already taking advantage of the drive's features. "There are more megabytes packed into the cubic volume of the Point5 than any other small form-factor drive on the market," he said.

Kalok is the developer and manufacturer of the KL3100 Series of industry-standard 3.5-inch hard disk drives for distribution, OEM, VAR and aftermarket channels. These include the newest additions to the series designed specifically for the 386/486 operating environment, the KL3120 with 120MB of capacity, and the KL3100 with 105MB of capacity, both featuring AT/IDE interfaces. Kalok drives are known for quality and reliability due to a low parts count which is half that of competitive units.

Kalok Corp., founded in 1987, maintains technical support centers in Europe, the Far East and at U.S. corporate headquarters located at 1289 Anvilwood Ave., Sunnyvale, CA 94089.


CDTV Educational Packages
WEST CHESTER, Penn., March 16, 1992 -- Commodore today announced its introduction of two new CDTV packages, CDTV Library and CDTV Early, created specifically for the education market but also available to consumers for a limited time. Commodore is offering these specially priced packages, which include a choice selection of CDTV's interactive education and reference multimedia titles bundled with the CDTV Interactive Multimedia player, to consumers through June 30, 1992 at authorized Commodore Amiga dealers nationwide.

The CDTV Library bundle is packaged as a reference set allowing consumers to create their own home library. CDTV Library includes a CDTV Interactive Multimedia player, one disc caddy 2-pack to protect the titles while in use, and a reference set featuring the American Heritage Dictionary, the World Vista Atlas and the American Vista Atlas titles. The American Heritage Dictionary presents 180,000 entries, 3,000 color illustrations, and an automated word pronouncer and speller. The World Vista Atlas is the first multimedia world atlas, incorporating detailed Rand McNally maps, thousands of photographic images, ethnic music provided from the Smithsonian Institution's Folkway Collection and spoken examples of more than 60 foreign languages with English translation. The suggested retail price for the CDTV Library bundle is $869.00, representing an almost 50 percent savings from the total suggested retail price of all the components individually priced.

The CDTV Early bundle features a CDTV Interactive Multimedia Player and 13 premier CDTV educational software titles designed for early learning activities, specifically for children three years and older. Bi-lingual software titles included in the CDTV Early package are The Tale of Peter Rabbit, Scary Poems for Rotten Kids, The Tale of Benjamin Bunny, Cinderella (The Original Fairy Tale), Mud Puddle and Heather Hits Her First Home Run. These software titles can be read complete with sound effects, or the child can read the story and receive help with pronunciation and meanings of words in both English and Spanish.

Other software titles in the CDTV Early set include The Paper Bag Princess, Thomas' Snowsuit, Moving Gives Me A Stomach Ache, Long Hard Day At The Ranch, My Paint [a classroom tested paint program] and Snoopy: The Case of the Missing Blanket. The CDTV Early set also contains a disc caddy 2-pack. The suggested retail price for the CDTV Early package is $1,129.00. Purchased separately, the components of the package have a suggested retail price of $2,000.

"With CDTV Library and CDTV Early packages, we're offering families an affordable way to enjoy a world of information and educational fun," said David Archambault, director of business marketing for Commodore.

"Because of the CDTV multimedia player's versatility and unique interactive capabilities, the CDTV Library and CDTV Early offer comprehensive packages to meet a variety of educational and consumer needs," said Archambault. "Utilizing proven Amiga technology and some of the best interactive educational applications available, CDTV Interactive Multimedia offers vivid colors, exciting graphics, sound and animation in one component. With CDTV, education is entertaining and entertainment is educational -- in other words, CDTV brings information alive," said Archambault.

In addition to these special bundle packages, Commodore also offers a full line of CDTV accessory products including keyboard, mouse, Genlock sound digitizer, joystick and printer, further enhancing CDTV's value as an educational tool.

CDTV, Commodore Dynamic Total Vision, represents a major advance in technology and capability over any other commercially available format, combining audio, video, graphics and computer interactivity into a single Compact Disc-based system. The CDTV player and a full library of over 80 CDTV applications are available in more than 20 markets in North America, Europe and Asia.

Commodore, through its worldwide operations, is one of the world's leading producers of computer-based consumer and business products.

Commodore Business Systems

1200 Wilson Dr, West Chester, PA 19380

215-431-9100


Automated Arrythmia Analysis
Automated Arrythmia Analysis 1.0 ( DOS )

T - Cube Enterprise announces the release of its new product: Automated Arrythmia Analysis ( AAA ) version 1.0

AAA 1.0 is a DOS based electrocardiogram generation and analysis program. It comprises :

- ECG Generation : helps you generate electrocardiograms using the arrow keys of the computer keyboard and plot them on the screen.

- ECG Analysis : helps you analyze electrocardiograms generated by the program ECG Generation.  It measures amplitude and time intervals of the various ECG complexes ( P-wave, QRS complex and S-T segment ). Next, it compares these values to those of a normal electrocardiogram and displays the results on the screen.

AAA 1.0 is a simulation program ideal for medical practitioners engaged in cardiac research and teaching. It is also a good tool for medical students.  It can be used to experiment and study generation and analysis of a variety of arrythmias.  The program can be extended for integration with an A/D converter for continuous heart-rate monitoring via an electrocardiogram recorder.

AAA 1.0 is small in size ( only 20K ).  It is fast.  A demo program will easily demonstrate its speed.  It is easy to use.  On screen instructions guide you through the process of electrocardiogram generation.

Hardware Requirements ----------------------

- IBM PC/XT, AT, 386 or 100% compatible

- RAM : 640K minimum required, 1 MB recommended

- Hard disk with 20K of free space is required

- CGA, EGA or VGA card and monitor

- MS-DOS 3.0 or higher

- Source code in QuickBASIC; compatible with QuickBASIC 4.5

All software comes with printed documentation.

Price ----- Software : US $99 per single user single computer + shipping and handling  ( includes source code )

Site license ( hospitals, colleges, private practices ):  US $499 + shipping and handling ( includes source code ) MA residents : add 5% sales tax

Value Added Resellers inquiries are welcome. Demo copy for VARs : $15.00

If you'd like to place an order for a demo copy, please call Ramesh at 617 899 8657 or email at rc05@gte.com or write at the following address.

If you'd like to place an order for the software, please send a chek made payable to "T - Cube Enterprise" at the following address : T - Cube Enterprise 37 Lyman Street, Suite 2 Waltham, MA 02154 USA


Entrepreneurial Excellence Award
(San Francisco CA) March 11 ,1992 -- Barry Cinnamon and Larry Shilier, partners in Bureau Development Inc. and well-known as distributors of CDROM products through the Bureau of Electronic Publishing, have been named joint winners of the Optical Publishing Association's 1992 Award for Entrepreneurial Excellence. The announcement was made by OPA Chairman Parke Lightbown in ceremonies here at the 7th International Conference & Exposition on Multimedia and CDROM.

"Barry and Larry are entrepreneurs in the truest sense of the word," said Lightbown in making the presentation. "The Cinnamon-Schiller team has been instrumental in developing both retail and wholesale channels for CDROM products since 1988. They really have made a difference in the current state of the CDROM industry."

The OPA's Award for Entrepreneurial Excellence is bestowed by the OPA membership in a special balloting. The 1992 honor is the fourth annual award. Previous honorees were Bill Gates of Microsoft, Linda Helgerson of Helgerson Associates, and Bela Hatvany of SilverPlatter Information Services Ltd.

The Bureau is currently one of the largest distributors of drives and titles, providing service to dozens of CDROM publishers. Several titles published by the Bureau (including "Monarch Notes," "US History on CDROM" and "Countries of the World") have been quite well received. Their ads in major publications have introduced tens of thousands of people to CDROM. And the Bureau's Product Guide is one of the most widely circulated CDROM references.

Shiller and Cinnamon are also frequent conference speakers and have been covered in a variety of computer and general interest publications (including PC Week, PC Letter and Byte). The Bureau last year also recently received an "Orchid" award from Byte magazine for their pioneering efforts in making CDROM available to end users.

The OPA is an international professional and trade association dedicated to the development of CDROM technology and markets.

OPA, PO Box 21268, Columbus OH 43221

614-793-9660, 614-793-0749 (fax).


Facit T400 Thermal Printer
MANCHESTER, N.H., March 23, 1992 -- Facit, Inc., today introduced a low cost bar code and label thermal printer that offers big machine convenience and features at small machine prices.

The new Facit T400 direct thermal printer features support for peel-and-dispense and batch mode label printing, downloading of graphics and data storage in non-volatile memory. The printer offers Facit's proven LDS bar code emulation, in addition to Epson emulation, in 40 and 80 column models.

The Facit T400 prints at up to 3.5 inches per second even at high resolution, in either batch or on-demand modes for label and bar code industrial applications typical of warehouses, machine shops and laboratories. Retail applications include bar code pricing labels for department stores and supermarkets. The pre-heated print head improves print quality, reliability and performance even in cold environments.

Big machine features include built-in incremental and decremental counters for printing sequential bar code labels off-line, a choice of 18 resident fonts and support for all the most popular bar codes.

The T400 has flexible paper handling and will accept a variety of direct thermal label stock and fax paper up to 9.0 mil thick. Tag/tear, peel-and-dispense, batch and user-defined advance modes are all available with automatic compensation for label size and virtually unlimited print size. The supply rack of the T400 accepts paper as large as 8 inches in diameter or fan folded stock, with label or tag delivery selectable in batch or on-demand modes.

The Facit T400 includes easy-to-use software for designing custom labels, company logos in PCX format and printer setup software. Options include a label presence sensor that holds the label until the operator is ready to take it, a Centronics parallel interface and the ability to store logos in non-volatile memory.

Pricing and Availability

The Facit T400 printers are available immediately for $1,729, and will be exhibited at the upcoming FOSE show in Washington, D.C., the COMDEX show and the ID Expo, both in Chicago.

Facit, Inc., the U.S. subsidiary of Facit AB, Sweden, is located in Manchester, NH. The privately held company manufactures industrial grade printers, including laser, dot matrix, thermal and bar code models, as well as industrial PCs, tape punch equipment and other program storage devices for the NC/DNC industry.

Facit Inc

At University Center, 400 Commercial St, PO Box 9540

Manchester, NH 03108-9540

603-647-2700


AdaptSNA PC-to-Host Communications
CHICAGO, April 6, 1992 -- Network Software Associates, Inc. (NSA) today announced immediate availability of its AdaptSNA 2.0. RJE PC-to-host communications software for operation under OS/2 version 2.0, IBM's 2.0. 32-bit operating system optimized for 386SX and higher PCs. AdaptSNA RJE emulates an IBM 3770 workstation, providing high-speed Remote Job Entry (RJE) batch file transfers in IBM JES2, JES3, DOS/Power, RSCS, VS/RES and other environments.

"We feel our RJE emulator is an excellent companion to IBM's advanced OS/2 2.0", said NSA President Zak Kong. "Many large SNA users rely on the RJE protocol for batch transfers and remote site printing. The performance advantages of OS/2 2.0 combined with our high-speed communications package provides a very powerful PC-based solution for these users."

AdaptSNA RJE supports multiple LU type 1 sessions, unattended operation, automatic data compression and compaction, file naming flexibility, user-defined soft function keys, an API, and an optional print spooler for remote site printing applications.

Network Software Associates, founded in 1980, provides a wide range of PC software and hardware connectivity products for IBM networking environments. NSA is a an IBM Business Partner and is headquartered at 39 Argonaut, Laguna Hills, CA 92656. Phone: (714) 768-4013 or (800) 352-3270. Federal Systems Division: (703) 875-0444.


Kalok Hard Drive Mfg Pact
Sunnyvale, CA -- March 18,1992 -- Kalok, developer and marketer of a line of 3.5-inch hard disk drives, announced today that in response to rapid growth in demand for its products, it has concluded a manufacturing agreement with Daeyoung Electronics Co., Seoul, Korea.

According to the pact, Daeyoung will build Kalok's 3100 Series of hard disk drives on a turnkey basis. Daeyoung's disk drive production facility is one of the largest in the Far East.

The multi-year agreement, effective immediately, is valued at over $80 million per year. Volume shipments of Kalok's 3100 Series drives manufactured by Daeyoung are expected to begin in the second quarter of this year.

Daeyoung is a leading manufacturer of a wide range of high-quality, advanced technology communication, industrial control and information products. Daeyoung has been actively involved in disk drive manufacturing and development and has a 13,200 square meter drive manufacturing facility in Korea. This facility will supply Kalok's KL3100 series of drive families.

Tom Makmann, Kalok's president, said, "Demand for our 105 and 120MB drives has far exceeded our forecasts, and as the market is expected to grow stronger throughout the coming year, we are responding with additional manufacturing capacity."

Makmann continued, "Not only do we gain an experienced and trained disk drive manufacturing team with long-time ties to our design staff, the agreement saves us significant capital outlay in procuring additional facilities and manufacturing equipment."

"Daeyoung is uniquely positioned to provide Kalok with an experienced, high volume manufacturing facility for their products," said Dong Hyun Chang, executive managing director at Daeyoung. 'We have a strong focus on quality, reliability, and product cost that will support Kalok as it rapidly increases its supply to customers."

According to Makmann, the agreement allows Kalok to continue its focus on new product development and to bring state-of-the-art devices to the marketplace, including the new half-inch high Point5 series of 3.5-inch drives. "Furthermore," he said, "with Daeyoung as a partner, Kalok's position in the marketplace as a volume supplier of low-cost, high-performance disk drives will be significantly enhanced."

Kalok is the developer and manufacturer of the KL3100 Series of industry-standard 3.5-inch hard disk drives for distribution, OEM, VAR and aftermarket channels. These include the newest additions to the series designed specifically for the 386/486 operating environment, the KL3120 with 120MB of capacity, and the KL3100 with 105MB of capacity, both featuring AT/IDE interfaces. Kalok drives are known for quality and reliability due to a low parts count which is half that of competitive units.

Kalok Corp., founded in 1987, maintains technical support centers in Europe, the Far East and at U.S. corporate headquarters located at 1289 Anvilwood Ave., Sunnyvale, CA 94089.


Darwin Multimedia CD-ROM
DARWIN Multimedia CD-ROM for MACs and PCs

Created by Pete Goldie, Ph.D.

Announcing DARWIN, the first electronic publication of the collected   works of Charles Darwin.  Recommended for pleasure and education, for family   entertainment and scholarly research, this CD-ROM is suitable for all ages.    Includes the complete text and original illustration of Darwin's "The Voyage of   the Beagle", "Origin of Species", and "The Descent of Man"; the seminal   manuscript published by Charles Darwin and Alfred Russel Wallace in 1859;    Michael T. Ghiselin's award winning book "Triumph of the Darwinian Method"; all   in addition to the first re-publication since the 1800's of the original   specimens collected by Darwin, the five volume set "Zoology of the Voyage of   the Beagle".  With contributions by distinguished naturalists, librarians, and   scholars from throughout the nation, DARWIN brings together natural sound   recordings, original maps from the surveying voyages of the HMS Beagle and the   HMS Adventure, over 650 illustrations, and much much more; DARWIN is an   invaluable source of information.  DARWIN allows you to access text, images,   and sounds almost instantly.  A multimedia CD-ROM for use on both Mac's and   PC's, DARWIN gives you the capability to search for dates, subjects, authors,   birds, animals, plants, and more, all at the touch of a button!

Features included on DARWIN:

* Charles Darwin's complete texts and original illustrations of:

       "The Voyage of the Beagle", final edition.

       "The Origin of Species", 6th and final edition.

       "The Descent of Man", final edition.

* Manuscript published by Charles Darwin and Alfred Russel

  Wallace in 1859, outlining the theory of evolution.

* "Triumph of the Darwinian Method", a guide to the study of

  Darwin,   by Michael T. Ghiselin   (winner of the Pfizer

  Award of the History of Science Society).

* The Darwin Timeline, detailing the significant events in

  his life.

* A Darwin bibliography of over 1000 primary and secondary

  references.

* Original maps from the surveying voyages of the HMS Beagle

  and the HMS Adventure.

* Over 650 color and black & white images.

* Natural sound recordings from the Cornell University

  Laboratory of Ornithology.

* Illustrations of the original specimens from the "Zoology

  of the Voyage of the HMS Beagle".

* Plus never-before published material from other

  distinguished naturalists.

**   Audio plays out of the minijack on your CD-ROM drive

**   just plug in speakers or headphones!

SIMPLE CD-ROM SETUP INSTRUCTIONS:

IBM PC-Compatibles:  Log onto the CD-ROM drive.  Type in SETUP [ENTER].  To start CD-ROM, type DP [ENTER] at the C: prompt (additional information found in the README.1st file).

MACINTOSH:  Insert the DARWIN CD-ROM and open the Desktop.  Drag the   Discpassage Icon to your hard drive.  Double-click on the icon to start the   program (additional information is found on the AAREADME.1st file).

SUGGESTED RETAIL PRICE      ------      $99.95

LIGHTBINDERS, Inc.

2325 Third Street, Suite 320

San Francisco, CA 94107

(800) 43-CDROM or (800)432-3766


ChartBuilder for Quest
March 23,1992   San Francisco - DB EXPO - Pinnacle Publishing, Inc, and Gupta Technologies today announced a new product, Pinnacle's ChartBuilder for Quest. ChartBuilder will run on the desktop of Gupta's Quest data access tool. Quest users will be able to easily select data residing in major SQL databases on mainframes, minis, and PCs and create a wide variety of business graphics with ChartBuilder.

Priced at $199.00, ChartBuilder for Quest produces 2-D, and 3-D bar and pie charts, Gantt charts, scatter graphs, line graphs, log-linear and log-log graphs, high-low-close graphs, polar graphs, and X-Y graphs. A number of statistical functions, including mean, max/min, standard deviation, and best-fit, are also included.

Graphics Server SDK and Gupta SQLWindows are already a very popular combination," said David Johnson, Pinnacle's president. ''With Quest, Gupta has lowered the skill threshold for access to SQL data. Now end-users will be able to build their own graphs and charts with ChartBuilder regardless of which SQL databases their organization uses.

"We are thrilled that Pinnacle Publishing has developed their popular software for creating business graphics for use with Quest." said Umang P. Gupta, President & CEO, Gupta Technologies, Inc. "Combining ChartBuilder with Quest's easy access to corporate SQL data opens up a whole new world of opportunity for business users who need to graphically display data."

Located in Kent, Washington, Pinnacle Publishing offers a variety of add-on development tools for DOS, and Windows developers. ChartBuilder for Quest was developed by Bits Per Second Ltd., a U.K. software concern specializing in graphing tools for DOS, and Windows development platforms.

Pinnacle Publishing Inc

18000 72nd Ave S. Suite 217, Kent, WA 98032

206-251-1900


OPTIMEM Windows Memory Mgmt DLL
OPTIMEM by Applegate Software

OptiMem is a dynamic link library (DLL) for optimal memory  management in Microsoft Windows. It provides ANSI standard malloc() for C and new() for C++ to eliminate handles, overhead, granularity, selctor and performance problems. A zero-overhead, fragmentation-free, fixed-size allocator is also provided for using linked lists and other dynamic data structures in C and C++.

Supports all WIndows compatible C and C++ compilers, as well as other languages with DLL support. Requires Microsoft Windows 3.x. Comes in 5.25" and/or 3.5" diskettes.

Unconditional 60 day money back guarantee.

OptiMem is only $249 plus shipping. Price includes full source code.

For more details:       Applegate Software

                        4317 26th Ave NE

                        Redmond, WA  98053-8730

                        (206) 868-8512

                        Fax (206) 868-8522


Weitek Abacus 4167 Math Chip
Weitek Corporation and ICECAP Technologies announced today that users of 50MHz Intel 80486-based personal computers can realize a 50% performance increase for numeric-intensive applications by combining the 33 MHz version of Weitek's Abacus 4167 math coprocessor with the ICECAP thermal management device. Superior system performance is achieved without degrading system reliability.

... Applications that take advantage of the 4167, such as AutoShade, Autodesk Renderman, 3-D Studio and BigD will run as much as 50% faster with a Weitek coprocessor than with the math coprocessor built into Intel's 486.

... ICECAP snaps onto the top of the 4167-33 and maintains the case temperature of the math coprocessor below the ambient temperature of a computer enclosure. This allows the 4167 to operate at 50MHz without corrupting data or damaging the system. The Weitek Abacus plugs into a 142-pin socket on the motherboard of many 80486-based desktop computers. To reach a local distributor of the 4167-33, call the Weitek toll-free sales line, 800-468-3167.

ICECAP is priced at $149 and may be purchased directly from ICECAP by calling 408-727-6100. ICECAP Technologies has been a manufacturer of Peltier-effect thermoelectric coolers for the management of integrated circuits since 1987.

Weitek Corp. (NASDAQ:WWTK) makes processors and controllers that enhance the performance of standard operating systems, user interfaces and application software.

Weitek Corp.(408)738-5765

Sunnyvale, Calif 94086


Dell Models with 50 MHz Power
     NEW DELL MODELS MAKE 50-MEGAHERTZ POWER

        AFFORDABLE FOR MAINSTREAM PC USERS

     --Among First to Ship New Systems Based on

          Intel Speed-Doubler Technology

AUSTIN, Texas, March 3, 1992 -- Dell Computer Corporation today announced four new upgradeable personal computers based on an advanced Intel486 microprocessor that uses a new speed-doubler technology. Available immediately, the new computers are among the first to ship using the new Intel486 DX2 processor.  With speed doubling, the new systems run at 50-megahertz (MHz) but retain a CPU bus speed of 25- MHz.

     The new mid-size Dell System 486D/50 and low-profile Dell System 486P/50 extend Dell's upgradeable desktop 486 PC families to bring affordable 50-MHz performance to mainstream personal computer customers for the first time.  Dell also added 50-MHz DX2 models to its PowerLine family of advanced 32-bit architecture systems.

     Each of Dell's new 50-MHz i486 DX2 systems are up to 50 percent faster than similar 33-MHz models, but are available for just $100 more than their 33-MHz counterparts.  This aggressive pricing strategy reflects Dell's continued commitment to gain market share by offering end-users an unbeatable price/performance and support package.

     The new Dell PCs are among the first to be shipped using the new processor, in part because of the close working relationship between Dell and Intel, and also because Dell can install the DX2 in existing upgradeable systems without costly modifications or redesign.  While the new 50-MHz systems operate at a doubled internal rate, memory and other interfaces continue to operate at the previous 25-MHz speed. Dell was also among the first to ship PCs based on Intel's most powerful microprocessor, the 50-MHz Intel486 DX processor.

     "Dell has been able to respond very quickly to the latest technological developments from Intel because of Dell's product development capabilities and its efficient, modular designs," said Paul Otellini, Intel's vice president and general manager of the Microprocessor Products Group.

     The new PCs come with Dell's comprehensive service and support, and are eligible for Critical CareSM, a four-hour, on-site service response capability available in 17 major U.S. metropolitan areas beginning March 30.

     An entry-level Dell System 486P/50 with 4-megabytes (MB) of system memory, a 100MB hard drive, one diskette drive and a VGA Color Plus monitor is priced at $2,799.  A similarly configured Dell System 486D/50, which provides additional expansion capability beyond the P- model, is priced at $3,179.

     The desktop PowerLine 450DE/2 and the floor-standing PowerLine 450SE/2, which employ advanced-performance, 32-bit Extended Industry Standard Architecture (EISA) designs, are priced starting at $4,599 and $6,599, respectively, for models with 4MB of system memory, a 230MB hard drive, one diskette drive and a VGA Color Plus monitor. All four of these systems include Dell's programmable Flash EPROM BIOS, which enables customers to upgrade the system BIOS easily by loading a diskette.

     The PowerLine DE product family delivers state-of-the-art EISA workstation power for professional and technical users who demand the maximum processing capability on a desktop.  The floor-standing PowerLine SE family is designed for demanding multi-user applications requiring high processor performance, upgradeability and Intel compatibility for today's and tomorrow's processing requirements.

     Dell will support the 66-MHz Intel486 DX2 product when it becomes available.

     Dell said its 50- and 66-MHz DX2 PowerLine systems will soon be available with a powerful processor-direct graphics capability developed jointly by Dell and Intel.  The graphics subsystem, demonstrated by Dell last fall, for the first time harnesses the power of the 486 microprocessor to provide high-resolution, workstation- quality graphics without the need for a costly, specialized graphics co-processor card.

     Dell Computer Corporation designs, develops, manufactures, markets, services and supports a complete line of personal computers compatible with industry standards.  Dell pioneered the direct marketing of personal computers in 1984 and was the first company in the PC industry to offer manufacturer-direct technical support. Information on the company and its products can be obtained through its toll-free number: 1-800-BUY-DELL (1-800-289-3355).

Dell Computer Corp.

9505 Arboretum Blvd

Austin, TX 78759-7299

1-800-426-5150


ISS Contact Manager System
ISS announces NEW version of Contact Manager System written in FoxPro 2.0 with low cost  license agreements for VARs and end users!

Integrated System Solutions, Inc., a 5 year old VAR and software development company based  just outside of Chicago, has released version 2.0 of the Contact Manager System.  CMS v2.0 has  a completely new, easy to operate user interface, and now takes advantage of the speed and  power of FoxPro 2.0 when querying or browsing contact information by using SQL SELECT  statements and RUSHMORE OPTIMIZATION.  In addition to the mail label, telemarketing, to  do list, note pad, appointment, group calendar and Email options, an EXPENSE TRACKING  and QUOTE option have been added to round out the contact management and productivity  capabilities of the system.  A powerful feature that has been added is the ability to attach to  external, dBase type databases from within CMS v2.0!  This gives you the ability to import,  export and use the information already contained in an end user's customer, vendor, or inventory  file without having to rekey or duplicate the contents of the entire file!

Other time saving and user friendly features include searching for contacts by last name, phone  number, company name, company code or zip-code, a one keystroke history lookup, complete  form letter mail merge capabilities, phone dialer, online context sensitive help, calculator,  validation windows and popups, user defined fields, a complete US zip code table and more!

ISS sells a full function Personal Version of CMS v2.0 that stores 95 contacts for $95.  The  Professional Version has unlimited storage and sells for $295.  The Source Code Version sells  for $995.  VARs that purchase source code can sell compiled versions of CMS to their local  client base ROYALTY FREE!  End users that purchase source code get a company wide site  license!  All versions are NETWORK READY making CMS v2.0 one of the most cost effective  software packages available.  A free demo is also available.

Integrated System Solutions, Inc.,

20180 Governors Highway, Olympia Fields, IL., 60461

1-708-748-3333.


SPA 1992 Industry Honors
March 20, 1992 (Seattle, WA) - After 6 months of suspense and campaigning, the Software Publishers Association (SPA) last night announced the winners of their 1991 SPA Excellence in Software Awards. Over 330 products were nominated for the 23 industry awards recognizing outstanding PC software products introduced in 1991. The top computer programs were nominated and chosen by the software publishing community itself, truly making the Awards "the Oscars of the personal computer software world."

"While no one product or company 'swept' this year's Awards, the winners' circle reflects an industry that is maturing and consistently releasing innovative and sophisticated products," said Ken Wasch, Executive Director of the SPA.

Five products were winners in multiple categories, including Quicken 5.0 by Intuit (Best Business Application: Numeric or Data and Best Personal Productivity/Creativity Program); SimAnt by Maxis (Best Educational Tool and Best Simulation Program); Sid Meier's Civilization by MicroProse Software, Inc. (Best Entertainment Program [tie] and Best Strategy Program); Kid Pix by Br0derbund Software, Inc. (Best Early Education Program and Best User Interface); and Lemmings by Psygnosis, Ltd. (Best Entertainment Program [tie] and Best Action/Arcade Program).

In addition, five companies received honors for multiple products, including Apple Computer, Inc., for Macintosh System Software 7.0 (Best New Business Software Product [tie]) and QuickTime (Best New Use of a Computer); Borland International, Inc., for ObjectVision 2.0 for Windows (Best New Business Software Product [tied] and Borland C++ and Applications Frameworks 3.0 (Best Programming Tool); Access Software, Inc., for Martian Memorandum (Best Fantasy Role-Playing/Adventure Program) and Links Championship Courses (Best Sports Program); Br0derbund Software, Inc., for Kid Pix (Best Early Education Program and Best User Interface) and Where in America's Past is Carmen Sandiego? (Best Home Learning Program); and Scholastic, Inc., for Bank Street Writer for the Macintosh (Best School Productivity/Creativity Program) and Interactive NOVA: The Miracle of Life (Best Secondary Education Program [tied].

Critics' Choice Awards, selected by members of the press, were presented for Best Business Program, Best Consumer Program, and Best Education Program. Microsoft Visual Basic 1.0 won the Critics' Choice Award for Best Business Program. There were ties for both the Critics' Choice Awards for Best Consumer Program and for Best Education Program. Secret Weapons of the Luftwaffe by Lucasfilm Games and Sid Meier's Civilization by MicroProse tied for the Critic's Choice Award for Best Consumer Program; and Key Curriculum Press' The Geometer's Sketchpad and Scholastic Inc.'s Interactive NOVA: The Miracle of Life both captured the Critics' Choice Award for Best Education Program.

Comedian Jon Lovitz presided over the black-tie ceremony attended by over 1100 software industry executives. The evening was a highlight of the SPA's Annual Spring Symposium, held in Seattle. Lovitz regaled the crowd with many Saturday Night Live take-offs, often spoofing the software industry.

The Software Publishers Association is the principal trade association of the PC software industry. Its 900 members represent business, consumer, and education software firms around the world. The SPA has offices in Washington, DC, and Paris La Defense, France.

--------------------------------------------------------

1991 SPA Excellence in Software Awards

Business Software Awards

========================

Best New Business Software Product

Macintosh System Software 7.0

Apple Computer, Inc.

ObjectVision 2.0 for Windows

Borland International, Inc.

Best Business Application: Graphic or Display

The Far Side Computer Calendar

Amaze, Inc.

Best Business Application: Numeric or Data

Quicken 5.0

Intuit

Best Business Application: Word or Text

Microsoft Word for Windows 2.0

Microsoft Corporation

Best Programming Tool

Borland C++ and Applications Frameworks 3.0

Borland International, Inc.

Best Utility

Norton Desktop for Windows 1.0

Symantec Corporation/Peter Norton Group

Best Vertical Application

TurboTax for Windows

ChipSoft, Inc.

Consumer Software Awards

========================

Best Action/Arcade Program

Lemmings

Psygnosis Limited

Best Entertainment Program

Sid Meier's Civilization

MicroProse Software, Inc.

Lemmings

Psygnosis Limited

Best Fantasy Role Playing/Adventure Program

Martian Memorandum

Access Software, Inc.

Best Personal Productivity/Creativity Program

Quicken 5.0

Intuit

Best Simulation Program

SimAnt-The Electronic Ant Colony

Maxis

Best Sports Program

Links Championship Courses

Access Software, Inc.

Best Strategy Program

Sid Meier's Civilization

MicroProse Software, Inc.

Education Software Awards

=========================

Best Early Education Program

Kid Pix

Broderbund Software, Inc.

Best Elementary Education Program

Reader Rabbit 2

The Learning Company

Best Home Learning Program

Where in America's Past is Carmen Sandiego?

Broderbund Software, Inc.

Best School Productivity/Creativity Program

The Bank Street Writer for the Macintosh

Scholastic, Inc.

Best Secondary Education Program

What's My Angle?

Davidson & Associates

Interactive NOVA: The Miracle of Life

Scholastic, Inc.

Best Special Needs Program

Talking Typequick for the Blind

TypeQuick Pty, Ltd.

Best Education Tool Program

SimAnt- The Electronic Ant Colony

Maxis

General Software Awards

=======================

Best New Use of a Computer

QuickTime

Apple Computer, Inc.

Best User Interface of a New Program

Kid Pix

Br0derbund Software, Inc.

Critics' Choice Awards Winners

==============================

Best Business Program

Microsoft Visual Basic 1.0

Microsoft Corporation

Best Consumer Program

Secret Weapons of the Luftwaffe

Lucasfilm Games

Sid Meier's Civilization

MicroProse

Best Education Program

The Geometer's Sketchpad

The Curriculum Press

Interactive NOVA: The Miracle of Life

Scholastic, Inc.

--------------------------------------------------------

March 20, 1992 (Seattle, WA)- The SPA (Software Publishers Association) yesterday recognized four journalists for their outstanding work. The awards were presented at the annual SPA Excellence in Software Awards ceremony to honor those individuals who cover the PC software industry in an accurate and insightful manner. Journalists honored included: Keith Ferrell and Jim Seymour, Best Industry Analysis Editorial; Dan Muse, Best Software Reviewer, Nancy Trespasz, Best News Reporting.

Members of SPA's Marketing and PR Special Interest Groups nominated and selected the recipients. Past winners have included such well-known journalists as Peter Lewis, Johnny Wilson, Jeff Tarter, Lonnie Brown, Larry Magid, Michael Rodgers, Stewart Alsop, and Michael Miller. Keith Farrell, one of this year's recipients, is also among the list of past honorees.

Dan Muse, Editor-in-Chief of inCider/A+ and PC Games, was recognized as Best Software Reviewer, a category that honors the writer who most consistently presents accurate, fair and thorough representations of software products in their reviews published in industry or non-industry publications. With over ten years experience in computer journalism, Muse's recent focus has been on the Macintosh and Apple II platforms, as well as computer entertainment software.

The second Journalism Recognition Awards was presented for Best Industry Analyst/Editorial, which honors the analyst who most consistently presents insightful and articulate reflections of the software industry's evolution in either editorial or industry trend analysis columns for the trade or general press. Two journalists were recognized in this category: Keith Ferrell, editor of Omni and Compute magazines, and Jim Seymour, columnist for PCMagazine, PCWeeks, PC Sources, MacUser, and others. Ferrell is a writer of wide-ranging interest and has penned diverse fiction and non-fiction works, including literary and historical biographies and thrillers. Jim Seymour is a recognized expert on the impact of technology in business. In addition to his widely read commentaries, Seymour is of considerable influence as a consultant to Fortune 500 companies.

The third Journalism Recognition Award was presented in the category of Best News Reporting to Nancy Trespasz, Deputy Managing Editor of Computer Retail Week. This category honors the journalist who best covers the industry's important issues in a timely, objective manner for either an industry trade publication, the general business press, or a technology column in a non-industry publication. Trespasz, who has been part of the CRW editorial team since the publication's launch, is a product-oriented news writer who specializes in software.

The Software Publishers Association is the principal trade association of the PC software industry. Its 900 members represent business, consumer, and education software firms around the world. The SPA has offices in Washington, DC, and Paris La Defense, France.

--------------------------------------------------------

March 20, 1992 (Seattle, WA)- Rear Admiral Grace Hopper received posthumously the Software Publishers Association (SPA) Lifetime Achievement award yesterday at the annual SPA Excellence in Software Awards ceremony. Admiral Hopper (1906-1992) was a legendary figure in the world of computer science. She made many important contributions to the development of modern computing systems, including co-inventing COBOL, a business programming language still in widespread use today.

A professor of mathematics, her work also led to the first practical compiler for computers. A compiler is a program that translates instructions written by a programmer into code that can be read directly by a computer. Admiral Hopper is also known for coining the term "bug," which is widely used to refer to software failures. The first bug was a real moth found inside the Mark I computer in 1945, which causes the system to malfunction.

Commenting on the award, SPA Executive Director Ken Wasch, said "Grace Hopper truly was a pioneer in the development of computer programming languages. During her lifetime, she contributed to expanding the use of computers in business and in school. The PC software industry is proud to recognize her remarkable contributions to our industry."

The prestigious SPA Lifetime Achievement Award is presented to an individual who has, during his or her lifetime, made outstanding contributions to the development and growth of the PC software industry. Past recipients of the Lifetime Achievement Award include Bill Gates of Microsoft Corp., Steve Jobs of NeXT, Alan Kay of Apple Computer, and Steve Wozniak, co-founder of Apple Computer. Individuals are nominated by members of the trade and general press, and the SPA membership selects the distinguished recipient of this award.

The Software Publishers Association is the principal trade association of the PC software industry. Its 900 members represent business, consumer, and education software firms around the world. The SPA has offices in Washington, DC, and Paris La Defense, France.


Gupta Enhances All Key Products
San Francisco, CA, March 23, 1992--Today at DB Expo, Gupta Technologies announced that it would release enhanced versions of all its key products, including Quest SQLWindows, SQLBases and SQLNetwork (see separate releases). Together, these products comprise The SQL System, a complete solution for customers moving to PC client-server solutions. Gupta's enhancements underscore the company's position as the leading provider of PC LAN-based graphical client-server solutions.

Gupta also announced the release of a brand-new 443-page book entitled "SQLWindows: Basic Programming Techniques and Strategies," and the recent certification of many new training partners across the country who are qualified to train corporate users in the use of SQLWindows (see separate release).

Umang P. Gupta, President and CEO of Gupta Technologies said: "Our many product announcements today drive home the fact that we are the only company providing customers with needed solutions, across the board, to install PC LAN-based graphical client-server and enterprise-wide applications. To install such applications, customers need tools, servers and gateways optimized for PC LANs. We supply all these products and grow and enhance them in order to meet the evolving needs of this new market."

Following are the key highlights of today's product announcements. See separate press releases for further details.

Quest 1.2--Quest, an end user tool for SQL data access, querying and reporting, can now connect to SQL Server, Oracle and OS/2 Database Manager, in addition to SQLBase and DB2, using the appropriate router and gateway software from Gupta. For personal programmers, Quest 1.2 has additional Dynamic Data Exchange (DDE) support, so that Quest "activities" can be accessed directly from within the macro programming languages of many popular applications--including Microsoft Word and Excel, Lotus 1-23 for Windows, Aldus PageMaker and Ami Pro. Quest 1.2 contains a single-user version of Gupta's SQLBase 5.0. Expected delivery: March 31.

SQLWindows 3.1--SQLWindows, Gupta's 4GL product for quickly and easily creating Microsoft Windows 3.0 applications, now includes a single-user version of SQLBase 5.0. SQLBase 5.0 has many enhanced features and recently began shipping for DOS, OS/2, UNIX and NetWare as a NetWare Loadable Module (NLM). Expected delivery: March 31.

SQLBase for Windows--A multitasking single-user version of Gupta's SQLBase Server 5.0 running under Windows. Aside from Gupta, no other vendor provides such a product. Users can now run multiple applications concurrently against SQLBase data contained locally on their own machine. Expected delivery: May 29.

SQLNetwork for DB2 3.0--SQLNetwork for DB2, Gupta's PC to mainframe connectivity software, has become a widely used solution within corporations for PC access to "live" DB2 data. Available in Q2 '92, SQLNetwork for DB2 3.0 includes three major elements:

SQLHost/DB2 3.0, a performance-enhanced version of Gupta's host software which provides a powerful interface between mainframe DB2 DBMSs and PC networks.

SQLHost/Application Services, a new component of SQLHost/DB2 which enables application programmers to write server applications that have access to all the data and functionality of an IBM mainframe.

SQLGateway/APPC for NetWare, an NLM version of Gupta's gateway software which enables PC LANs to communicate with IBM mainframes. This offering builds on the Gupta/Novell relationship by providing key Gupta product lines for the Novell environment. The new gateway supports the currently shipping version of NetWare for SAA from Novell and will support the next release as well.

--------------------------------------------------------

San Francisco, CA, March 23, 1992--Today at DB Expo, Gupta Technologies announced Quest 1.2, SQLWindows 3.1 and SQLBase 5.0 for Windows. Quest 1.2 and SQLWindows 3.1 are upgrades to Gupta's end-user and application development tools line, respectively, while SQLBase 5.0 for Windows is an entirely new Gupta product providing customers with a single-user, multi-tasking SQLBase 5.0 database engine running under Microsoft Windows.

Gupta also announced the Gupta Project Starter Kit and the SQLWindows Trial Pack, both unique product bundlings designed to make Gupta's complete PC client-server solution easy and appealing to use by newcomers to client-server technology, whether resellers or corporate sites.

Quest 1.2

Quest 1.2 is an enhanced version of Gupta's end-user SQL data access, query and reporting tool. This new version of Quest offers connectivity to SQLBase, DB2, Oracle, SQL Server and IBM OS/2 Database Manager. Quest 1.2 has additional programming capabilities for macro programmers, is fully compatible with SQLBase 5.0 and includes a single-user version of the SQLBase 5.0 engine.

Quest 1.2 also includes a new 40-page workbook written expressly for macro programmers. This workbook illustrates "real life" business solutions using Quest's new personal programming capabilities--demonstrating, for example, how a marketing assistant could easily merge tens of thousands of names and addresses from a minicomputer SQL database into a Microsoft Word form letter on the PC.

Enhanced Programmability -- Significant added capabilities in Quest 1.2 enable users to work transparently with Quest from within other Microsoft Windows applications that support Dynamic Data Exchange (DDE), the standard for exchanging information between Windows applications. Enhanced programmability enables Quest 1.2 to act as a "DDE Server," supporting any application that supports DDE commands. By including simple DDE commands in a macro script, a personal programmer can launch any Quest query or report activity directly from within a Windows application. The "behind the scenes" data access activity, implicit in accessing SQL data, is completely transparent to the end user. No knowledge of SQL is required and the user does not need to learn another macro or programming language.

Kevin Rickson, Quest product manager at Gupta, said: "This new functionality makes Quest 1.2 the ideal complement to the personal programmer's favorite Windows applications that require regular or occasional access to data stored in corporate SQL databases such as Oracle on a VAX or DB2 on a mainframe. Personal programming tools such as Microsoft Word, Excel and Visual Basic, Aldus PageMaker and Ami Pro can easily "call" saved Quest queries and reports -- without using the Quest interface. And with our broad connectivity to many different SQL engines, we continue to improve the attractiveness of Quest to corporate sites that are not currently using SQLBase as their back-end engine."

Quest for LANs 1.2--Quest for LANs, which includes five copies of Quest and a five-user SQLBase engine, has also been upgraded to version 1.2 to be compatible with SQLBase 5.0.

Quest Is an Award Winner--The editors of BYTE Magazine recently awarded Quest an "Award of Distinction" in their January 1992 issue. LAN Magazine's February 1992 "Product of the Year" issue named Quest the "SQL Query Tool of the Year."

Pricing and Availability -- Quest 1.2 has a list price of $595 and will be available March 31. Registered owners of Quest can upgrade to Quest 1.2 for $35 and should call 1-800-3884550 to place their upgrade orders. Quest for LANs 1.2 is priced at $2,495 and will be available March 31.

SQLWindows 3.1

SQLWindows 3.1 is an upgrade to SQLWindows 3.0. Its primary new feature is the inclusion of a single-user SQLBase 5.0 engine. The previous version contained a SQLBase 4.1 engine. SQLBase 5.0 has many enhanced features of special interest to application developers, including referential integrity. SQLWindows 3.1 is available in the following configurations:

* SQLWindows Developer's System -- includes the complete SQLWindows application development system and a single-user SQLBase 5.0 engine.

* SQLWindows Client-Server Starter System--Indudes SQLWindows 3.1, Quest 1.2 and a five-user SQLBase 5.0 for DOS.

Pricing and Availability--Beginning March 31, users can upgrade to the SQLWindows 3.1 Developer's System for $40 and the Client-Server Starter System for $70 by calling 800-388-4550. The Developer's System is priced at $1,595; the Client-Server Starter System at $2,495.

SQLBase 5.0 for Windows

SQLBase for Windows, a brand-new Gupta product, is a multitasking, single-user version of Gupta's SQLBase 5.0 database server running under Microsoft Windows. Gupta is the only vendor to offer a single-user SQL database server running under Windows. SQLBase 5.0 for Windows enables users to simultaneously run multiple applications that access SQLBase 5.0 data stored locally on their own machine.

Pamela Allen, SQLBase product manager at Gupta, said: "SQLBase 5.0 for Windows gives users a major productivity edge if they need access to data inside the Windows environment. It's a real Windows application, with true multitasking ability. This type of technology just isn't available from any other vendor."

Pricing and Availability--SQLBase 5.0 for Windows will be available on May 29 for $595.

Gupta Project Starter Kit

The Gupta Project Starter Kit is designed to provide everything a corporate site or reseller needs to get going quickly on a client-server project. It reflects Gupta's ongoing quest to make its complete solution for implementing PC-based graphical client-server applications appealing and easy-to-use by newcomers to the technology. The kit includes SQLWindows 3.1, Quest 1.2, a five-user SQLBase 5.0 Server, license subscription support, hotline support and Gupta's unique nine videotape SQLWindows training course. The Gupta Project Starter Kit is available for $4,999 beginning March 31.

SQLWindows Trial Pack

For the small developer or consultant who needs an easy, simple and low-cost way to learn about the benefits of SQLWindows, Gupta is releasing the SQLWindows Trial Pack. The SQLWindows Trial Pack includes a limited-capacity version of SQLWindows and Gupta's new 443-page book, "SQLWindows: Basic Programming Techniques and Strategies." The Trial Pack also includes a restricted SQLBase engine that is limited to a 1 MB database size. The SQLWindows Trial Pack will be available March 31 and is priced at an attractive $99.

--------------------------------------------------------

San Francisco, CA, March 23, 1992--Gupta Technologies today announced upgrades to its entire SQLNetwork family of connectivity software. The primary announcement is Version 3.0 of SQLNetwork for DB2, a significantly enhanced version of the Gupta connectivity products which enable LAN-based client PCs to access corporate data on IBM mainframes. SQLNetwork for DB2 3.0 includes three major elements:

* SQLHost/DB2 3.0--A performance-enhanced version of Gupta's host software which provides a powerful interface between mainframe DB2 DBMSs and PC networks. Currently in use in hundreds of successful production applications worldwide, SQLHost/DB2 is now robust enough for use with literally thousands of connecting client workstations.

* SQLHost/Application Services--A new component of SQLHost/DB2 enabling application programmers to write server applications which have access to all the data and functionality of an IBM mainframe. Benefits to users include improved performance for client-server applications that access mainframe data; mainframe-level security and control for such applications; and the ability to access non-SQL "legacy" data on the mainframe.

* SQLGateway/APPC for NefWare--An NLM version of Gupta's gateway software which enables PC LANs to communicate with IBM mainframes. For the many organizations which have standardized on the Novell networking environment, this product offers the ability to access mainframe data from their NetWare LANs. SQLGateway/APPC for NetWare requires Novell's NetWare for SAA software.

About SQLNetwork

Gupta's SQLNetwork product family enables PC applications to transparently access SQL data on mainframes and minicomputers beyond the LAN. Its component products include SQLHost for DB2, which provides an interface between DB2 and a PC network; SQLGateways, which enable communication from a PC LAN to a minicomputer or mainframe DBMS; and SQLRouters, which connect individual client PCs to network protocols and SQL DBMSs.

Ron Wolf, director of Product Management at Gupta, said: "With the addition of SQLHost/Application Services to the SQLNetwork product family, Gupta has expanded its horizons to offer access to the full range of IBM mainframe capabilities. This announcement further solidifies Gupta's commitment to SAA and interoperability with other database environments."

Gupta Upgrades Other SQLNetwork Products

Gupta also announced a blanket upgrade of its other SQLNetwork software to Version 2.0. All of Gupta's connectivity products are now fully interoperable with SQLBase Version 5.0, the latest version of Gupta's high-performance database server for PC networks in DOS, OS/2, UNIX and NetWare environments.

Pricing and Availability

SQLNetwork for DB2 3.0 will be available from Gupta in Q2, '92. Gupta will bundle SQLHost/Application Services with SQLHost/DB2 3.0 at no increase in current SQLHost/DB2 prices. SQLGateway/APPC for NetWare is priced at $4,995

Pricing of other SQLNetwork products will not be affected by the blanket upgrade. Upgraded products include:

- SQLGateway/Oracle (OS/2)

- SQLGateway/Database Manager

- SQLRouter/Oracle (DOS)

- SQLRouter/SQL Server (DOS)

--------------------------------------------------------

San Francisco, CA, March 23, 1992--Gupta Technologies has embarked on a program to provide solid training tools and trainers nationwide for users of SQLWindows, Gupta's graphical application development program for SQL databases. SQLWindows is the leading application development software for quickly and easily creating Microsoft Windows applications that run in client-server environments.

Gupta recently certified ten companies that have demonstrated expertise in SQLWindows programming and instruction as Gupta Certified Training Partners, thus expanding the range of training services available to end users. Gupta has also introduced a video training tool, "SQLWindows Programming," that effectively combines video and computer technology to create a dynamic, easy-to-follow instructional video.

A new book, also available from Gupta, promises to quickly and easily acquaint new SQLWindows users, as well as veteran programmers, with the many powerful features of SQLWindows 3.0. "SQLWindows: Basic Programming Techniques and Strategies," by William Gietz, has a retail price of $39.95, and is available by calling 1-800-388-4550. It provides programming techniques, strategies, tips and tricks to help users quickly become productive using SQLWindows 3.0.

Gupta Certified Training Partners

With an increasing emphasis on providing improved service and support for its products, Gupta is expanding the number of training classes it can offer and making them more easily available by qualifying proven SQLWindows experts as Training Partners. "With the rigorous qualifications we have set for our Training Partners, users can be assured that they are getting the same quality of instruction as if they had come to classes at Gupta headquarters," said Steve Fowler, Director of Technical Services at Gupta.

Training Partners will provide scheduled training sessions at their locations, as well as onsite training at customer sites.

Qualifications--In order to qualify and be certified as a Gupta Training Partner, prospective trainers must meet the following criteria:

* Attend an in-house training class at Gupta Technologies

* Demonstrate their proficiency with SQLWindows by writing

  code which is reviewed by Gupta technical staff

* Co-teach a five-day customer class with Gupta trainers

* Provide a classroom environment at their company location

* Teach from materials provided by Gupta

Gupta will ensure that its Training Partners are up-to-date on new products and provide them with new training materials.

The Training Partners--All of the currently authorized Certified Training Partners are also Gupta value-added resellers or value-added distributors, though this is not a requirement for becoming a Training Partner. Certified Training Partners include:

* American Management Systems, Arlington, Virginia

* Fourth Generation Technology, Inc., LaJolla, California

* Grant Thomton, St. Louis, Missouri

* IG Systems, Inc., Carlsbad, California

* Infinity Systems Corp., Glastonbury, Connecticut

* interAccess Corp., Totowa, New Jersey

* Joseph McCall & Co., Atlanta, Georgia

* Linc Systems Corp., Bloomfield, Connecticut

* Logical Software Solutions Corp., Greenbelt, Maryland

* Ximicon Corp., Manhattan Beach, California

About Gupta Technologies Gupta Technologies, the technology and market leader in the PC-LAN DBMS business, builds graphical end-user and application development tools (Quest and SQLWindows), database servers (SQLBase Server) and connectivity software (SQLRouter, SQLGateway, SQLHost) to run on PC LANs in client-server and cooperative processing environments. Novell, the networking industry leader, holds a 19 percent interest in Gupta.

Gupta Technologies Inc

1040 Marsh Rd, Menlo Park, CA 94025

415-321-9500, fax 415-321-5471


JetLAN/P Printer Network Adapter
SUNNYVALE, CA, (March 30, 1992) - ASP Computer Products, Inc., the number one name in hassle-free printer sharing and printer enhancement products, today announced the JetLAN/P, a low-cost, pocket-sized network adapter that allows any printer with a standard parallel connection to be connected anywhere on a twisted-pair (10BaseT) or thin-wire (10Base2, coax) Ethernet network running NetWare. The product was previewed at Cebit in Hannover, Germany, and will have its debut at COMDEX Spring in Chicago, Illinois on April 6, 1992.

JetLAN/P lets you plug any printer directly into your network...anywhere!

The majority of printers on LANs are connected directly to the file server. Typically, this is an inconvenient location: printers are either located away from the people who use them, or network security is compromised by placing file servers m an unsecured location. With JetLAN/P, it's no longer necessary for the LaserJet to be connected to the file server; the printer can now be located near network users, and file servers can be placed in restricted-access locations to ensure network security.

JetLAN/P eliminates the need for dedicating an expensive PC as a print server. You simply place the JetLAN/P on the parallel port of the printer, and then connect it to the existing cabling anywhere on an Ethernet LAN, using standard network connections to plug into the network the same way you'd plug in an additional PC.

The JetLAN/P installs quickly and easily using Novell PConsole. No additional VAP, NLM or other third-party software is required. It is NetWare-compatible, and works just like a dedicated print server, operating transparently and supporting PCL or Postscript languages. The JetLAN/P supports up to 40 print queues on up to 8 file servers, and is compatible with any NetWare-supported node.

ASP supplies additional utilities to provide functionality above and beyond NetWare's. ASP provides the network administrator with the ability to change the JetLAN/P network device name from the factory default to conform to network naming conventions. ASP also provides a reset utility that makes the JetLAN/P scan the network for configuration information when changes such as the addition of queues, servers or other extensions have been made. This eliminates the need to take the unit off and then back on-line to recognize changes to the network, as required by some competitive products on the market. In addition, ASP-supplied utilities allow the network administrator to list the status of the JetLAN/P and the printer to which it is attached, and list the status of all JetLANs on the network.

JetLAN/P Speeds Up LAN Printing

Unlike slow, software-based LAN printing solutions, the ASP JetLAN/P does not require resources on a user's PC. Software-based solutions degrade the host PC's performance and sometimes lock it up until printing is completed.

Instead, the JetLAN/P enhances LAN performance. Print *obs are transferred from the server to the JetLAN/P in large blocks, at network speeds, reducing the load on the server and the network and improving printing speed for both graphics and complex documents. And because the compact JetLAN/P plugs directly into the printer and the existing network cabling, there are no individual PC-to-printer cables or bulky external boxes to clutter the office. System security is enhanced because there's no keyboard or monitor for access to the network.

ASP manufactures the JetLAN/P in two models: the JLP100, which has a BNC connection and supports thin-wire (10Base2) configurations, and the JLP200, with an RJ45 connection to support twisted-pair (10BaseT) configurations. Both models come with LED indicators to provide information on communication activity and connection integrity to assist with LAN diagnostic activities. The JLP100 and JLP200 retail for $595.

The JetLAN/P is the newest addition to the ASP JetLAN print server family. Other JetLAN printer server products include the JetLAN, JetLAN Canon, and JetLAN Brother, internal print server cards for the HP LaserJet, Canon, and Brother laser printers respectively. All JetLAN print servers are fully Netware-compatible and can be used in any combination on an Ethernet LAN running NetWare.

ASP Computer Products, Inc. manufactures and markets a full range of hassle-free workgroup solutions. ASP provides both network-based and network independent printer-sharing options to enable users to choose a printer-sharing solution tailored to their needs. Other connectivity products in the ASP line include the popular ServerJet, JetWay, Port Authority and SNAP peripheral sharing devices. The company is headquartered in Sunnyvale, California.

For more information on the JetLAN, contact ASP at 1-800-9LAN-ASP (1-800-952-6277), or fax ASP at 408-746-2803.

ASP Computer Products Inc

160 San Gabriel Dr, Sunnyvale, CA 94086

408-746-2965


CNC Easytalk Multi-Port Machine Ctl
CNC Innovations, Inc. has introduced EASYTALK MULTI-PORT featuring PC based DNC operations for up to 64 machine controls, machine control activated remote operations, simultaneous full screen editing, and 32 character file naming conventions. EASYTALK MULTIPORT is the latest product in the EASYTALK series of DNC solutions ranging from portable systems and tape replacement products to Multi-Tasking DNC host systems with LAN integration facilities.

EASYTALK MULTI-PORT utilizes the output abilities of a machine control to invoke program download/upload operations. This approach eliminates the expense of separate shop floor terminals and increases operator efficiency by eliminating the need for an operator to walk back and forth to the host or a remote terminal. The built-in File Handler allows the user to select files either by DOS name or by extended 32 character name. All functions, including the NC specific editor, system configuration, and system administration, may be accessed concurrently with the DNC operations.

Each port on the system may be independently configured for either RS232 or RS422 signal protocol. For older controls, CNC Innovations, Inc. offers a full line of tape emulation products to allow the controls to be linked into the MULTI-PORT system. EASYTALK MULTI-PORT may be connected to most local area networks including those running under UNIX and VAX as well as DOS.

Call 203 741 8567 or fax 203 253 9370 for more information.


Kristal Clear Monitor Filters
Sunnyvale, CA - March 30, 1992 - Sunflex, the world's leading supplier of computer monitor filters and the only filter supplier to offer a complete line of glass, MicroMesh, and metalized MicroMesh filters, today introduced eight new models in its line of Kristal Clear glass filters. The company will sell the filters worldwide through its direct-to-dealer sales force.

Sunflex now offers six product-specific glass filters designed for Macintosh portrait monitors and RGB monitors, for NEC multisync monitors and for all three IBM PS/2 computer monitors.

In addition, Sunflex has added two additional frame sizes, 15/16-inch and 19-inch, to its line of 14-inch universal glass filters. Sunflex universal glass filters are designed to aesthetically enhance the appearance of the monitor and are easily mounted externally on the CRT face. The filters feature a hinged frame which provides vertical and horizontal adjustment to fit 95%-plus of the 12 -19-inch monitors on the market today. The front inner edge of the filter frame is chamfered for easy edge-to-edge glass cleaning.

"Our new product-specific Kristal Clear glass filters are designed for the most popular monitors on the market. They complement the wide range of applications and monitors covered by our universal glass, MicroMesh and metalized MicroMesh security filters," said Sandy Graham, president of Sunflex. "With a total of 2,500 different filter versions, all at reasonable prices, we have a Sunflex filter to suit every need."

Kristal Clear glass filters are designed to increase computer user productivity through the reduction of glare, static and lowered emissions for a wide range of monitor types. Sunflex glass filters are offered with high or low contrast levels. The contrast level, determined by the amount of light transmission (31% transmission for high contrast and 62% transmission for low contrast is designed to accommodate the user's personal viewing preference.

Sunflex also offers three coatings for Kristal Clear glass filters: anti-reflective, anti-static conductive and low ohm conductive. The low ohm glass filters, featuring the lowest ohm rating of any glass filter on the market, provide maximum radiation attenuation and are equivalent in radiating shielding capability to Sunflex's metalized MicroMesh security filter.

Available immediately, Kristal Clear filters are available for under $120.00. Cleaning fluid and non-abrasive polishing cloth are shipped with the filter in a protective package.

Sunflex recently shipped its ten millionth filter from the broadest line of CRT filters in the industry. Since its establishment 14 years ago, Sunflex has shipped computer monitor filters to over 50 countries from a product line that includes over 2500 frame sizes, with filters sizes ranging from two inches to 18 feet.

Sunflex filters are designed for every computer application from word processing and high resolution computer-aided design to the most stringent defense usage, and provide an inexpensive solution for the increased productivity, security and health requirements of the computer monitor user community. Users benefit from Sunflex filters as they experience greatly reduced eyestrain and fatigue and produce data with fewer errors, improving productivity and final output quality.

Sunflex pioneered the development of behind-the-bezel MicroMesh filters that conform exactly to the shape of the monitor screen. These patented filters are easily installed and provide superior optical characteristics without degrading the appearance or aesthetics of the monitor itself. In addition, Sunflex MicroMesh filters are inexpensive, exhibit long product life, and require no cleaning.

Sunflex was founded in 1978 and purchased by Xidex Corp. in 1984, which was itself purchased in 1988 by Anacomp, Inc., Atlanta, Georgia. Earlier this year, Eric S. Hass and Stanley E. Graham led a group of private investors which purchased Sunflex from Anacomp. Both Hass and Graham are former executives of Xidex/Anacomp, and each had previously held the position of president of Sunflex. The company's address is 745 N. Pastoria Avenue, Sunnyvale, CA 94086, telephone 408/522-8850, facsimile 408/522-8840.


Ready-to-Run Accounting from Intex
(March 25, 1992) -- Needham. MA: Intex Solutions, Inc., the leading publisher and reseller of spreadsheet enhancements, today announced it has arranged with ManuSoft Corporation to publish Ready-To-Run Accounting. Ready-To-Run Accounting, the only full-featured integrated accounting package that operates entirely within Lotus 1-2-3, is designed specifically for small to medium-sized businesses. This popular add-on offers 1-2-3 users a powerful, yet easy-to-use system for professional accounting, for a fraction of the cost of most stand-alone systems. The complete system is priced at $199.95 plus shipping; individual modules may also be purchased for $89.95 each.

The new upgrade of Ready-To-Run Accounting ($45) brings full support to all of Lotus' newest releases, among other new features.

"This is the only accounting product of its kind available for Lotus 1-2-3 users," said Marjorie Smith, Product Manager at Intex. "Because Ready-To-Run Accounting is completely menu-driven, even a 1-2-3 novice can begin using the program right away. For the experienced user, the program offers a lot of flexibility. Report formulas can be customized, data can be easily accessed in spreadsheet form, and even the program macros can be adjusted for a users' particular needs," said Smith.

Under the arrangement, between Intex and ManuSoft, Intex will manufacture, sell and support the product, while ManuSoft will continue to enhance the product with new features. Users will therefore enjoy the highest level of service, and an increased responsiveness to product upgrades.

As a truly integrated accounting package, Ready-To-Run Accounting offers a series of interrelated modules, as described below. Changes to one module are automatically carried forward to the others:

* General Ledger: Fully adjustable chart of accounts; up to 1000 accounts; 13 periods for year-end adjustments; multiple postings. Reports: trial balance, journals, general ledger, balance sheet, and P & L.

* Payable/Receivable: Automatic invoice and check-printing; database for 1,000 suppliers and customers; on-screen customer sales and aging; job cost analysis. Reports: Cash/check registers, transaction journals, open-aging, purchase journals, job-costing, and monthly statements.

* Billing: Produces multiple-line item invoices that can be customized for your business; automatically updates accounts receivable, inventory, and sales files; includes separate "bill-to" and "ship-ton; allows back-orders.

* Inventory: Supports LIFO, FIFO, Average Cost or Specific Identification accounting; handles up to 1,000 items; fast search/sort. Reports: inventory listing, purchase analysis, daily transaction journal, and reorder report.

* Order Entry: Handles up to 30 items per invoice. Calculates sales tax. Automatic calculations of UPS or postal zone. Invoice details include: bill-to/ship-to addresses, customer purchase order number, shipping instructions, terms, date, invoice number, quantity ordered, shipped, back ordered, retail price and discount, and net amount.

* Payroll: Handles over 100 employees. Prints checks, W-2s and 1099s. Handles salaried, hourly and commissioned workers. Handles overtime, pays, tips and bonuses. Allows bi-weekly, semi-monthly, or monthly pay periods. Tracks year-to-date & period totals. Includes current Federal tax tables. Up to 6 different taxable or non-taxable deductions. Supports 401K & other pension plans. Reports: Employee roster; detailed earnings, check register, job costing report.

Ready-To-Run Accounting also features an optional Financial Analysis Module. This module offers various cash flow, financial diagnostics, impact analysis and summary reporting to help users better grasp the overall fiscal health and well-being of their company.

Intex Offers New Upgraded Features

The upgrade now fully supports Lotus 1-2-3 Release 2.3, 3, and 3.1. Other new features include an enhanced laser printer support including laser Accounts Payable and Payroll checks and W-2s. The Accounts Payable check-writing feature can now handle up to 14 cash transactions per check. The current version of Ready-To-Run Accounting is 2.12.

Intex Provides Spreadsheet Users With "One-Stop" Shopping

By adding Ready-To-Run Accounting to its list of exclusive products, Intex again expands the breadth of its offerings to all spreadsheet users. Intex is the leading publisher and reseller of spreadsheet enhancement products. Some of Intex's other titles - now in excess of 50 - include Rescue Plus, Beyond 640, Spellin!, Forecast!, Forms-To-Go!, UltraGraphics and many others.

System Requirements

Ready-To-Run Accounting runs with Lotus 1-2-3 Release lA, 2.0, 2.01, 2.2, 2.3, 3.0, 3.1, 3.1 +, SuperCalc and 1-2-3 for Sun. The program requires a minimum of 120K RAM in addition to normal 1-2-3 requirements.

The complete Ready-To-Run Accounting system is priced at $199.95. An Executive Version, which adds a Financial Analysis Module is available for $299.95. Single modules (such as General Ledger or Accounts Payable) may be purchased for $89.95, and Financial Analysis Module by itself is available for $149.95. Registered users may upgrade for $45. To order or upgrade, users should contact Intex Solutions, Inc., 35 Highland Circle, Needham, MA 02194.


DPT SCSI Performance Package
March 30, 1992 -- Maitland, Florida - Distributed Processing Technology (DPT), the first company to develop a caching disk controller for the PC, has just introduced a new SCSI Performance Package to be included with all of its "cache-convertible" SmartCache Plus SCSI controllers. Innovative firmware and software design improvements have produced outstanding performance benchmark results in both caching and non-caching environments. With these refinements DPT sets another milestone in SCSI peripheral performance.

"We're very excited about the performance numbers we've seen thus far," says Steven Paulhus, product marketing analyst at DPT. "We have achieved price/performance superiority in all major operating environments with both caching and non-caching controller configurations." According to Paulhus, SmartCache Plus EISA performs many Netware and Unix benchmark tests two to three times faster than the competition.

The new firmware and software that make up the SCSI Performance Package are now shipping with all DPT SmartCache Plus controllers. SmartCache Plus is a cache-convertible SCSI adapter. Both 32-bit EISA and 16-bit ISA models are available. As a non-caching SCSI adapter, SmartCache Plus provides superior performance at an entry level price. With the addition of the caching module and as much as 16 megabytes of cache RAM, the controller provides the performance required for large file servers and multiuser systems. The SCSI disk mirroring module, a hardware based implementation of RAID 1 technology, can also be added to the controller to satisfy the business user's need for disk fault tolerance.

The SCSI Performance Package is included with all SmartCache Plus ISA and EISA controllers at no additional cost and is shipping to both domestic and international markets. U.S. list prices for SmartCache Plus are $785 for the EISA model and $595 for the ISA model. Suggested international list prices start at $940 for the EISA model and $710 for the ISA model. The controllers are shipped with a SCSI cable and device drivers for Novell Netware, SCO and Interactive UNIX and OS/2.

DPT manufactures intelligent peripheral controllers for mini- and microcomputer markets. DPT is a private company founded in 1977. Corporate headquarters are near Orlando, Florida with a sales and marketing office in London, England. DPT is the first company to produce a caching disk controller and is the leader in high performance peripheral controller technology. DPT controllers are sold worldwide through a network of distributors and OEMs.

Distributed Processing Technology

140 Candace Dr, Maitland, FL 32751

407-830-5522


Trantor Lowers T338 MiniSCSI
FREMONT, CALIF. April 1, 1992 -- Trantor Systems, a leading SCSI hardware and software manufacturer, has reduced the price of its model T338 MiniSCSI - the world's first parallel port SCSI host adapter. Effective today, the manufacturer's suggested retail price is US$159.00, a $20 reduction from the previous price of $179.00.

Introduced at COMDEX Fall '90, the MiniSCSI has successfully led the market, enabling connections never before possible, such as portable CD-ROM applications on notebook and laptop computers, which typically lack expansion slots needed for conventional SCSI adapters. Other SCSI devices, such as hard drives, magneto-optical drives, SyQuest and Bernoulli removable-media products, floptical drives and SCSI floppy drives are also supported with the included software drivers. Trantor's Tape Mate software ($59.00 List price) is also available for SCSI tape drives.

"The MiniSCSI has been phenomenally successful for us, "said Jim Switz, Trantor's Sales and Marketing Manager "and as a result of continually growing sales of the product we've been able to reduce our manufacturing costs. To spur even greater market penetration we're passing on these savings to our resellers. "

The MiniSCSI has earned considerable recognition since its introduction, including selection by Jim Seymour as one of the a Best 'Little' Products of 1991" (PC Week, Dec. 23, '91) and a "User's Choice Award" from Jerry Pournelle in the April '92 issue of Byte magazine.

Trantor's product line also includes the T100 ($89), T128 ($ 159) and T128F ($229) ISA Host Adapters and the T228 ($249) for Micro Channel computers, as well as a full line of other cost-effective, high-quality SCSI products, including internal laptop Host Adapters, Music Box audio control software for CD-ROMs, Macintosh CD-ROM driver software and the P3C ASIC chip for parallel port peripheral designs. All hardware products include a 2-year parts-and-labor factory warranty. Trantor Systems, one of the original SCSI-design companies, has been creating and delivering quality hardware and software SCSI solutions for over 10 years, and supplies products to the IBM-compatible, laptop and Apple Macintosh markets.

Trantor Systems, Ltd.

5415 Randall Place, Fremont, CA 94538-3151

510-770-1400  fax 510-770-9910


Micro Express ME 486-50
MICRO EXPRESS DEBUTS THE ME 486-50... A WORKSTATION IN A COMPACT PC BODY

Santa Ana, CA..Joining the move to higher and higher performance in a compact PC case is the 50-MHz Micro Express ME 486-50. This machine truly blurs the distinction between a personal computer and a workstation. In its basic configuration, the ME 486-50 comes with 4MB of RAM, a 200-MB fast hard disk drive, a Hi-Color VGA card and monitor (displays up to 32,768 colors at a resolution of 800 x 600 pixels), both 3-1/2" and 5-1/4" high-density floppy disk drives, a mouse, DOS 5.0 and Windows 3.0. In its compact desktop case, this PC sells for $3395. If a tower case is preferred, the price increases by $600.

Based on the Intel i486-50 microprocessor chip, this system achieves superior speed through zero wait-state, page-mode interleaved memory performance and 256K of 20-ns RAM caching. The cache is second-level direct-mapped. System RAM is expandable to 32-MB on the motherboard, using 70-ns SIMMs. Using a memory-expansion board, system memory can be increased to 64 MB.

This speed-demon achieves a Norton SI rating of 78.8 and a Landmark 2.0 rating of 167/28 MHz. Power Meter 2.0 gives this computer a speed rating of 22.1 MIPS.

The advanced Phoenix BIOS, which is used, includes password protection. The BIOS offers selectable shadowing of both system and video BIOS. A CMOS clock-calendar, with battery back-up, is also included.

For workstation users, the ME 486-50 is fully functional under UNIX and OS/2, as well as DOS. Novell networking is also supported.

For expansion, the motherboard includes seven 16-bit full-length slots, plus one 16-bit/32-bit slot. A socket is included for a Weitek 4167 math coprocessor to be added, if required. One parallel and two serial ports are included as well.

For advanced graphic applications, the system includes the Micro Express Hi-Color Turbo VGA Card, which displays up to 32,768 colors, at a resolution of 800 x 600 pixels, or 256 colors, at a resolution of 1024 x 768 pixels. A high-performance 14-inch non-glare CRT monitor with an excellent dot pitch of 0.28 mm comes with the ME 486-50.

The ME 486-50 is packaged in a compact desktop case, measuring 6.5"[H] x 14.5"[W] x 16.5"[D], which includes 5 disk drive bays. Optional hard disk drives are available with up to 1.2-GB of capacity. If the tower case is selected, it can handle up to 8 disk drives in a very roomy enclosure. A choice of keyboards is offered with the ME 486-50, including both standard 101-type enhanced with or without audible feedback, and a keyboard with a built-in trackball mouse at no extra charge.

The Finest Available Customer Support

A full 2-year warranty is included on parts and labor for this PC, with shipping for the first 4 months paid both ways by Micro Express, as well as a 30-day moneyback guarantee is included. Optional on-site service, through TRW, is also available. If a board fails, Micro Express offers 24-hour express board replacement service. As with all other Micro Express computers, this machine is burned in for 72 hours before shipping to eliminate early failures. In addition, a toll-free number is provided for free unlimited technical support. Technical support is available 24-hours per day and 7-days per week as part of the exclusive Micro Express "Always" customer support program. When technical documents are required, Micro Express offers Automated FAX-back Service. Using this service documents can be requested through voice-mail and will be FAXed directly to the customer without human intervention.

The ME 486-50 is available now, direct from Micro Express.

Micro Express is an award-winning manufacturer of notebook, laptop, portable and desktop microcomputers that are fully IBM compatible. Micro Express offers extremely high quality and a wide range of additional features at a very competitive price. Micro Express personal computers are regularly rated at the top of comparative reviews in computer trade magazines, having won such honors as PC Magazine Editors' Choice, PC World Best Buy, Computer Buyer's Guide Best Buy, BYTE Magazine One-To-Watch, PC Week Analyst' s Choice and many others. The company also offers a selection of high-performance add-in peripheral boards.

Micro Express, 1801 Carnegie Ave., Santa Ana, CA 92705

(714) 852-1400 or (800) 989-9900.


KEAlink & KEAterm Comm Solutions
VANCOUVER, CANADA - KEA Systems Ltd. announces a new product in its KEAlink series. The series includes KEAlink LAT, KEAlink TCP/IP and KEAlink IPX, all of which run under MS-DOS or Windows. KEA's newest product, KEAlink NFS, will commence shipping this April.

KEAlink NFS is KEA's implementation of the TCP/IP and Network File System protocols allowing PCs on Ethernet or Token Ring networks seamless access to DOS applications and files on NFS servers. KEAlink is NDIS compliant which permits users to simultaneously link to NFS servers, NDIS compliant networks such as Microsoft LAN Manager and, with KEAlink IPX, Novell Netware. KEAlink NFS is compatible with MS-Windows thereby providing network access under Windows.

KEAlink TCP, licensed separately but also included in KEAlink NFS, is a PC implementation of the Transmission Control Protocol and Internet Protocol (TCP/IP). Used in conjunction with KEA's emulation products, KEAlink TCP provides a full multisession terminal emulation and TCP/IP networking solution for the PC.

KEAlink IPX provides a Netware to NDIS protocol conversion. Without losing any functionality provided by the Novell network, the user can use other protocols such as LAT or TCP/IP to connect to VAX or UNIX hosts. KEAlink IPX allows Novell's Netware to run concurrently with DEC's PATHWORKS version 4.0.

KEAlink LAT is KEA's licensed implementation of DEC's Local Area Transport protocol (LAT). It allows KEAterm or ZSTEM to connect to a VAX via Ethernet using the DEC LAT protocol without DECnet-DOS, PCSA, PATHWORKS, or a terminal server. When KEAlink LAT is used in conjunction with ZSTEM or KEAterm, multiple simultaneous sessions can be maintained.

All KEAlink products fully support NDIS. Therefore, they can be loaded together to provide concurrent access to their respective hosts or servers. The KEAlink IPX package also includes NDIS drivers for the Novell Ethernet cards. Most other manufacturers provide NDIS drivers with their Ethernet cards.

KEAlink network products are supported by KEA's VT terminal emulation software: ZSTEM 320 and ZSTEM 340 for DOS and KEAterm 420 for Windows.

--------------------------------------------------------

KEAterm 420, KEA's software emulation of DEC's VT 420 terminal, has all the VT 420's characteristics including multiple sessions, multiple pages, true double high/double wide characters and true 132 column support. Extensions include ISO and attribute mapped colors, VT340 block mode and local edit and user definable keyboard mapping. Like the VT420 terminal, KEAterm 420 is downwardly compatible, emulating the VT320, VT220, VT100, and VT52 terminals.

KEAterm 420 is a true, Windows-compatible product:

* KEAterm allows connection to multiple VAX or UNIX applications while running multiple PC applications at the same time, with each application being displayed in its own window.

* Data can be transfered between host and PC applications using copy and paste.

* KEAterm can be used as a DDE server to supply or accept data from other applications and accept script commands to execute from other applications; or as a DDE client to start and control other applications.

* Users choose from pull-down menus in English, French or German--a feature of particular benefit to multi-national companies.

Communication and integration features beyond VT emulation include:

* Multi-session NET/l(INT 6B) and INT14 interfaces; Telnet interfaces for TCP/IP including Wollongong and KEAlink; and Pathworks/LAT interface.

* Super Kermit and ASCII file transfer protocols.

* User-definable on-screen buttons to which a string of characters, VT function, or script can be attached.

* BASIC-like script language with debugger. The script language includes logical operations, variables, control structures, DDE support and reading and setting of configuration parameters. Users can automate login procedures and file transfer, and PC to host integration.

Registered users of KEAterm Version 1, the first VT420 emulation package for MS-Windows, are entitled to a free upgrade to Version 2 upon release.

--------------------------------------------------------

KEA Systems Ltd., a Canadian software development company founded in 1975, has been developing superior VT emulation products for over a decade. Today KEA markets a complete line of VT terminal emulation and network products for the PC, including KEAterm for Windows, ZSTEM 340/320 for MS-DOS and SCO UNIX, KEAlink network connection software, and the PowerStation VT layout keyboard for the PC.

KEA Systems Ltd. 3738 North Fraser Way, Unit 101 Burnaby, B.C. Canada VSJ SGl Telephone: (604) 431-0727 FAX: (604) 431-0818 Order Desk: 1-800-663-8702


Resource Library PD Color Pictures
Resource Library Volume I "A Collection of Public Domain Color Pictures and QuickTime Movies"

Comanche, Oklahoma--Resource Library Volume I is currently available and shipping.

Resource Library Volume I "A Collection of Public Domain Color Pictures and QuickTime Movies" compact disc is designed to provide over 550 full color video quality pictures and over 60 QuickTime movies without the worry of copyright infringement. The content materials are from sources including NASA and the U.S. Department of Agriculture and offer a variety of subjects. The contents are aimed at a general audience. Use them freely as you would any clip media by simply copying and pasting them into your favorite documents.

Subjects include: Animals, Environment, Farms & Ranches, People, Plants, Scenes, Space, Weather, Wild Caves

Resource Library Volume I is compatible with System 6.0.7, System 7, or higher, and requires a minimum configuration of 2MB Macintosh LC and any size hard drive. When using Resource Library with QuickTimer, System 7 and a color capable Macintosh with 4MB of memory is recommended. QuickTime is required to run movies and display QuickTime compressed pictures.

PRICING AND ORDERING INFORMATION:

Resource Library Volume I -- $49.95

Bliss Interactive Technologies

PO Box 88, Comanche, OK 73529

405-439-2247


Racal-Datacom Ethernet for OS/2
CHICAGO (April 6, 1992) -- Racal-Datacom, a leading international provider of data communications systems and services, announced here today at COMDEX that its network management systems and Ethernet network interface cards will support IBM's OS/2 2.0. Racal stated that it will continue to develop and market products which operate in IBM's OS/2 environment.

OS/2 2.0 is a 32-bit operating system for 386SX and higher PCs. In the area of network management, users will benefit from the ability to run three Racal systems on the same OS/2 2.0 platform: CMS (Communications Management Series) 400 element management system which provides integrated control over local area and wide area networks; SPAN/2 System Performance Analyzer, and CMSView/II, Racal's bi-directional interface to IBM's Netview.

Racal's Ethernet network interface card offerings which will support OS/2.0 include: the NI5210 8-bit XT adapter, the NI6510 16-bit ISA adapter, the NI9210 16-bit micro channel adapter, the NP600 intelligent ISA adapter, and the ES3210 32-bit EISA adapter. The recently released next generation InterLans Series AT 8/16 ISA adapters will also support the OS/2.0 environment.

Racal-Datacom offers solutions for the implementation, management and support of enterprise networks from the desktop through local area networks (LANs) and wide area networks (WANs). The company's worldwide revenues were $583 million for fiscal year 1991.

Racal Datacom Inc

1601 North Harrison Parkway

Sunrise, FL 33323-2899

305-846-1601


Resource Navigator II
Comanche, Oklahoma-Resource Navigator II, is scheduled to ship in late April 1992.

Create, edit, and playback multiple media types, including QuickTime movies, in your HyperCard stacks with no programming or scripting needed. Adding pictures, sounds, audio compact disc music, external videodisc sequences and Quicktime pictures and movies has never been easier. If you have a video/frame capture board, you can create your own QuickTime movies and use them in any QuickTime capable application.

By simply pointing and clicking you create Hypercard buttons which contain all the commands needed to access these different types of media. To add a Quicktime movie for example, you would select the window display type, choose various movie playback features, and then by selecting "create' Resource Navigator II automatically creates a HyperCard button which contains all of the commands needed to play back that QuickTime movie in your stack. At the same time you can also choose the option to add a copy of the information into the Resource Library stack for future use. If you wish to use that particular movie again in another stack you simply go to the library, choose the movie's name and click on Create Button. Resource Navigator II creates a button in your stack that contains all the commands to play back that movie just as before.

Included with Resource Navigator II are:

* Resource Navigator II- authoring tools to integrate various types of media, including QuickTime pictures and movies, into any HyperCard stack

* Presentation Management - set of tools to facilitate creation of presentation type stacks

* Presentation Ideas - set of presentation style templates to give the user some ideas to start with

* ClipScripts - a collection of both typical and common scripts the user can copy and paste into their stacks

Resource Navigator II is compatible with System 6.0.7, System 7, or higher, and requires a minimum configuration of 2MB Macintosh Classic or LC, any size hard drive and HyperCard 2.1. When using Resource Navigator II with QuickTime, System 7 and a color capable Macintosh with 4MB of memory is recommended. QuickTime IS required to run movies and display QuickTime compressed pictures.

PRICING AND ORDERING INFORMATION:

Resource Navigator II $99

Bliss Interactive Technologies

PO Box 88, Comanche, OK 73529

405-439-2247


ORIGIN Ultima VII: The Black Gate
ORIGIN Releases ULTIMA VII: The Black Gate

The ultimate battle between good and evil begins worldwide Easter weekend when Richard "Lord British" Garriott releases the long-awaited ULTIMA VII: The Black Gate. Ultima VII is the latest installment in the award-winning Ultima fantasy role-playing series and the first chapter of a new trilogy.

As with previous Ultimas, the "engine" for Ultima VII has been entirely redesigned and seasoned fans will recognize the changes immediately. For the first time, game play is full-screen; conversations with non-player characters and inventories pop up in a Windows-like style. Players with sound boards can enjoy a fully-orchestrated original score and those with Sound Blasters or 100% compatible cards will be able to take advantage of another Ultima first -- digitized speech.

The game's biggest innovation is its simple and intuitive mouse only interface. Players no longer have to memorize an array of keyboard commands. "All you have to do is think of one mouse button as your hands and the other as your feet, then you've mastered the interface," according to Ultima creator Richard Garriott. "With those two buttons, you have access to just about every command in the game."

While easy to play, Ultima VII is more technologically-advanced than ever. In true scale, Britannia covers more than 100 square miles and holds hundreds of objects the player can use, from weapons to sheep shears. The environment is so real that clouds roll in before a storm and crickets chirp in the woods at night. Dedicated players who manage to unlock the secret of the Black Gate will be treated to one of the most fascinating end-game sequences ever produced.

In ULTIMA VII The Black Gate, the Avatar is drawn back to Britannia by an ominous message from another dimension. He finds a wave of gruesome murders and unexplained social ills. At the center of it all: a malevolent entity known as the Guardian who actually "speaks" to Britannians telepathically. The Avatar must discover the Guardian's true intentions. Does he want to be Britannia's protector...or its ruler?

System Requirements for ULTIMA VII The Black Gate are:

* Computer: IBM: 386SX, 386, 486, PS/2 50+ and

  other 100% compatible PC systems

* Memory: 2MB required (560 required free in main RAM)

* Graphics: VGA/MCGA (256 color)

* Sound: Ad Lib, Roland MT-32/LAPC-1, CMS Soundblaster

* Other: Hard disk required (game size is 21MB),

  mouse highly recommended, DOS 3.3 or higher

* Interface: Mouse or keyboard

* Suggested retail price: $79.95

--------------------------------------------------------

ULTIMA VII: The Black Gate Casts Contest Winners in Starring Roles

April 5, 1992 -- Austin, TX--Fantasy role-playing takes on a new dimension with the upcoming release of ULTIMA VII The Black Gate from Austin-based ORIGIN Systems. Thirteen contest winners--and ardent Ultima players will actually appear as characters within the latest installment of the top-selling series.

Players of the 1990 release of Ultima VI were urged to submit character designs and pictures of themselves for consideration in Ultima VII. Ultima creator and ORIGIN co-founder Richard Garriott says this may be a first in entertainment software. "It is common for employees at a company to be included in a game," Garriott says, "but never before, to my knowledge, have any other fans been included to this degree. The winners will actually be able to see and talk with their alter egos."

Garriott says thousands of entries came in from around the world. Some winners were automatically chosen with a few, random, specially-marked rune stones included in Ultima VI packages. The rest of the characters were chosen by a "casting committee" comprised of Garriott and other members of the Ultima VII design team staff.

ORIGIN develops and publishes state-of the-art entertainment software for home computing and electronic game systems. See list for contest winners.

--------------------------------------------------------

Winners of ORIGIN's "You Can Star in Ultima VII Contest"

* Julie Shenton, a 25 year-old Administrative Assistant from Germantown, Maryland, will play a tavern wench. She says the wench should be "very flirtatious, with a sharp wit and famous throughout the land for her kisses."

* B. David Gladstone, a 21 year-old musician and artist from Vista, California, will be an artist in the guild. David says the first time he played Ultima VI, he lost track of time and played throughout the night. "I had to stop the next morning to go to work," he writes.

* Brad Neufeld is a 24 year-old self-described "hermit" from Fort McMurray in Alberta, Canada. Since Brad says he prefers "living in the bush away from people," he will play a hermit as well in Ultima VII.

* Ray Burton m and his dog, Regal, both won parts. Ray is a 23 year-old student in Roseville, California, and Regal is a collie/shepherd mix. Ray will play a trainer in Britannia.

* Lucy Sarvis of Sugarland, Texas, was thrilled to hear she would be playing a tavern wench. Lucy is a housewife who took up computer gaming at the age of 47. "Instead of having friends over to play cards and drink coffee, I have them come to play computer games," she writes.

* Three year-old Kristy Chamberlain of Ft. Lauderdale, Florida, obviously had some help filling out her application, since her only occupation was listed as "being cute." Kristy is typecast as a baby in Ultima VII--possibly nobility.

* Mark Davis, a 33 year-old chemical stock room supervisor from Richmond, Virginia, will play "Lord Heather," leader of a town. Mark is also an adventurer who enjoys rock climbing and white-water rafting.

* Greg Cato is a 14 year-old student from Freehold, New Jersey, who already knows three computer languages. Greg says another fantasy (as well as starring in an Ultima) is to help program future games.

* Jeffrey Abrams is a 46 year-old doctor from White Plains, Maryland. He writes that he's always been fascinated by the healing arts in earlier ULTIMAs, so he will play a healer in Ultima VII.

* Joe Johnston is a 20 year-old college student from West Haven, Connecticut. His fantasy is to be one of the most powerful people in Britannia, so he will appear as a town leader.

* Rich Zella is a 19 year-old student from Romeo, Michigan. His Ultima appetite is evident by the fact he finished Ultima VI in just eleven days after more than a hundred hours of play. Rich plays a trainer in Ultima VII.

* Jeff Niles is a 14 year-old student at Ball State University. His character design was that of a "totally reformed thief who has purged his deceitful ways," so Sir Jeff is a high court judge in Ultima VII.

* Kevin Stephens is a 14 year-old student from Boxborough, Massachusetts. His not-so-distant future includes attaining the rank of Eagle Scout. Kevin appears as Seara, a craftsman in Britannia.

--------------------------------------------------------

ORIGIN, 110 Wild Basin Rd, Suite 230, Austin, TX 78746

FAX (512) 328-3825 Telephone (512) 328-5490


Instructor's ToolBox
Comanche, Oklahoma--Instructor's ToolBox, two easy to use modules for classroom testing and presentation, is now shipping.

Instructor's ToolBox contains the Performance Measurement and Presentation Management modules which are designed to provide the educator with tools for exam generation and classroom presentation. Performance Measurement allows you to create and print exams. By simple pointing and clicking, you can choose what questions you want and install them into your exam. You can also include graphics in your exams which can come from a variety of sources. Features include; eight question types, ease of mixing graphics and text, easily editable, add your own questions and graphics, modify any existing questions and graphics, simple to use. Performance Measurement include a custom printing feature that allows you to print exams from within HyperCard and both TrueType and Postscript printing is supported. The Presentation Management module is designed for use during lectures and presentations, and as a source of graphics for exams. The size of the graphics are designed to be copied and pasted into Performance Measurement exams without any resizing or scaling. You can also add your own graphics or modify any existing ones in the modules. Features include; templates for customizing lecture stacks, graphics for exam without resizing or scaling, current time display either on or off, remember last graphic shown, simple to use.

Performance Measurement and Presentation Management are compatible with System 6.0.7 and System 7 and strictly adheres to Apple's development and interface guidelines for continued compatibility.

The package includes HyperCard 2.1 and Home stack, TrueType 1.0, Performance Measurement templates and example stacks, Presentation Management templates and example stacks, and User Manual (printed and as a stack). The two modules, Performance Measurement and Presentation Management may be purchased separately.

Performance Measurement and Presentation Management run on the Macintosh Classic, Portable, SE, LC and II models and requires HyperCard version 2.1. It also runs on earlier Macintosh models that are capable of running HyperCard 2.1.

PRICING AND ORDERING INFORMATION:

Instructor's ToolBox    -- $89.95

Performance Measurement -- $79.95

Presentation Management -- $39.95

Bliss Interactive Technologies

PO Box 88, Comanche, OK 73529

405-439-2247


Baler Spreadsheet Compilers
Chicago, Illinois (April 6,1992) -- Today, Chicago-based Baler Software Corporation announced and demonstrated its two new spreadsheet compilers - Baler 6.0 and BalerXE 2.0 (eXtended Edition). These new releases replace the award-winning Baler 5.1 and BalerXE 1.0. They are shipping this month.

The new releases incorporate the most-requested new features from current users. Key features include spreadsheet publishing output, several Windows-like user interface controls, additional compatibility with Lotus 1-2-3 spreadsheet programs, a new Baler Workbench menu-driven front-end, and several other ease-of-use and time-saving features.

Baler Software Corporation, the recognized leader in spreadsheet compiling software, is offering Baler 6.0 and BalerXE 2.0 as the ultimate spreadsheet compilers for DOS spreadsheet users. (Under development is Baler for Windows--the release date has not yet been announced).

Baler Use Growing

Baler's growing popularity is due to several trends, including:

1. Corporations increasingly find it difficult to share spreadsheet templates, because the spreadsheet environment is becoming so mixed. Baler solves this problem since a baled spreadsheet doesn't depend on the local user's spreadsheet brand or version to run.

2. The Lotus 1-2-3 .WK1 file format is now read by almost all popular programs, and Baler stores data in this format. This makes Baler data usable by all spreadsheets.

3. Spreadsheets are the most widely used application and still growing in use, and Baler uses this familiar metaphor throughout. This makes Baler the friendliest route to application development for spreadsheet users.

"These new releases add the features most demanded by our customers," said Ron Reimann, President. "The Workbench adds point-and-shoot simplicity to completing the development process with Baler. The new mouse support, dialog boxes and tool bar make an easier-to-navigate interface, and spreadsheet publishing output adds a professional look to printed output."

Baler 6.0 new Features/Benefits

Baler 6.0 is for the experienced spreadsheet user who writes worksheets for internal distribution. The newest features include:

Spreadsheet Publishing Module (SPM) -- Prints high quality output from compiled worksheets that have an associated formatting (.FMT) file created while using Lotus 1-2-3's Wysiwyg feature. SPM is used by simply selecting Publishing rather than Standard print mode, and printing to an HP Laserjet or compatible laser printer.

Baler Workbench -- A single menu-driven screen for easy point-and-shoot access to Baler's development tools. Provides dialog box pick-lists for file selection, and manages the details of the work session, saving time.

Windows-like Interface Controls -- New full mouse support, dialog boxes, customizable tool bars and pull-down CUA-compliant menus make baled programs easier to navigate and help transition DOS compiled spreadsheet users toward future Windows use.

Spreadsheet Compatibility. -- Supports the macro language from Lotus 1-2-3 Release 2.3 and 3.1 as well as all Release 2.3 and most 3.1 graph types. Supports the dialog box interface from Release 2.3 along with mouse support. For convenience, the compiler reads Lotus 1-2-3 Release 3.1 .WK3 (sheet A only) and Quattro Pro .WQ1 worksheet files directly.

Baler Extended Macro Language Enhanced. -- Baler's macro language includes 22 new commands for greater customization, for a total of 122 macro commands (Lotus 1-2-3 has 49 commands, by comparison). The Baler Extended Macro Language--like the XBASE language specification in the database world--has become the industry standard for spreadsheet developers.

BalerXE 2.0 new Features/Benefits:

BalerXE is for experienced spreadsheet users who will likely distribute applications for sale to others. Its key advantages over 6.0 include 1) graph printing, 2) a programmer's API for customizing operation with Microsoft C, 3) BuildRUN for building smaller RUN engines by stripping out unneeded features, and 4) built-in "addin manager" for adding in new features like graphical title screens or database .dbf file access.

BalerXE 2.0 includes all the new improvements listed for Baler 6.0.

Availability and Pricing

Baler 6.0 retails for $495 and Baler XE 2.0 retails for $795. Both products will be available in April. Current owners of Baler 5.1 and earlier may upgrade to Baler 6.0 for $99 for a limited time, after which the price is $149. BalerXE 1.0 users may upgrade to 2.0 for $129 for a limited time, after which the price is $199.

Baler's other products include Worksheet Optimizer (WSO) and ICE. WSO automatically "cleans-up" .wk1 and .wq1 files, removing unneeded formatting and rewriting inefficient formulas to save RAM and disk space. ICE, an add-in for Lotus 1-2-3, adds the same Baler Extended Macro Language in these new releases of Baler directly into 1-2-3. ICE makes 1-2-3 the perfect development environment for a Baler compiler user.

All products are available from leading software resellers, Merisel, Tech Data, and from Baler Software Corporation. Baler products are available in Canada, U.K., Europe, Australia and New Zealand, Asia, South America, Japan and Africa. Demo disks are available.

Baler Software Corp

1400 Hicks Rd, Rolling Meadows, IL 60008

708-506-9700


Multi-Tech 14.4Kbps Pocket Modem
Multi-Tech's New 14.4K bps V.32bis Pocket Modem Includes Fax Modem and Software

MOUNDSVIEW, MINNESOTA--April6,1992-Multi-Tech-Systems, Inc., a leading manufacturer of data communications equipment, headquartered in Mounds View, Minnesota, announces the MultiModemU pocket modem. The new MT1432MU can operate as a full-featured CCITT V.32bis (14.4K bps) computer data and Group 3 (9600/4800 bps) fax modem. It is bundled with MultiExpress data communications software and MultiExpressFAX fax communications software. The MultiModemU includes many of the features, speed and LEDs of the full sized MultiModemU, but is designed for the fast growing laptop and notebook computer market. It will be available for shipment in May, 1992, priced at $899.00.

"A laptop or notebook computer modem user needs the high performance features of a full-sized modem, but tailored to a more compact work environment," states Raghu Sharma, President of Multi-Tech Systems, Inc. "Many small modems have sacrificed speed, features, or operational indicators [LEDs] to offer a modem small enough for the laptop/notebook computer market. In addition to V.32bis the MultiModemU complies with all of the CCITT standards for speed, data compression, and error correction plus it can enhance UNIX UUCP operations through adaptive protocol enhancing. The MultiModemU also provides the user with a full array of LEDs (twelve in all) for monitoring the operation of the modem. A special design feature also lets users upgrade the modem's firmware by simply downloading a file from our Bulletin Board Service (BBS). This eliminates the need for physically changing a PROM to get performance enhancing feature changes."

The MultiModemU is bundled with both data and fax communications software. "We did not want to force the user to shop for anything when he or she purchased the MultiModemU," added Dr. Sharma.

"So we included, free of charge, all the software (and compact documentation) needed to conduct normal business over the phone."

The MultiModemU complies with the CCITTs V.32bis standard for 14,400 bps operation. It is also downward compatible with other modems that operate at 9600 (V.32), 2400 (V.22bis), 1200 (V.22/ Bell 212A), and 300 bps (V.21/Bell 103). It provides V.42 error correction for 100% error free transmissions, and V.42bis data compression yielding asynchronous throughputs up to 57.6K bps, which are four times faster than V.32bis alone (depending on file content). UUCP spoofing using Multi-Tech's own adaptive protocol enhancing speeds up batch file transfers within the UNIX environment, and fax transmissions at 9600/4800 bps allow the MultiModemII to send or receive faxes with any Group 3 or Group 2 fax machine, fax card or fax/modem in the world. It also responds to the EIA Class 2 command set, which is the defacto industry standard for high performance fax software. The MultiModemU uses industry standard "AT" commands for modem configuration and dialing and has a built-in dialing directory for storing up to 10 phone numbers.

As a portable laptop peripheral, the MultiModemU can use a 9-volt battery or a standard AC outlet for power. It has a built-in cable with a 9-pin RS232 interface for connection to your portable computer (a 25-pin to 9-pin adapter is also included) and an RJ11 jack for connection to the phone line. The MultiModemU is capable of detecting whether an incoming call is for fax or data communications. This allows you to connect your computer to a single phone line and receive faxes and file transfers without having to change any settings.

Multi-Tech Systems was founded in 1970 to manufacture data communications equipment and systems for a global market of network products users. The Minnesota-based company is a well-known leader in dial-up modem technology. The family of Multi-Tech products includes a complete line of 1200, 2400, 4800 9600, and 14.4K bps modems, statistical multiplexers, DSU/CSUs, 5250, 3780 and 3270 emulation systems, X.25 PADs, computer fax equipment, communications software, and LAN products. These products are sold in over 50 countries, through a worldwide network of distributors, manufacturer's representatives, system integrators, value-added resellers (VARs) and retailers. Multi-Tech Systems, Inc., can be contacted at its headquarters: 2205 Woodale Drive, Mounds View, Minnesota 55112. Voice (612) 785-3500 or (800) 328-9717, FAX (612) 785-9874, International FAX (612) 331-3180.


SPA Raids Grand Central Cameras
April 6, 1992 (Washington, DC) -- The Software Publishers Association (SPA) announced today that a raid against Grand Central Cameras, also known as GCT Photo Dealers 420 Lex, Inc., was conducted on March 25, 1992, on behalf of its members. The plaintiffs include Lotus Development Corporation, Microsoft Corporation, WordPerfect Corporation, Datastorm Technologies, Inc., Fifth Generation Systems, Inc., Interplay Productions, Inc., and Sphere, Inc. The raid was based on evidence that Grand Central Cameras systematically violated software copyrights by putting pirated software on computers to gain an unfair commercial advantage in the sale of computer hardware.

Pursuant to a federal court order, US Marshals and representatives of the SPA entered the electronics retailer and seized three desktop and two laptop computers containing pirated software products. In addition, all unpackaged computers on the premises were searched by the SPA for illegally duplicated software. Twenty-five diskettes containing copied programs and serving as duplication masters were also seized as evidence, as were a sample of sales records. These records will be examined to determine if customers who obtained pirated software will be named in the case.

The lawsuit was initiated on March 24, 1992, when a complaint was filed in the United States Court for the Southern District of New York. Based on the papers and affidavits submitted, the Honorable Shirley Wohl Kram granted a temporary restraining order, an order of seizure and impoundment, and an order to show cause for a preliminary injunction. These orders empowered the US Marshals to prevent the destruction of evidence by its seizure, along with other equipment and records that would substantiate the claims of illegal piracy. On April 2, Grand Central Cameras agreed to submit to, and on April 3, the court entered, a preliminary injunction forbidding unauthorized software copying.

Ilene Rosenthal, Director of Litigation for the SPA stated, "It is important that computer dealers learn that they will not be able to gain a competitive advantage by stealing from software publishers. Every time an unauthorized software product is loaded onto a computer, the software industry loses revenue. This raid should serve as a warning to all computer resellers that if they are going to break the law, they will be held accountable for their actions."

Since 1988, the Software Publishers Association has filed over 100 lawsuits on behalf of its members and obtained numerous search and seizure orders against businesses, computer dealers, bulletin board services, and educational institutions that have violated its members' copyrights. The SPA's anti-piracy hotline, 1-800-388-7478, accepts calls reporting software violations.

The Software Publishers Association also has distributed free of charge self-audit materials designed to help businesses, government entities, and educational institutions manage their internal software practices. To obtain a copy of The SPA Self-Audit Kit and SPAudit, a software inventory management program, companies should write to:

SPAudit

Software Publishers Association

1730 M Street, NW, Suite 700

Washington, DC 20036

The Software Publishers Association is the principal trade association of the personal computer software industry. Its 900 members represent the leading publishers in the business, consumer, and education software markets. The SPA has offices in Washington, DC, and Paris La Defense, France.


Micro Kitchen Companion for Windows
St. Augustine, FL.--March 1, 1992--Lifegtyle Software Group has announced that their popular MICRO KITCHEN COMPANION is now available for systems running Microsoft WINDOWS. Lifestyle's computer program lets you build a complete recipe management system in your home PC for under $50. Your computer can immediately be put to work for the everyday pleasure of menu planning; the program is easily operated by clicking on your choice of on-screen buttons.

MICRO KITCHEN COMPANION for WINDOWS is based on Lifestyle's popular MICRO KITCHEN COMPANION for DOS which has been named among the ten best selling home software products by the Sears Prodigy network. This software can help you organize the clutter of thousands of recipes from clippings, magazines, books or your own creations. You can add your own recipes, or select from an extensive library of pre-recorded entries to plan meals according to your own needs. Recipes can be extensively cross referenced and recalculated to serve up to 999 people instantly.

MICRO KITCHEN COMPANION allows you to keep track of what you serve to guests to avoid repeating menus and to plan special diets. Grocery shopping is facilitated, too, because shopping lists can be organized anyway you choose, and then printed or passed to a hand-held PC. With MICRO KITCHEN COMPANION, meals can be planned days in advanced or on-the-spot and then retrieved when needed.

For cooks who like to pass on their recipes, MICRO KITCHEN COMPANION enables them to print recipes as custom cookbooks or on recipe cards. The new WINDOWS features let you easily transfer recipes to or from other types of software electronically as well. Conversion of recipe measurements is simplified with MICRO KITCHEN COMPANION-- cups to quarts, quarts to gallons, all common measures are changed automatically. Conversion can even be made from Imperial Measure (U.S.) to Metric.

MICRO KITCHEN COMPANION for WINDOWS has other useful new features and a completely updated look. Even the longest recipes can now be put on a single screen, and recipe editing is much easier.

Lifestyle Software is a publisher and developer of software for home leisure computing. MICRO KITCHEN COMPANION and other Lifestyle Software products are available from many retailers, including Egghead Software, Radio Shack, Waldensoftware, CompUSA, and Computer City, among others. MICRO KITCHEN COMPANION for WINDOWS will retail nationwide at $49.95 and will be available March 15. To locate a dealer near you, call 1-800-289-1157.

Lifestyle Software Group

63 Orange St, St. Augustine, FL 32084


Visions for Windows (Astrology)
St. Augustine, FL.--March 1, 1992--Lifestyle Software Group announces the release of a new product for amateur astrologers called VISIONS FOR WINDOWS. This computer program packs a professional level knowledge base into your home PC for under $50. Using planetary movement data from the U.S. Naval Observatory, VISIONS FOR WINDOWS generates complete astrological data as well as horoscopes, using your choice of the Placidus, Koch, or Equal House systems.

VISIONS FOR WINDOWS is based on Lifestyle's popular VISIONS for DOS and Macintosh, with many new enhancements. VISIONS FOR WINDOWS can cast the horoscopes of famous personalities, relatives and friends from the past or the future. All you need is the time, date and the place of birth. VISIONS FOR WINDOWS automatically calculates the longitude and latitude from a point-and-click map of the world or from a comprehensive database of cities.

VISIONS provides Natal Data, which determines the position of the planets on the date of birth, Natal Planet Maps, which graphically depict the position of the planets for the date in question, and Natal Horoscopes which identify the guiding patterns of behavior for the subject.

In a similar fashion, it computes Daily Data to determine the position of the planets for the present date and uses this data to compute House Cusps and Transits. The Daily Planet Map and the Daily Horoscopes are detailed interpretations based on accepted astrological principles.

This new edition is compatible with Microsoft Windows. The beautiful new interface and hypertext help make VISIONS FOR WINDOWS the easiest full powered program of its kind.

In addition, multiple horoscopes can now be run simultaneously for two or more persons. Sky map dates can be advanced by astrologers looking for specific planet alignments without leaving the sky map screens and Orb size can be chosen for natal and daily horoscopes.

VISIONS FOR WINDOWS graphics and text can be printed or displayed on virtually every type of printer or monitor. Math coprocessor support has been added for lightening speed, and the EGA/VGA graphics have been enhanced.

Lifestyle Software Group is a developer and publisher of software for home leisure computing. Lifestyle products are available from many retailers, including Egghead, Radio Shack, Waldensoftware, CompUSA and Computer City. VISIONS FOR WINDOWS will retail nationwide at $49.95 and will be available March 15. To locate a dealer near you, call 1-800-289-1157.

Lifestyle Software Group

63 Orange St, St. Augustine, FL 32084


Phonedisk USA Quickref+ 1992 Ed.
PHONEDISC USA SHIPS QUICKREF+ 1992 EDITION

April 2, 1992 -- Marblehead, MA - PhoneDisc USA Corporation has begun shipping its 1992 Edition of QuickRef+, a business reference CD-ROM product containing the most important and frequently called businesses, organizations and associations in the United States.

QuickRef+ offers the award-winning PhoneDisc search software paired with the National Directory of Addresses and Telephone Numbers database published by Omnigraphic Inc. of Detroit, Michigan. Listings can be accessed by name, address, telephone number and/or ZIP code. QuickRef+ also allows look-ups by SIC codes and organization type headings. The range of listings available on the QuickRef+ disc include corporate, government, educational, financial, international, media, travel, and a host of associations and organizations.

The price for the 1992 Edition of QuickRef+ is an extremely affordable $99. "The low price allows us to offer the enormous benefits of QuickRef+ to a wide range of customers simultaneously, from the consumer level, to libraries, to the corporate levels, said Suzanne M. Lebel, Senior Product Manager.

PhoneDisc USA Corporation produces a line of CD-ROM telephone reference products featuring the PhoneDisc USA National Set which contains 90 million residential listings on just two CD's. PhoneDisc has received several awards for its outstanding products including the Christe Award for Business Product of the Year awarded by the Optical Publishing Association, the Product of the Year Award for Transportable Products and the Marketing Achievement of the Year Award both awarded by the Information Industry Association.

QuickRef+ and other PhoneDisc products --PhoneDisc USA Eastern Edition; PhoneDisc USA Western Edition; PhoneDisc New York & New England+; PhoneDisc California+; and PhoneDisc Canada+ -may be purchased through distributors or directly from PhoneDisc USA Corporation, 30 Doaks Lane, Marblehead, MA 01945, toll-free 1-800-284-8353.


Micro Bridge Companion Update
St. Augustine, FL.--April 3, 1992--Lifestyle Software Group has announced the release of a new version of the best selling bridge program, MICRO BRIDGE COMPANION. Now with Bridge Baron V, MICRO BRIDGE COMPANION is the most comprehensive bridge tool for all levels of players.

Developed by Tom Throop, winner of both the 1990 and 1991 International Computer Olympiad Bridge Championship, MICRO BRIDGE COMPANION now offers over two billion different and random card deals. It is the strongest program ever written for bidding and playing random deals for 1 or 2 person play. Bidding flow charts are provided so that you can see how the Baron decides what to bid. New EGA graphics showing the cards and their pips greatly enhance the updated program.

Additional modules offer two exclusive features, the Bridge World Challenges and the Personal Play Library. The Bridge World Challenges offers a selection of 24 challenging deals to test your skill and improve your problem-solving capabilities, straight from the pages of The Bridge World magazine. The Personal Play Library is an exclusive feature that allows you to build your own collection of deals which you can review and replay by saving them in a disk file.

MICRO BRIDGE COMPANION with Bridge Baron V has been endorsed by Alfred Sheinwold, one of the world's leading writers on bridge. As the key to endless hours of challenging bridge play, MICRO BRIDGE COMPANION is a complete collection of simulations and tools that will improve any player's skill, whether beginner or expert. It is an essential program for all bridge players.

MICRO BRIDGE COMPANION with Bridge Baron V is available for IBM, Tandy and compatibles as well as Apple Mac.

Lifestyle Software Group is a publisher and developer of software for home leisure computing. MICRO BRIDGE COMPANION retails for $59.95 and is available along with other Lifestyle Software products at many retailers nationwide. To locate a retailer near you, call 1-800-289-1157.

Lifestyle Software Group

63 Orange St, St. Augustine, FL 32084


1992 Sawtooth Software Conference
April 8, 1992--This summer SYSTAT, Inc. and Sawtooth Software will co-sponsor a three-day conference on PC-based market research techniques. The 1992 Sawtooth Software Conference, to be held July 22-24 in Sun Valley, Idaho, will offer sessions presenting techniques for computer-aided collection, analysis, and display of market research data

SYSTAT, Inc. produces and distributes SYSTAT, FASTAT, and MYSTAT, powerful statistical and graphics software for a wide range of business and research applications. Sawtooth Software is a Ketchum, Idaho-based developer of software for data collection and analysis.

"Many people who are familiar with SYSTAT may not be aware of how prevalent use of the software is among market researchers," says Ken Kombluh, director of marketing for SYSTAT, Inc. "In a study we conducted (using SYSTAT), we found almost 18% of our users were using our software for marketing and business applications. The combination of SYSTAT and Sawtooth Software's products is ideal, so we're very pleased to be involved in this conference."

Sawtooth Software has sponsored four previous market research conferences. The firm wanted to broaden the scope of its 1992 conference to include the types of analyses and graphics generated by SYSTAT products, and asked SYSTAT, Inc. to help coordinate sessions for this year's program.

"Past Sawtooth Software conferences have focused on PC-based tools for interviewing, conjoint analysis, perceptual mapping and cluster analysis," says Joe Curry, president of Sawtooth Software. "By co-sponsoring this year's conference with SYSTAT, we're exposing users to a wider range of tools, and showing how well they all work together."

The 1992 conference will detail the use of PC software throughout the market research process, from initial data collection to presentation of findings and conclusions.

Sessions will show attendees how to effectively use software to conduct interviews and surveys, perform statistical analyses on data sets, produce high-quality graphics, and integrate graphics into presentations. Several sessions on specific statistical routines, including discrete choice analysis and tree-structured data analysis, will be presented.

The conference sessions offer a mix of speakers from industry and academia. Representatives from Apple Computer, Chrysler Corp., Cornell University, Duke University, Goodyear Tire & Rubber Co., and several market research consulting firms are scheduled to speak. SYSTAT, Inc. president Leland Wilkinson will present sessions on data analysis and the use of two- and three-dimensional graphics for data display. Representatives from Sawtooth Software will speak in several sessions.

"SYSTAT, Inc. is committed to providing market research solutions, and we will continue to sponsor these kinds of events, offer more products, and provide service and technical support for market research applications," says Kornbluh.

SYSTAT, Inc. will also be sponsoring a data analysis short course in Hailey, Idaho just prior to the Sawtooth conference. The short course, to be held July 20-21 at the College of Southern Idaho, will provide detailed instruction in the use of the DOS version of SYSTAT. The course will cover basic features of SYSTAT, and will also show how SYSTAT solves specific data analysis problems.

For mroe information on the market research conference, contact Tiffany Holmes at 708-864-5670, or FAX number 708-492-3567. Contact Mary Kennedy at the same phone and FAX numbers for more information on the SYSTAT short course.

SYSTAT Inc, 1800 Sherman Ave, Evanston, IL 60201

708-864-5670


QuickTrax TimeCard! V1.1
March 30, 1992 -- New QuickTrax TimeCard! - Version 1.1

Employee time management software for the PC environment.

Discovery Graphix announces the release of QTC! version Sv1.1. This Shareware version of QTC! is a full featured, network ready, on-line time clock program. Features include an elegant, three level user interface with a relational hyper-topic help system.

With QTC!, you can track time and attendance information on up to 9,999 employees. Time data integrates directly with the QuickTrax Employee RollCall! human resource management program. This alliance gives the PC user an unequalled employee time management system.

QTC! features two levels of operation for the employee. Employee's can punch in or out of work, check schedules, make To-Do lists and send or receive messages using the User Menu Level. Employees set to level three only need to log in and hit the enter key to punch in or out.

The System Manager Menu provides full control over passwords, account codes, system messages and many other run-time features. The standard reports library includes 15 reports that detail time card activity, schedules and employee information.

Registered users receive a printed Manual and User Guide, free phone support for three months and a free upgrade. QTC! Sv1.1 requires 640k of memory, hard disk and DOS 3.0 or up. QTC! may be run on a single or network operating system that is transparent to DOS.

Discovery Graphix Software

P.O.  Box  2451, San  Ramon, CA 94583

(510)  277-1502


QuickTrax Employee RollCall! V2.3
March 30,1 992

New QuickTrax Employee RollCall! - Version 2.3

Human resource management software for the PC environment.

Discovery Graphix announces the release of QRC! version Sv2.3. This Shareware version of QRC! is a full featured, powerful and yet easy to use employee database management program. Features include pull down menus, pop up screens and a relational hyper-topic help system with over 65 screens.

With QRC!, you can track up to 9,999 employee files, with EEOC and Key Events reporting, hourly scheduling and attendance reporting. With three level password protection, your employee data will be secure. Six look up code tables allow you to customize employee information to fit your needs and ensure accurate data entry.

Any one of 25 standard reports can be viewed on screen, printed or saved as a file. The on disk User Guide can now be viewed or printed within the program. Customize reports with titles, shaded frames, Italics, bold and size. Print continuous or sheet fed return and address labels. Other convenient features include a calendar, note pad, tickler, backup and report setup utilities. QRC! is now compatible with the QuickTrax TimeCard! program.

Great Reviews! QuickTrax keeps employees in line

by Noah Matthews, Knight-Ridder News Service

"if your looking for a program that will keep track of essential information about your employees, schedule them, track attendance and benefits and give you enough reports to warm the heart of any accountant - and if you're on as tight a budget as the rest of us - here's a program that costs $39 and acts as though it should cost $500."

Registered users now receive a printed User Guide, free phone support for three months and the QBack and QFUtility programs. QRC! Sv2.3 requires 640k memory, a hard disk and DOS 3.0 or up.

Discovery Graphix Software

P.O.  Box  2451, San  Ramon, CA 94583

(510)  277-1502


XVT Newsletter Vol 3, #2 (Apr'92)
This is the latest in a series of newsletters updating developers on recent XVT news. If you didn't receive this copy directly and would like to be on our mailing list or if you've moved, please fax us your current address.

XVT RELEASE 3.0 IMMINENT

XVT Software Inc. will soon be shipping Release 3.0 of its popular family of GUI portability toolkits. The beta testing phase is winding down and final documentation is being completed. Final Release 3.0 versions of the XVT libraries and XVT-Design will be available as follows:

* MS-Windows and Motif            May  31, 1992

* PM, Macintosh and character     June 30,1992

* OPEN LOOK                       July 31, 1992

"Gamma" releases of all XVT libraries (except OPEN LOOK) will be available in April. Gammas are stable beta releases with preliminary documentation. XVT-Design will not be available in a gamma release. Gamma releases will receive full release-level technical support. Contact your XVT Sales Representative for details on the gamma release program and platform availability.

Some of Release 3.0's new features include:

* Support for 8-bit European languages * Consistent events and event handlers for windows and dialogs * Hierarchical menus * Simplified application structure * Consistent support for all controls in dialogs and windows * Run-time synthesis of dialogs and controls * Timer events * Event masking * Support for combo controls and groupboxes * Associate arbitrary data with windows, dialogs, and controls * Improved keyboard focus model * Replaceable memory allocation error handler; and many, many more!

Many functions, variables, macros, constants and types have been rewritten in terms of the new, more powerful Release 3.0 features. An upward compatibility layer of mostly portable code recreates, on top of Release 3.0, the full Release 2.0 API. The advantages of this include:

* Existing programs, once recompiled and relinked, will run as they did before, or even better, without change.

* The compatibility code, which will be released in source form, provides documentation on how Release 3.0 relates to Release 2.0.

* Full upward compatibility is achieved with a smaller API.

Release 3.0 will be sent to registered users as part of the maintenance agreement. If you're evaluating XVT, Release 3.0 will confirm XVT's leadership in portable GUI solutions. Call us and discover why XVT is the best development decision you can make.

CONSULTING & TRAINING COURSES

XVT's Consulting & Training Group (CTG) has scheduled its first XVT Release 3 public training courses. The 2nd Quarter 1992 public course schedule is:

   May  13-15 in Bedford, Massachusetts

   May  18-20 in Boulder, Colorado

   June 10-12 in Austin, Texas

As we go to press, CTG's first Release 3 course is underway. Attendees at this maximum capacity event are highly enthusiastic about Release 3 and the increased availability of XVT training. We recommend you sign-up soon, to guarantee your seat in an upcoming course.

CTG was formed in response to the ever-growing need for GUI training and consulting. The CTG charter is to help you get your GUI application developed and released. We're GUI and XVT experts, so we can help you with your next development project, XVT-based or otherwise.

For more information on the public course schedule, or for details on private courses, contact CTG at (303) 443-4223 .

XVT DEVELOPERS CONFERENCE

The 4th Annual XVT Developers Conference will be held August 24-28, 1992, at the Clarion Hotel in Boulder, Colorado. Attendees can choose from a 2-day XVT Release 3 tutorial; a 3-day selection of technical sessions; general XVT tutorials; and numerous Birds-of-a-Feather sessions. An informal reception will also be held and space is available for exhibits of XVT-related products or services.

The 2-day XVT Release 3 tutorial costs $495. The 3-day technical sessions cost $300 for registered XVT customers, $350 for all others. Sign-up now and avoid late registration fees!

Rooms can be reserved by calling the Clarion at (303) 443-3850. Special discount rates for conference attendees range from $72-$92 and will be effective August 21-30, 1992. Make your reservations by August 2nd or both the rooms and the discounts will be unavailable! At that time of year, returning students make lodging very hard to find. Discount airfares are available if you fly United or Continental by calling Cain Travel at 1-800-346-4747.

To make conference reservations, call XVT Software at (303) 443-4223 and ask for Developers Conference information .

We will mail detailed conference information in the coming weeks. This is a very popular event, so mark your calendars now and make plans to attend!

XVT ONLINE REFERENCE NOW AVAILABLE

GUI/Pi Technology of Agoura, California, recently announced its XVTxRef product, the first online cross-referenced version of the XVT Programmer's Manual.

Initially available for MS-Windows, Macintosh, OS/2 Presentation Manager and UNIX character systems, XVTxRef allows a quick search of the XVT API and "hot text" access to all cross-referenced entries. With its many code examples, developers can save time and reduce entry errors by copying code from XVTxRef and pasting it into an application.

Pricing begins at $119. Demo disks and volume discounts are available. For more details, contact GUI/Pi Technology at (818) 706-1422.

XVT Software Inc

4900 Pearl East Circle, Box 18750, Boulder, CO 80308

303-443-4223


NetRunner LAN Remote Control Pgm
Crystal Computing Corporation announces NetRunner, a $24.95 PC-based remote control program that can run on all LAN platforms and modems. Featuring remote control, remote execution, file transfer, remote printing, and keyboard locking.

San Jose, California - Crystal Computing Corporation announces a feature rich, low cost remote control program, NetRunner, which is perfectly suitable for Technical Support, Computer Aided Instruction, Remote Control, and Group Works. Running on all PC/XT/AT/386/486s and 100% compatibles under MS-DOS 2.0 or higher, NetRunner can reach out and control remote computers across Novell LAN, NetBIOS based LAN, or even Wide Area Network connected by modems. Once connected, the user can take over the re mote machine, observe the progress of remote machine, co-work with remote user on application programs, transfer files between connected machines, print remote files on local printers or print local files to remote printers, submit job to remote comp uter for execution, and read remote directories.

NetRunner

Crystal Computing's NetRunner provides the following features.

Remote Control Functions: You can take over remote computer, observe remote user's progress, or co-work with remote user on application programs like Lotus 123, dBASE III, or word processors, etc.

File Transfer Functions: You can transfer files to or from remote computer without interfering remote user's current work. Wild card file name supported.

Remote Printing Functions: You can print local files to any of the remote printers, or print remote files to the local printers.

Remote Execution Functions: You can edit a batch file and submit the job through NetRunner to the remote machine. Then you can either observe the progress of the remote machine, or go back to local to proceed other tasks. This frees you from walking over to the remote machine t o execute and watch programs.

LAN and WAN versions in one package:

NetRunner includes NetBIOS version, Novell IPX/SPX version, and Modem (RS-232) version in one package. And they share the same user interface.

Easy to install, easy to use: Both installation program and NetRunner program are menu-driven. Experienced users can also execute the program with parameters.

Availability and Price: NetRunner is immediately available from Crystal Computing Corporation. The U.S. suggested list price for the NetRunner Starter Kit (2-user version) is $29.95. Each additional user: $24.95. Site License: $124.95.

Crystal Computing, P.O. Box 9527 San Jose, CA 95157-0527

(408) 446-1522 Order: (800) 726-6209 Fax: (408) 996-2899


FreeLAN-E Ethernet Starter Kit
Crystal Computing Corporation announces a $249 PC based Ethernet Starter Kit, FreeLAN-E, that contains everything you need for a two- user LAN. The Package includes Ethernet cards, cable, terminators, and a Network Operating System (NOS) software, featuring file sharing and printer/plotter sharing.

San Jose, California - Crystal Computing Corporation announces a self-sufficient, low cost Ethernet starter kit, FreeLAN-E, which is perfectly suitable for small business or home office with 2 to 16 computers. With FreeLAN, the user can share printer s/plotters, share files, and run network version software at 10 Mbps speed. Starting from two users, FreeLAN can be easily upgraded to up to 256 users without any hassle. And since it is peer-to-peer service, any machine on the FreeLAN network can sh are files or printers/plotters with any other users on the network any time he/she want to. No dedicated server needed, and no network administrator needed. This Starter Kit package includes two 10 Mbps Ethernet cards, one 15' coax cable, two 50 ohm terminators, and Network Operating System for two users, featuring file sharing, file/record locking, printer sharing/spooling, spool management and password protection. Furthermore, FreeLAN can run with Novell Netware, support Windows 3.0, and is Ne tBIOS based with NetBIOS included. FreeLAN supports IBM PC/XT/AT/386/486 and 100% compatibles, under MS-DOS 3.1 or later.

FreeLAN

Crystal Computing's FreeLAN provides the following features.

File Sharing: User can share files with other users on the network. File locking and record locking supported. So together with MS-DOS SHARE.EXE, FreeLAN supports multi-user database applications, and many network-aware applications which need file/record locking.  All resources are password protected.

Printer/Plotter Sharing: User can use any printer/plotter on the FreeLAN network by linking to that machine. Once connected, printing job will be transparently sent to the designated printer. Many users can print to the same printer at the same time, with no printout mix-up problem. Each user can check the print queue status, and optionally kill his/her job in the queue, any time before the actual printing.

Peer-to-peer service: No dedicated server needed, and no network administrator needed. Any user can post his/her resources to the public, and other users can just link to the resources and use them, assuming they have the right authorities. It is flexible and near zero ma intenance cost.

NetBIOS based: NetBIOS is one of the industry standards. And many major NOS vendors support NetBIOS. Since our NOS is NetBIOS based, so you can run our NOS on any network that supports NetBIOS. That way you can treat our NOS as a Value Added Product which will augm ent the functionality of other networks.

Easy to upgrade: It is not only easy to upgrade to up to 256 users to run FreeLAN, it is even easy to upgrade to Novell Netware or Microsoft LanMan, or any other major LAN vendors without re-investing your hardware and software. Since our hardware complies industry s tandard, it supports nearly all major NOS vendors. And also since our software is NetBIOS based, you can bring our NOS to any other NetBIOS LAN to supplement their functionality. For example, you can share resources among the clients in a server-clie nt network like Netware.

Easy to install, easy to use: Both installation program and FreeLAN program are menu-driven, command line counterparts are also available for experienced users.

Availability and Price: FreeLAN starter kit is immediately available from Crystal Computing Corporation. The U.S. suggested list price for FreeLAN-E, the Ethernet version, is $249. And the U.S suggested list price for FreeLAN-A, the FreeLAN Arcnet starter kit, is $179.

Crystal Computing, P.O. Box 9527, San Jose, CA 95157-0527

(408) 446-1522, Order: (800) 726-6209 Fax (408) 996-2899


Corvette Mouse
MOUSE TURNS INTO A CORVETTE

Computer mice, are disappearing nationwide. And just as suddenly miniature cars are showing up on computer desks. Is this some new type of high tech Invasion?

"It's nothing to worry about," said Bill Daniels, head designer for Suntime products. Bill should know - his company makes the little cars that instantly turn a mouse into a racy sportscar. Designed as a dustcover to keep dust and dirt out of the mouse, the cover called Auto Mouse, is also a highly detailed show quality model.

Chris Cooper, a University of Michigan computer science student, uses an Auto Mouse with his MacIntosh system. "I think It's about the hottest-looking computer accessory I've ever seen," Chris said, "and everybody that has seen mine wants one." That's probably why there's already a backlog of orders, pointed out Daniels. But the Auto Mouse is also a very practical device, he said.

Mice are sensitive devices and can be easily damaged by dust getting into them. Unlike other covers, the Auto Mouse snaps onto the mouse and the Corvette becomes the switch for the mouse. You use it just as you normally would, except that instead of having a boring-looking mouse on your desk you are driving a hot Corvette and the cover is protecting your mouse.

Daniels went on to say that each model is hand-assembled and hand painted with up to three complete coats of paint, including a final clearcoat to protect against chips or wear. And every car has an adjustable hood so the user can set the feel of his switch.

The Auto Mice come in red, white or blue colors and the cars can even be logoed. Patents and trademarks are in and the Corvette is built under license from the General Motors Company.

Although the first Auto Mouse fits the Maclntosh mouse, Daniels said more quality world-famous sports cars are due out shortly, as well as cats and dogs and, yes, maybe even a mouse. And they will fit other mice including the Microsoft mouse. And he wanted to make sure that we knew that every Auto Mouse is made in the USA.

This unique Corvette is available for $19.95 from Suntime, 7817 North Cameron Ave, Tampa, FL 33614. Phone 813-886-1145, FAX 813-885-3496


DEBUG & EDIT for Windows NT
April 6, 1992 -- TINTON FALLS, NJ -- Computer Innovations today announced two programs for the Microsoft Windows NT environment, DEBUG*2000, a source code debugger, and EDIT*2000, a programmer's editor.

"These products are in keeping with our philosophy of delivering clean, fast development tools for the Microsoft Windows programmer," according to George Eberhardt, President of Computer Innovations. "We hope our products will be the choice of NT developers who need a powerful, time saving debugger, and programmer's editor."

DEBUG*2000 is a source level debugger for C/C++ programs, designed to reduce the time and effort required to develop programs through the use of clean and uncomplicated operations. DEBUG*2000 minimizes typing by using windows that automatically update as a program runs, and emphasizes efficient use of screen space. Data structures can be easily examined and modified using the mouse.

EDIT*2000 is a programmer's editor that provides a full windowing environment. Support of the mouse, pull down menus, and an effective "Help" system makes EDIT*2000 easy to learn, and fast to use. A programmer may open as many files as desired, and editing becomes fast and easy through the use of simple mouse clicks, keystroke commands, or any combination that suits the programmer's style.

DEBUG*2000 and EDIT*2000 both run under Windows NT and Windows 3 on Intel 386/486 platforms, and Windows NT on the MIPS platform.

Computer Innovations expects to supply their products to many of the developers of Windows NT applications in order to help reduce the product development cycle, and thereby time to market for NT products. "We feel that the time saved in the development cycle by using our products can make NT products available to the market in a much shorter timeframe," stated Jon Chappell, VP of Software Development at Computer Innovations.

Founded in 1978, Computer Innovations has been a developer of compilers and programming tools for the UNIX market, and has utilized this 32 bit operating system expertise in the development of the NT products.

Computer Innovations Inc

980 Shrewsbury Ave, Tinton Falls, NJ 07724

908-542-5920


ISICAD & Cabletron Network Mgmt Swr
ANAHEIM, Calif., April 03, 1992 -- ISICAD, Inc., the leading innovator and developer of graphics-based Physical Network Management systems, has signed a joint development agreement with Cabletron to integrate ISICAD's COMMAND software for Physical Network Management with Cabletron's Spectrum network management software package.

This strategic alliance further establishes Physical Network Management as an essential tool in managing growing networks and underscores the rise of Physical Network Management as one of the key strategic issues for communications and network management in the 1990s and beyond.

Charles Robbins, Director of Communications Research at the Aberdeen Group, explained, "Physical Network Management addresses the increasing complexities of LAN and WAN internetworking. Users must have advanced tools to more effectively manage physical network connectivity."

Robbins added that "the announced direction of integrating ISICAD's COMMAND offering with Cabletron's Spectrum platform takes advantage of an attractive Physical Network Management software tool in concert with a powerful network management software platform. We believe that this integration process holds significant promise for managing complex, fast-growing, multi-vendor, enterprise-wide networks."

"Reflecting a growing market trend, a number of our major customers want and need to manage their networks through a single source. Our mission is to take the leadership stance in providing comprehensive network management solutions through strategic alliances," said Michael Upp, ISICAD's Vice President of Marketing.

The alliance between ISICAD and Cabletron is the second such announced association for the company. ISICAD has also consummated a joint agreement with Hewlett-Packard Company to integrate COMMAND Physical Network Management software with HP OpenView Network Node Manager.

"These and other vendors are taking advantage of ISICAD's standard COMMAND APIs to integrate pieces of the solution with COMMAND for a comprehensive network management solution," said Upp.

This growing trend toward the adoption of Physical Network Management is further illustrated by the number of companies implementing and utilizing COMMAND to enhance network design and management. ISICAD's customer base worldwide includes such notable companies as General Electric, Shearson Lehman Hutton, Bell Cellular, JP Morgan Bank and National Power.

COMMAND documents and tracks the physical assets of a network, such as the location of computers, hubs, telephones, switches and other devices within a building, as well as the connectivity between those devices.

"The emphasis is on replacing the plethora of large notebooks of network configuration details and drawings with a powerful suite of new application software. COMMAND offers the current physical configuration of the user's network in graphical form on a readily accessible, on-line hardware platform, " Robbins explained.

The software can be used as a stand-alone solution or optionally linked to logical network management systems. COMMAND software graphically documents networks while concurrently building a relational database on connectivity, inventory, cost and equipment attributes. The software system is used in network planning, change management, help-desk, troubleshooting and asset management.

ISICAD, Inc., is the leading developer and supplier of graphics-based, fully integrated information management systems serving a worldwide installed customer base that represents all major industrial and service sectors. Founded in 1978, and headquartered in Anaheim, Calif., the company's Physical Network Management products address a growing need to document and gain full control of the physical network environment.

ISICAD Inc

1920 West Corporate Way, PO Box 61022

Anaheim, CA 92803-6122

714-533-8910


Microsoft Press Books (April)
Concise Guide to Microsoft Windows 3.1

Now there's a fast and easy way to get up and running with the newest version of the Microsoft Windows operating system. Microsoft Press introduces the CONCISE GUIDE TO MICROSOFT WINDOWS 3.1--a handy reference designed for computer users who don't have time to read a full-length book.

Well-known computer book author Kris Jamsa delivers instant answers to Microsoft Windows version 3.1 questions--everything from installation to customization--in this inexpensive guide. Topics include:

* The Program Manager with its handy new StartUp group

* The new, faster File Manager

* The Print Manager

* The Task List

* The built-in desktop applications

Readers will quickly discover how to:

* Work with scalable and embedded fonts

* Configure printers

* Use multimedia hardware and software

* Specify international settings

* Prioritize applications

Appendixes include a handy glossary, a guide to installing version 3.1, a table of keyboard equivalents, and memory and system settings. A comprehensive index leads readers quickly to information on any topic in the book. There's even a section on games! The CONCISE GUIDE TO MICROSOFT WINDOWS 3.1 is the ideal computer-side reference for beginning to intermediate users of the Microsoft Windows operating system.

Kris Jamsa is the author of more than 40 computer books written on a wide range of topics. His other titles from Microsoft Press include MS-DOS Batch Files: Microsoft Quick Reference; MS-DOS QBasic': Microsoft Quick Reference; and Microsoft C: Secrets, Shortcuts, and Solutions.

Other titles in the Microsoft Press Concise Guide series include the Concise Guide to MS-DOS 5 and the Concise Guide to Microsoft Works for Windows, both by JoAnne Woodcock.

--------------------------------------------------------

Dan Gookin's PC HOTLINE

Sooner or later almost every PC user runs into problems. An important file gets deleted. A virus corrupts the system. Disasters like these can strike at any time. And when they do, users don't need to make a long distance call. They can fix it themselves with Dan Gookin's PC HOTLINE from Microsoft Press.

PC expert Dan Gookin--the popular author of the bestselling Microsoft Guide to Managing Memory with DOS delivers quick, reliable, on-the-money solutions along with candid advice for preventing future computer trauma. With PC HOTLINE, Dan's good-natured and straightforward troubleshooting tips are available 24 hours a day. Readers will be able to diagnose and treat most of the problems PC users encounter, safeguard their data, and boost their PC performance. They'll discover how to:

* Prevent a potential crash

* Resolve interrupt conflicts

* Create an Emergency Boot Disk

* Restore files, directories, and hard disks

* Organize and back up the hard disk

* Locate and remove a virus

* Compress files to save disk space

* Buy hardware and replacement parts safely via mail order

* Deal with unreadable disks

* Improve hardware speed

* Defragment the hard disk

* Determine when they need -- and don't need --

  that utility program

Handy appendixes make it easy to find solutions to the most common problems, and a comprehensive index helps users quickly locate information on any topic in the book.

So before they pick up the phone, users should pick up Dan Gookin's PC HOTLINE. They'll soon be on their way to trouble-free computing!

Author Dan Gookin manages to have one or two computer books on the bestseller list at any given time. His irreverent, friendly style has lead to a stint as host of a popular radio show, writing assignments for several magazines, and invitations to speak at dozens of user group meetings. He coauthored (with Van Wolverton) the popular Supercharging MS-DOS 3rd Edition, and his Microsoft Guide to Managing Memory with DOS 5, published last year, is a bestseller. Both books are published by Microsoft Press.

--------------------------------------------------------

Power Programming with Microsoft Macro Assembler

Ray Duncan--"Power Programming" columnist for PC Magazine and author of the highly regarded Advanced MS-DOS Programming--has now created POWER PROGRAMMING WITH MICROSOFT MACRO ASSEMBLER, a "must have" resource for Microsoft Macro Assembler (MASM) programmers.

In this example-packed book-and-software package from Microsoft Press, Duncan provides a wealth of tips and routines to help MASM programmers efficiently perform the application tasks they encounter daily. Topics include:

* Using buffers, lists, and heaps to manage memory

* Creating fast, efficient number and string sorts

* Processing command lines

* Converting and formatting ASCII numeric strings

* Building and maintaining link lists and binary trees

* Optimizing programs for efficiency and speed

* Using high-precision floating-point arithmetic

* Using MS-DOS environment variables

Readers will also find solutions to some of the most commonly encountered assembly-language programming problems. With his trademark clarity, author Duncan begins with code structure and hints for MASM beginners and then builds to more complex issues. The book's more than 50 useful building-block routines for developing fast, efficient programs and the more than 20 disk-based sample programs allow MASM programmers to experiment with the routines and integrate them into their own programs. The accompanying disk contains all the procedures covered in the book in source code form and, for most procedures, includes an interactive demonstration program provided both in source code and as an executable file. Microsoft Macro Assembler version 5.1 or higher is required.

Ray Duncan is a contributing editor to PC Magazine. He is also the author of Advanced MS-DOS Programming and Advanced OS/2 Programming, both published by Microsoft Press. He works as a staff neonatologist at Cedars-Sinai Medical Center in Los Angeles, California

--------------------------------------------------------

The Cobb Group's Windows 3.1 Companion

Microsoft Press, the leading publisher of books on the Microsoft Windows operating system-- announces the publication of The Cobb Group's WINDOWS 3.1 COMPANION.

This completely updated edition of the #1 bestselling book on the Microsoft Windows system covers all the important new features of Microsoft Windows version 3.1. With the trademark clarity that made Windows 3 Companion the book of choice for more than 100,000 beginning-to-intermediate users of the Microsoft Windows environment, the Cobb Group's Lori Lorenz and R. Michael O'Mara with Microsoft's Russell Borland spoke to new users and to users making the switch from a character-based computing environment. Readers learn the ins and outs of icons, windows, dialog boxes, the Help facility, and the built-in applications for version 3.1 of the Microsoft Windows operating system.

Upgrading users already familiar with the Microsoft Windows program will want to consult WINDOWS 3.1 COMPANION to take advantage of the extraordinary improvements and added features of version 3.1, including:

* The new, faster File Manager, featuring a split window that simultaneously displays a directory tree and a listing of directory contents.

* TrueType fonts, which eliminate the need for third-party font programs. The user can scale a variety of fonts to any size, view the result on screen, and produce sharper printed copies.

* The improved Program Manager, with its handy new StartUp group that runs programs or loads files automatically when version 3.1 is started up.

* Object Packager, which lets the user paste data or graphics from another application into the current document, maintaining "hot links" with the other application for easy updating.

* The faster Print Manager.

* Automatic network reconnections that reestablish previous network connections every time the Windows program is started up.

* The new "drag and drop" feature, which allows the user to drag and drop a file icon onto an application icon to start the application and open the file, or onto the Print Manager icon to print the file.

* Support for multimedia, the hottest new area of personal computing

WINDOWS 3.1 COMPANION also describes how version 3.1 manages memory and shows users how to work with applications that are not Windows-based, using PIFs (program information files). Using the PIF editor, the user can set up almost any application to run under version 3.1 of the Windows operating system.

Practical examples and hundreds of illustrations enhance the clear explanations of each feature. Appendixes include a handy glossary and a detailed guide to installing version 3.1. A special eight page, full-color section shows off the attractive design of the Microsoft Windows version 3.1 user interface, and a comprehensive index leads readers quickly to information on any topic in the book.

Lori L. Lorenz and R. Michael O'Mara of The Cobb Group wrote the original Windows 3 Companion. Authors from The Cobb Group have written several best-selling Microsoft Press books, including Word for Windows Companion and Running Microsoft Excel.

Russell Borland, a former member of the Microsoft Word development team, has been a technical writer for Microsoft Corporation for 11 years. He has written several books on Microsoft Word, including Running Word for Windows and the forth coming Microsoft Word Basic Handbook, both from Microsoft Press.

--------------------------------------------------------

Microsoft Press, the trade book division of Microsoft Corporation, publishes a wide range of quality books on computer programming, software and hardware, and other topics of importance to the computer industry. Microsoft Press books are widely recognized as authorized editions for the MS-DOS and Microsoft Windows operating systems, Microsoft languages, and software applications such as Microsoft Word and Microsoft Excel Microsoft Press books are distributed to book and software retailers worldwide. Consumers in the United States may also order directly from the publisher at 1-800-MSPRESS.

Microsoft Corporation (NASDAQ "MSFT") develops, markets, and supports a wide range of software for business and professional use, including operating systems, network products, languages, and applications, as well as books, hardware, and CD ROM products for the microcomputer marketplace.

Microsoft Press, One Microsoft Way, Redmond, WA 98052-6399

206 882-8080


Osborne/McGraw-Hill April Books
Earl Weaver Baseball: Hall of Fame League

by Kevin Shaffer

Osborne/McGraw-Hill announces publication of Earl Weaver Baseball: Hall of Fame League, a new book in the Silicon Valley imprint of computer game books. Written by sportswriter and baseball fan, Kevin Shafer, this exciting new guide covers versions I and II of Earl Weaver Baseball, the number-one computer baseball game for the IBM PC and compatibles.

Developed by Earl Weaver, the legendary former manager of the Baltimore Orioles, the game allows players to build a dream team of players with Hall of Fame credentials from as far back as the 1890s, all the way to the 1990s. Kevin Shafer explains how to create that dream team by providing little-known facts about favorite players and managers along with fact-filled biographies. Shafer also covers how to set up a league, price players, conduct a "Draft Day", use "normalized" stats to choose among baseball greats from the past and present (so Babe Ruth can face Goose Gossage), and much more.

The book includes information on selecting the best ballparks, tricks for molding a manager, learning the strategies that made Earl Weaver famous, and wrapping it all up with a World Series!

Designed for all baseball fans, this is a riveting guide that can enhance a players understanding of the game while providing a fresh approach to playing America's number one sport.

$19.95         ISBN:  0-07-881844-3      352 pages

--------------------------------------------------------

Falcon 3.0 Air Combat by Pete Bonnani & Bernard Yee

Osborne/McGraw-Hill announces the publication of Falcon 3.0 Air Combat, a new addition to Osborne's Silicon Valley imprint of computer game books. Co-authored by fighter pilot Pete Bonnani who wrote the bestselling, F- 16 Stealth Air Combat, this new book covers version 3, the latest release of the Falcon flight simulator for the IBM PC and compatibles.

Imagine flying a 25,000-pound blowtorch in the form of a sleek F16. Maneuver the "jet" into a position of advantage while pursuing the art of head-on combat. Playing Spectrum-Holobyte's Falcon is the closest experience many players will have to being a real fighter pilot. Falcon is an exciting, exhilarating and challenging game that has sold hundreds of thousands of copies worldwide. And now Falcon 3.0 offers an even more realistic flight environment with 3-D terrain.

With co-author Bernard Yee, Pete Bonanni, an actual F-16 fighter pilot and weapons/tactics officer, demonstrates the ins and outs of basic fighter maneuvers, advanced air-to-air combat tactics, Falcon 3.0 weapons deployment, and much more.

Recruited by Spectrum-Holobyte to assist in the development of Falcon Air Combat, Pete Bonnani is THE expert guide to learning about Falcon 3.0 and becoming a flying ace.

$19.95              ISBN:  0-07-881701-3      256 pages

--------------------------------------------------------

Windows 3.1 Made Easy by Tom Sheldon

Osborne/McGraw-Hill announces publication of Windows 3.1 Made Easy, by Tom Sheldon. This new updated edition of Sheldon's bestselling Made Easy guide will help anyone manage the new version 3.1 with ease and efficiency.

Both beginning and experienced Windows users will quickly discover the power of the new, enhanced version of Microsoft's graphical interface and operating environment. Sheldon covers all the fundamentals step-by-step, including how to get up and running with Windows, mastering Windows' menu, and installing Windows.

Experienced Windows users will discover chapters on customizing Windows, managing the file system with File Manager, transferring information between Windows, Windows accessories like Write and Paintbrush. using TrueType font technology, and using Object Linking and Embedding (OLE). Plenty of tips are included to help users experiment with Windows outside of the usual applications.

Loaded with short examples, hands-on projects, screen illustrations, and plenty of tips for everyday use, Windows 3.1 Made Easy will quickly help users to take charge of This powerful program.

$19.95              ISBN: 0-07-881725-0       512 pages

--------------------------------------------------------

dBASE IV 1.5 Inside & Out by Edward Jones

Osborne/McGraw-Hill announces publication of dBASE IV 1.5 Inside & Out, a new book by database expert Ed Jones. The author of numerous bestsellers on dBASE, Paradox and Excel, Jones helps users to take full advantage of Borland's new upgrade of the ever-popular dBASE software in his newest book.

dBASE IV 1.5 Inside & Out begins by covering database fundamentals including how to design, edit, sort and index a database. For more experienced dBASE users who want to learn about dBASE IV 1.5, Jones covers skill-building topics, including how to use the power of queries to precisely search for data; using the relational powers of dBASE IV 1.5 to pull data from several files; report design and printing; an introduction to dBASE IV 1.5 programming; programming for data entry, editing, and retrieval; using the Applications Generator; handling dBASE IV 1.5 on a local area network and much more.

Jones also demonstrates how to manage the significant improvements to dBASE IV 1.5 including, greater mouse support allowing for more menu choices, and more options for using the "query by example" feature.

By following Jones' plentiful examples, exercises, and sample applications, users will be well on their way to mastering the power of dBASE IV 1.5.

$27.95              ISBN:  0-07-881817-6      864 pages

--------------------------------------------------------

Quattro Pro 4 Made Easy by Lisa Biow

Osborne/McGraw-Hill announces publication of Quattro Pro 4 Made Easy, a new guide that provides step-by-step instructions for mastering Quattro Pro 4, the latest release of Borland's super spreadsheet for the IBM and compatible PCs.

For beginners, Quattro Pro author and trainer, Lisa Biow, leads users through the basics of creating, editing, and printing a spreadsheet. Experienced users can expand their skills with Biow's explanation of the program's more complex capabilities such as customizing the environment, creating and annotating complex graphs, working with multiple spreadsheets simultaneously, linking and consolidating worksheets and much more.

For users who need to learn the new features in version 4, the book's coverage includes, the three PowerBars that provide improved mouse support allowing users to insert, sort, and copy blocks of data; special customization features that let users creates styles and numeric display formats; and the Audit Analysis tool that quickly demonstrates dependencies between cells.

It's all here in Quattro Pro 4 Made Easy. -- one outstanding hasslefree guide that can turn a spreadsheet novice into a savvy Quattro Pro.

$19.95              ISBN:  0-07-881788-9      612 pages

--------------------------------------------------------

C DiskTutor by L. John Ribar

(Includes A Special Version of the WATCOM C Compiler On One 3.5-Inch Disk)

Osborne/McGraw-Hill announces publication of a new DiskTutor package that includes an excellent, self-teaching book on C and a special version of the acclaimed WATCOM C compiler with an active programming environment.

For anyone new to programming, Ribar teaches the fundamentals of the C language step-by-step. Readers begin by loading the WATCOM C compiler, then following the examples in the book and on the disk to begin writing their first programs. After mastering beginning concepts, Ribar explains the basics of program design, date and storage manipulation, controlling program flow, the C preprocessor, the C function library, designing reuseable program libraries and much more.

For C programmers who want to expand their skills, Ribar presents case studies that offer real-world C programming solutions that can be incorporated into daily routines such as a programmer's calculator, file dump utility, electronic address book, test-based user interface library and more.

This new DiskTutor is one of the best hands-on introductions to programming in the ANSI C standard that's guaranteed to help C programmers to get the job done.

$39.95        ISBN:  0-07-881798-6      480 pages

--------------------------------------------------------

The Mac Made Easy by Martin S. Matthews

Osborne/McGraw-Hill announces publication of The Mac Made Easy, a new book written to help users get productive results fast with their Macintosh computer.

As the Apple Macintosh has become more and more sophisticated and powerful, Osborne/McGraw-Hill has received more and more requests for a guide that will get Mac users up and running quickly. Written by acclaimed author, Martin S. Matthews, The Mac Made Easy provides all the information anyone could need to master their Mac. Matthews' coverage for beginners includes meeting the Mac and learning about the different Mac models; discovering what makes the Mac run through exploring Mac components; controlling the Mac by mastering the mouse and the keyboard controls; discovering icons, buttons, and menus; working with files, folders and disks; and much more.

More experienced users can take advantage of discussions on System 7 and the System Folder; investigating the control panel; desk accessories; fonts, printers and printing; a review of Hypercard; communicating with the Mac, and much more.

The Mac Made Easy is packed with screen displays, hands-on tutorials, and confidence-building exercises that will have anyone operating their Macintosh like a pro in no time.

$19.95              ISBN:  0-07-881773-0      352 pages

--------------------------------------------------------

Osborne/McGraw-Hill

2600 Tenth St, Berkeley, CA 94710

510-549-6600


Automold II Injection Mold Design
AUTOMOLD II

Major Update Of The Injection Mold Design Package For AutoCAD Now Shipping

East Providence, RI. April 15, 1992 -- Cadmaster, Inc. today released AutoMold II, the injection mold design package for AutoCAD. Since 1984 The AutoMold line of software has been in use in many mold design shops throughout the world. The package has received minor updates in it's 8 year history, with this update being a major rewrite to take advantage of recent advancements in computer technology. This version makes better use of the new generation of high speed IBM compatible computers and graphics cards. It also offers a consistent "point and click" method of input selection throughout the program.

New AutoMold II Features

- Works with AutoCAD Release 10 (386 version suggested)

  and later.

- Seamless integration with AutoCAD

- Easy installation. Program can be installed on any disk

  drive and sub-directory.

- Uses pop-down menus. No digitizer tablet necessary.

- All four DME moldbase views created simultaneously

- Mouse support / Pop Up Menu selections

- Output reports to LPTI, LPT2, LPT3, or disk.

- Tunnel Gate program draws results interactively on screen.

- New highly illustrated manual.

New Tools

- Draw boxes with/without corner fillets

- Multi extend entities

- Multi Trim / Multi Explode entities

- Modify block definitions

New Datum Dimensioning Features:

- Auto dimension LINES, CIRCLES, ARCS, BLOCKS, etc..

- Associative / non-associative dimensions

- Mirror dimensions

- Faster calculations

AutoMold II requires the 386 version of AutoCAD R10 or later, and a graphics board supporting the pop down menus. The software is shipping now, with a retail price of $995.00. Existing users can update for $195.00.

CADMASTER Inc, East Providence, RI

401-434-2970


The Diet Balancer
The First Macintosh Nutrition Software For The Mass Market

The Diet Balancer is now available for Mac Users

Wappingers Falls, New York, March 1992 - Nutridata Software is proud to announce the release of the first Macintosh version of its Diet Balancer suggested retail price $79.95. The new version of the Diet Balancer is a unique product in the Macintosh nutrition/health software market because it is tailored to the needs of professionals as well as the average consumer. The system requirements are Mac Plus or higher, System 6.0.4 or higher, 600K memory, hard drive optional.

The Mac Diet Balancer has the following major features:

- view nutritional contents of over 1,700 foods,

  including fast food

- analyze diets and meal plans

- add new foods to the database

- graph weight loss, calories, cholesterol and fat

  consumption against targets

- save diet history for unlimited time period

- calculate weekly and monthly performance.

Today about 75,000 people, including doctors and dietitians, are reaping significant health benefits with the use of the Diet Balancer IBM version. Nutridata expects their new Macintosh users to be as satisfied as their current customers.

- John Stead, President of FCI Capital, a fast paced and fast growing business in Southers California says: "By using the Diet Balancer to control my intake of saturated fat over a period of four months, I was able to reduce my cholesterol from 306 down to 208."

- Suzanne Glassman of Durham, North Carolina lost 110 lbs in 9 months. She was motivated to lose weight once and for all because she and her husband wanted children. She kept her weight in check during her pregnancy, and has maintained her desired weight since then. "Knowing that I was getting enough to eat and that I had control over my diet was what made it work. Other diets told me what to eat, but with Diet Balancer I was in control."

- Ms. Woodard, wife of Rev. Tom Woodard, Sarasota, Florida began using the program in conjunction with supervision from the Endocrinology Diet Center where she gets treatment for diabetes. Her insulin requirements have been reduced as a result of carefully monitoring her diet from 70 units a day to just 10.

The Mac Diet Balancer can be ordered directly by calling Nutridata Software: 1-800-922-2988.

--------------------------------------------------------

Nutrition Software Is Going National

Nutridata Software's Home Health Series is now available nationwide Wappingers Falls, New York, March, 1992 - This spring Nutridata Software signed contracts with the nationwide operating wholesalers Software Resource, Novato, CA and Soft-Kat, Chatsworth, CA as well as with the major chain Computer City, Fort Worth, TX. Nutridata Software's Diet Balancer and Cooking Companion are the first nutrition/health products with a national distribution network.

Through the new distribution channels the Home Health Series is now available at the following computer stores:

- CompUSA

- Electronics Boutique

- Computer City

- Software Etc.

- Egghead Discount Software

- Walden Software.

In addition, the Home Health Series will soon be purchased through the military exchanges and for the educational market.

From a meager beginning to a fast growing company - "We finally made it into the shelves of all the major computer stores and into all important markets. This is a major breakthrough," says Robert Antonellis, the 29-year-old president of Nutridata Software.

In 1987 Robert Antonellis left his secure position at IBM to start Nutridata Software Corp. To complete the first version of Diet Balancer, he worked about 2,500 hours and wrote 18,000 lines of code. One year later, after finishing his first project, he had no financial resources to market his product. Only a write-up in a well-known computer magazine made it possible for Robert Antonellis to sell directly to the end-users and license his product.

Today about 75,000 people are using Nutridata Software's Home Health Series. The product line of Diet Balancer 3.0 and the Cooking Companion 1.0 is going to be complemented with the release of the first Diet Balancer Macintosh version this spring. A Macintosh version of the Cooking Companion will be released this fall.

The programs can be purchased at any of the dealers listed or by contacting Nutridata Software at 1-800-922-2988.

Nutridata Software Corp

223 Myers Corners Rd, PO Box 769

Wappingers Falls, NY 12590

914-298-1308


CoHort CoPlot, CoDraw & CoStat
CoHort Software Provides Specialized Software to Scientific and Engineering Communities

Building on Success of Value-Packed Plotting, Drawing and Statistical Packages, CoHort's Future Offerings Will Include Specialized, Customizable Programs

BERKELEY, CA--March 31, 1992....Founded by a scientist looking to fill his own software needs, CoHort Software of Berkeley, California has become the producer of three popular, value-packed programs, with more on the way.

CoHort currently offers CoPlot 2.1, CoDraw 2.1 and CoStat 4.1, feature-rich PC programs for plotting, drawing and statistical analysis aimed at scientists and engineers in the academic and corporate communities. (See brochure attached.) Each software package is priced at just $159 (all three for $395), making them some of the better values in the often overpriced world of PC computing.

The packages have drawn raves from more than 2,500 users as well as PC Magazine ("Don't let the low price fool you; this is excellent software"), the Tokyo PC Newsletter ("...professional software for professionals") and SacraBlue magazine ("The folks at CoHort Software are to be congratulated for the excellence of this product."). Major users include Hewlett-Packard, GE, Michelin Americas, Dow Chemical, the Massachusetts Institute of Technology, University of California (Berkeley), The Army Corps of Engineers, Los Alamos National Laboratory, U.S. Dept. of Agriculture and Sandia National Labs plus an array of international agencies.

CoHort president Robert Simons, 34, is a trained biologist (Stanford, B.S., and U. of Arizona, M.S.) who found that his efforts as a graduate student were hampered by the lack of affordable sophisticated software for analyzing the results of experiments.

"I became interested in improving the design of my experiments and the analysis of the data," recalls Simons, a native of Palo Alto, CA.

That interest prompted Simons to create his own statistics software at the University of Arizona in 1982. His early efforts were improved after receiving his Masters degree (1983).

Simons worked for both the university and the USDA Extension Service as a computer consultant from 1983-85. Simons returned to the San Francisco Bay Area and founded CoHort Software in 1986, developing his software while subsisting on savings. By 1988, all three programs were fully developed and quickly found an appreciative market. The original price for each program was $99. At $159 each, today's advanced versions offer sophisticated features, full documentation and technical support normally offered only by packages costing three times as much (or more).

Following the lead set by Borland, which challenged the notion that premium software must be expensive. CoHort offers premium quality at a reasonable price.

"Any user who buys CoHort software gets a terrific deal," says Simons. "They're paying for the good software and good support. We don't have hot tubs, company BMWs, or inflated salaries." It's not just talk for Simons, who runs a tight ship with a total staff of three in a modest office.

Future developments being considered at CoHort Software include expanding their software offerings for analyzing and graphing data into specialized areas such as visualizing very large data sets. "There is a great need for software to deal with the mountains of data that some researchers generate," says Simons.

At the same time, future CoHort programs will offer users more programmability, so that they can customize applications to suit their particular needs. Simons sees this as a major industry-wide trend.

"In a sense, everyone will be a programmer at some level," says Simons. "User customization of software is what will bring them the most value and that's the direction in which CoHort is moving. For some users this will mean changing a few defaults that determine how a program behaves. For others, it will mean programming custom routines in a sophisticated scripting language."

However CoHort's products evolve, the company philosophy of offering sophisticated software at affordable prices will stay the same, Simons guarantees.

"We try to give users a great deal."

--------------------------------------------------------

NEW CoPlot 2.1 IS GRAPHICS SOFTWARE BARGAIN FOR SCIENTISTS & ENGINEERS

BERKELEY, CA--March 31, 1992....CoHort Software of Berkeley, CA, creator of CoPlot, CoDraw and CoStat graphics and statistics software for scientists and engineers, today announced CoPlot 2.1, a significantly enhanced version of the company's internationally acclaimed CoPlot software package offering premium features and documentation for just $159.

CoPlot 2.1 is a flexible scientific graphics program combining a user-friendly design with sophisticated features to create publication-quality scientific graphs, including true 3-D graphs that can be rotated and viewed from any angle. (See brochure attached.)

System requirements are an IBM PC, PS/2 or compatible running DOS 2.0 or higher with 640 Kbytes RAM and 900 Kbytes of disk space. CoPlot can use (but does not require) a Microsoft compatible mouse.

Scientific features provided with CoPlot 2.1 include the choice of 16 graph types, among them the program's "ace" -- true 3D graphs. Other graph types in CoPlot include XY, contour, polar, triangular, correlation matrix, and various bar charts. In addition, CoPlot offers high-quality smooth-outline (Bezier) fonts plus subscripts, superscripts, diacritics for foreign language support and the capability of placing Greek and mathematical symbols in the text. Other features for scientists are error bars and numerous kinds of axes (Cartesian, Pi, Date, Hour:Minutes:Seconds, 1/x, log base 10, double log base 10, natural log, square root, probability, standard deviation and Probit). Scientists can also place single-line comments, wrap-around text comments and arrows anywhere on the graph, plot data sets and functions on either the left or the right Y axis and work with up to 16 graphs simultaneously.

Accurate on-screen portrayal of graphs makes modification convenient. On-screen menus beside each graph allow users to specify which parts of the graph to modify and the nature of the modification. Changes are shown immediately. When finished, the user can print or plot the graph at the maximum resolution of the printer or plotter.

CoPlot 2.1 provides an array of features which make it easy to precisely control the appearance of graphs. Fonts, line widths, marker types, colors and text attributes are easily controlled. Graphs are created as soon as data and/or equations are entered. Users can save graphs exactly, facilitating the creation of similar graphs in the future with different data sets. Easily recorded and edited keystroke macros can be named or assigned to Alt or Function keys.

Easy data entry and publication-quality output round out the features of CoPlot 2.1. Floatingpoint numbers can be entered and edited in unlimited numbers with CoPlot's spreadsheet-style data editor or directly imported from CoStat data files (CoStat is CoHort's statistical software). Data can also be imported from ASCII, dBASE III/IV, Excel, Lotus 1-2-3 (Versions 1, 2 and 3), Microstat II, MSTAT, Quattro (Pro) and Symphony data files. The editor can sort the data, perform any algebraic transformation, select a subset of the data, find outliers and perform an FFT to calculate a power spectrum. Equations are entered in algebraic form.

Output is superb. Graphs can be scaled to the desired size, then printed on a printer or plotter at the highest resolution supported by those devices. The program's own fonts (including Helvetica, Times, Century, Courier and Greek) have been reworked for improved appearance, both on-screen and as output. A new PostScript driver supports PostScript fonts. Print speed rivals or exceeds that of CoPlot's competitors, with CoPlot providing background printing for even greater user efficiency. CoPlot supports all common graphics cards (including Hercules and super VGA 800x600). All screen and printer drivers support either sixteen colors or sixteen shades of gray (via dithering).

Printer support includes all major printers, including HP LaserJets, PostScript printers, color PostScript printers and dot-matrix printers. Plotter support includes all HP plotters and other HPGL and HPGL/2 compatible devices. Graphics file types include CGM, HPGL, HPGL/2, Lasergraphics LL, Lotus PIC, PCX, encapsulated PostScript EPS, SCODL, Targa TGA (type 9) and WordPerfect WPG files. These files can be used to export the graphs to other graphics programs and to make slides of the graphs.

Other significant new features included in CoPlot 2.1 are built-in linear and non-linear regression (which solves for the unknowns in any algebraic equation) and digitizer support for Kurta and SummaGraphics digitizers. An "all axes" feature to edit attributes of all axes simultaneously and larger grid sizes up to 175 x 175 points for 3-D and contour graphs are now included. Many minor features have also been improved to round out CoPlot 2.1.

Thorough documentation and free technical support are provided by CoHort Software.

"CoPlot is a versatile tool for members of the scientific and engineering community," says CoHort Software President Robert Simons. "As a scientist by training, I appreciate the needs of scientists and engineers for a full-featured scientific graphics program that anyone can afford. I think we've accomplished that goal with CoPlot 2.1. Our attractive pricing is definitely influenced by the lead Borland has shown in other areas of the software arena-- providing high-quality software at a reasonable price."

CoPlot 2.1 has a retail price of $159, while offering features comparable to packages costing three times as much (or more). An upgrade to version 2.1 is available to registered users for $50. A network version and site licenses are available through CoHort Software of Berkeley, CA. For more information, call (510) 524-9878 or FAX (510) 524-9199.

CoHort Software of Berkeley, California has produced affordable high-quality software for scientific and engineering users since 1986. Its current products include CoPlot 2.1, CoDraw 2.1 and CoStat 4.1. Each software package is priced at $159; all three can be purchased for $395.

--------------------------------------------------------

NEW CoDraw 2.1 IS FLEXIBLE TECHNICAL DRAWING SOFTWARE FOR $159

Popular Drawing Program Provides Premium Features, Documentation & Support

BERKELEY, CA--March 31, 1992....CoHort Software of Berkeley, CA, creator of CoPlot, CoDraw and CoStat graphics and statistics software for scientists and engineers, today announced CoDraw 2.1, a significantly enhanced version of the company's internationally acclaimed CoDraw technical drawing software package offering premium features and documentation for just $159.

CoDraw 2.1, is a highly flexible drawing program designed to create high-quality technical drawings. System requirements are an IBM PC, PS/2 or compatible running DOS 2.0 or higher with 512 Kbytes RAM and 700 Kbytes of disk space. CoDraw can use (but does not require) a Microsoft compatible mouse.

Drawings done in CoDraw 2.1 are accurately shown on screen as they are created, a big plus for users. Menus appear beside each drawing to facilitate changes or creation of new objects. When printed, drawings are rendered at the maximum resolution of the printer or plotter.

At the heart of CoDraw 2.1 is the capability to create a wide variety of objects, including lines, arrows, splines, filled splines, circles, arcs, ellipses, markers, filled areas and text. (See brochure attached.) Bezier lines and filled area types can be created with the new version of CoDraw. CoDraw's text-drawing facilities use smooth outline (Bezier) fonts which can be scaled to any size and rotated to any angle. By using embedded text commands, users can access subscripts, superscripts, underlines, overstrikes, italics, different fonts, Greek characters, scientific characters and foreign language characters. CoDraw 2.1's sophisticated character editor allows users to edit any character in any font or create their own characters and symbols.

When existing objects need to be edited, CoDraw 2.1 is up to the task, allowing users to take different approaches to editing created objects. For example, users can edit the attributes of individual objects or groups of the same type of object. Groups of diverse objects can be edited as follows: move, copy, delete, scale, rotate, and load from (or save to) a file. In addition, users can move, insert or delete individual points within objects.

Importing graphics into CoDraw 2.1 can be done from HPGL plotter files and Lotus PIC graphics files. A new feature of CoDraw 2.1 is a raster-to-vector conversion procedure which allows users to import PCX files. Users can then edit the graphics as needed and print them at the full resolution of their printer or plotter.

CoDraw can also import and enhance graphs from CoPlot, CoHort Software's plotting program. For example, CoDraw could be used to draw a chemical structure on an existing graph.

CoDraw also has the ability to record and edit keystroke macros which can be named or assigned to Alt or Function keys.

All CoDraw 2.1 drawing files are ASCII text files employing a simple graphics language which is documented in the manual. Users can easily write programs (in C, Fortran, BASIC, Pascal and so forth) that create drawing files. CoDraw 2.1 can then be used for interactive editing and printing. Users receive the benefits of CoDraw 2. l--high-quality, interactive, WYSIWYG graphics (plus access to a wide range of screens, printers and plotters) without the drawbacks of buying/writing their own graphics subroutines which take up useful memory and code space in their programs.

Some other new features offered by CoDraw 2.1 are revised fonts with an improved appearance at all sizes, direct support of PostScript fonts, background printing and digitizer support (for Kurta and SummaGraphics digitizers).

CoDraw 2.1 output is first rate. The program's own fonts (including Helvetica, Times, Century, Courier, and Greek) have been reworked for improved appearance, both on screen and as output. A new PostScript driver supports PostScript fonts. Print speed rivals or exceeds that of CoDraw's competitors with CoDraw providing background printing for even greater user efficiency. CoPlot supports all common graphics cards (including Hercules and super VGA 800x600). All screen and printer drivers support either sixteen colors or sixteen shades of gray (via dithering).

Printer support includes all major printers, including HP LaserJets, PostScript printers, color PostScript printers and dot-matrix printers. Plotter support includes all HP plotters and other HPGL and HPGL/2 compatible devices. Graphics file types include CGM, HPGL, HPGL/2, Lasergraphics LL, Lotus PIC, PCX, encapsulated PostScript EPS, SCODL, Targa TGA (type 9) and WordPerfect WPG files. These files can be used to export the drawings to other graphics programs and to make slides of the drawings.

Thorough documentation and free technical support are provided by CoHort Software.

"CoDraw is a valuable tool for users who need high-quality technical drawings," says CoHort Software president Robert Simons. "CoDraw 2.1 is designed to give full-featured technical drawing performance at a reasonable price. Our attractive pricing is definitely influenced by the lead Borland has shown in other areas of the software arena--providing high-quality software at a reasonable price."

CoDraw 2.1 has a retail price of $159, while offering features comparable to packages costing far more. Current CoDraw users may upgrade to CoDraw 2.1 for $50. A network version and site licenses are available through CoHort Software of Berkeley, CA. For more information, call (510) 524-9878 or FAX (510) 524-9199.

CoHort Software of Berkeley, California has produced affordable high-quality software for scientific and engineering users since 1986. Its current products include CoPlot 2.1, CoDraw 2.1 and CoStat 4.1. Each software package is priced at $159; all three can be purchased for $395.

--------------------------------------------------------

NEW CoStat 4.1 STATISTICAL SOFTWARE HAS IMPRESSIVE ARRAY OF FEATURES FOR $159

Sophisticated Statistics Program Provides Premium Features, Documentation & Support

BERKELEY, CA--March 31, 1992....CoHort Software of Berkeley, CA, creator of CoPlot, CoDraw, and CoStat graphics and statistical software for scientists and engineers, today announced CoStat 4.1, a significantly enhanced version of the company's popular CoStat statistical program, for just $159.

Costat 4.1, an interactive menu-driven statistical program that has many features of high-end micro and mainframe statistics packages, makes commonly used statistical procedures available to microcomputer users at a reasonable price. System requirements are an IBM PC or PS/2 (or compatible) running DOS 2.0 or higher, 512 Kbytes RAM and 600 Kbytes of disk space. CoStat can use (but does not require) a Microsoft compatible mouse.

CoStat 4.1's major features include intelligent menus, large intelligent data files, numerous statistical procedures, publishing capability and thorough documentation, making CoStat an exceptional value among statistical programs available to PC users.

Intelligent menus remember all settings on all menus in CoStat. This makes it easy for users to make small changes and re-run an analysis. CoStat also supports keystroke macros that are easily recorded, edited and can be named or assigned to Alt or Function keys. This facilitates running the same analysis on different data sets.

CoStat can handle very large data sets. CoStat data files may contain up to 100 variables (columns) with an unlimited number of double-precision floating-point numbers. CoStat data files hold descriptions of experimental designs (in terms of variables, replicates and treatments) plus the actual numeric data. Once a data file is created, a user can analyze it quickly without tediously re-describing the experimental design.

CoStat 4.1 provides numerous statistical procedures including ANOVA (12 different experimental designs), correlation, descriptive statistics, analysis of frequency data, and nonparametric statistics. CoStat offers a variety of regression options: polynomial, stepwise polynomial, multiple regression (including backwards elimination and all subsets), Fourier regression, linearizable nonlinear regression and true non-linear regression (which solves for the unknowns in any algebraic equation). In version 4.1, CoStat adds Tukey's Honestly Significant Difference and the Tukey-Kramer test to the list of options for multiple comparisons of means.

CoStat's spreadsheet-like data editor has slash commands for creating subsets, finding outliers, sorting, printing, transforming data (with algebraic equations) and even performing an FFT to get a power spectrum. CoStat easily imports data from its CoHort Software stablemate, CoPlot 2.1, as well as ASCII, dBASE III/IV, Excel, Lotus 1-2-3 (versions 1, 2 and 3), Quattro (Pro) and Symphony data files.

CoStat 4.1 also has a variety of utilities for evaluation or numeric integration of equations, permutations, combinations, factorials, random numbers, simple hypothesis tests and statistical tables (F, t, Normal, and Chi-square distributions). CoStat can direct output to the screen, a printer and/or a file. Four high-resolution graph types are included (XY, histogram, 3D histogram and cumulative frequency). (See brochure attached.) Users can jump to CoPlot to create publication-quality graphs.

Printer support includes HP and Canon laser printers (and compatibles) and all common dot matrix printers.

Thorough documentation and free technical support are provided by CoHort Software.

CoHort Software president Robert Simons sees CoStat 4.1 as an affordable answer to the need for thoroughly-featured statistics software in private industry, the academic community and government agencies. "CoStat 4.1 provides users with real value and high-end performance. Our attractive pricing is definitely influenced by the lead Borland has shown in other areas of the software arena--providing high-quality software at a reasonable price," says Simons.

CoStat 4.1 has a retail price of $159 while offering features comparable to packages costing far more. Current CoStat users may upgrade to CoStat 4.1 for $50. A network version and site licenses are available through CoHort Software of Berkeley, CA. For more information, call (510) 524-9878 or FAX (510) 524-9199.

CoHort Software of Berkeley, California has produced affordable high-quality software for scientific and engineering users since 1986. Its current products include CoPlot 2.1, CoDraw 2.1 and CoStat 4.1. Each software package is priced at $159; all three can be purchased for $395.

--------------------------------------------------------

CoHort Software, PO Box 1149, Berkeley, CA 94701

510-524-9878


American Airlines SalesLink Deal
Evanston, IL, March 31 -- SalesLink Systems today announced an-agreement with American Airlines under which it will provide a customized, Microsoft Windows-based sales force automation system to American's SABRE Travel Information Network.

SABRE will use the customized SalesLink for Windows system to support the information management and sales-process reporting requirements of its more than 400 sales and customer service personnel throughout North America. Travel agents and corporations purchase access to SABRE's international communications network for reservations, billing and information from American and other commercial passenger airlines. SABRE's sales force also sells computer and communications equipment that clients may use in connecting with the network.

American Airlines chose SalesLink Systems through a competitive procurement process involving multiple suppliers. Terms of the agreement were not disclosed.

"American Airlines has selected a state-of-the-art, customized. Windows-based solution that not only will increase the productivity of its SABRE sales force and deliver more timely information to its sales management, but will help provide better service to its customers," said SalesLink Systems President William N. Holmes.

SalesLink Systems develops and markets customized sales force automation solutions for companies engaged in business-to-business selling of products or services characterized by a complex. information-intensive selling process.

Its SalesLink Solution consists of the "front-end" SalesLink for Windows data-collection and sales reporting system running on portable notebook computers, and the "back-end" SalesLink for Windows/Manager's Edition data-aggregation and analysis system running on powerful standalone personal computers. The SalesLink Solution uniquely and conveniently captures the outcome of every competitive selling opportunity and the reasons for those outcomes, and facilitates the graphical analysis of the aggregated information, a process SalesLink Systems describes as "deriving knowledge from information."

SalesLink Systems

Business and Technology Center

1840 Oak Ave, Evanston, IL 60201

708-866-0400


LanRover/L for PowerBook
CAMBRIDGE, Mass., March 30,1992 -- Shiva Corporation today announced LanRover/L, a second-generation dial-in server for the new Apple PowerBook. Compatible with AppleTalk Remote Access (Apple's dial-in software), LanRover/L provides users and network managers with a number of unique benefits that address the special needs of workgroups or departments implementing remote access on a several-user or large-scale basis.

LanRover/L is a compact hardware device that connects directly to the network. Remote PowerBook or Macintosh users dial into LanRover/L and are then able to access file servers, e-mail or any other network services. LanRover/L also provides shared dial-out- which allows users to access on-line information services such as CompuServe or America Online. Other features, such as centralized management and advanced security, address the needs of the departmental network manager.

LanRover/L is the first in a line of next-generation Shiva servers planned for introduction in 1992. Shiva's new servers, such as LanRover/L, address the implications of an anticipated explosion in dial-in network access. According to IDC, Framingham, MA, worldwide sales of remote access products are expected to increase from $56 million in 1991 to $300 million in 1995. Shiva's servers are targeted to network managers who are faced with supporting many new mobile users, all of whom will want to access the company LAN (Local Area Network) with the same efficiency, ease of use and transparency one experiences when working at the office.

According to Dan Schwinn, Shiva president and founder, "LanRover/L goes beyond personal remote access solutions to address departmental remote access needs. A workgroup or department-level dial-in product must provide advanced security features and centralized management for the network manager. LanRover/L answers these needs."

According to Apple market analyst Pieter Hartsook of The Hartsook Letter, "LanRover/L... provides industrial strength connectivity."

Centralized Management

LanRover/L is unique in that it can be centrally managed and configured. Using the bundled Shiva Net Manager software, one or more units can be configured and managed from a Macintosh anywhere on the network, even a remote location. Network managers can configure the LanRover/L, add or delete user lists and passwords, and set zone access privileges. User information can be downloaded to multiple LanRovers simultaneously.

Security

To restrict unauthorized access, security features include individual user and administrator passwords, dial-back security and configurable zone access privileges. Automatic dial-back offers two advantages: an added level of security and more efficient billing for corporate users. An activity log, accessible through Shiva Net Manager, keeps track of when a LanRover/L remote access connection is attempted, established, or disconnected. It also reports error conditions and dial-out activity.

Shared Dial-Out

Macintosh users on the AppleTalk network can dial out through LanRover/L to access information services like AppleLink or CompuServe. Shared dialout saves network administrators the expense of dedicating a telephone line and modem to each Macintosh user, as well as the time spent managing multiple lines and modems. Any user running Macintosh System 6.0.7 (or later) or System 7 can take advantage of this feature.

Dedicated, Reliable Server

LanRover/L is a dedicated, stand-alone device that can be easily installed in a secure location. Network managers can choose to lock LanRover/L in the telephone closet - protecting it from accidental shut-off or user tampering.

Since it's a dedicated device, LanRover/L doesn't suffer performance degradation, even under heavy server use, or from competing loads imposed by end user applications.

LanRover/L provides a cost-efficient solution. In networks with several remote users, the cost of dedicating a Macintosh as an AppleTalk Remote Access server can be high.

Compatibility with AppleTalk Remote Access

LanRover/L is fully compatible with AppleTalk Remote Access, dial-in software bundled with each PowerBook and available separately for Macintosh System 7 users. LanRover/L takes full advantage of the ease-of-use and interface of Apple's software.

Specifications

LanRover/L's hardware has one LocalTalk port and one serial port and requires an external modem. LanRover/L can work with any external Apple 2400 bps or any external Hayes-compatible 2400 bps or higher-speed modem with the appropriate AppleTalk Remote Access modem script. Shiva NetManager and FreeTerm communications software are bundled with the unit.

Pricing and Availability

LanRover/L will be available for a retail price of $699 in May 1992. The product will be sold by dealers and distributors.

Special Introductory Price

Special introductory seed offers - priced at $499 per unit - one per customer - will be available direct from Shiva until July 1, 1992.

Shiva Corporation

Shiva Corporation is a privately owned company based in Cambridge, MA. The company was founded in 1985 and pioneered the market for remote access products for Macintosh networks. Shiva offers a broad line of dial-in communications servers and routers for Macintosh and PC computers. According to International Data Corporation (Framingham, MA), Shiva is the leading AppleTalk internetworking vendor, with 56% of the market.

Shiva is working closely with Apple and the Internet Engineering Task Force (IETF) on the next generation of AppleTalk Remote Access based on PPP (Point to Point Protocol), which will enable multi-protocol, cross-platform support.


PC Globe MacUSA Electronic Atlas
PC GLOBE, INC. RELEASES MacUSA, NEW ELECTRONIC ATLAS OF THE FIFTY STATES

March 25, 1992 -- Tempe (AZ)--PC Globe Inc. has released MacUSA, its eagerly anticipated electronic atlas of the 50 states for the Macintosh computer. The new program began shipping this week and lists for $59.95. MacUSA offers instant profiles of all fifty states and Puerto Rico, with detailed maps, colorful graphics and annually updated data. State information can be instantly compared, either with bar charts or thematic maps. Maps and graphics can be exported to a variety of graphics, word processing, spreadsheet and desktop publishing programs.

MacUSA's maps show major state features, elevations, and the location of major cities. It even shows each state flag and plays the entire state song. Other features include a self-adjusting time zone map, point-to-point distances, tourist attractions, state history, demographic and political information and much more. The program is an ideal tool for business, education, travel and home entertainment.

MacUSA is the Macintosh version of PC USA, the popular computerized atlas previously available only for DOS systems. The program will be sold at most major software retailers, and can also be bought directly from PC Globe, Inc. MacUSA is PC Globe's second Macintosh program. The first, MacGlobe, was released last October.

PC Globe, 4440 South Rural Rd, Tempe, AZ 85282-7044

602-730-9000


ACT! for Windows Contact Mgmt
DALLAS, TX, April 6, 1992 - Contact Software International Inc., developers of the leading family of contact management products, today announced ACT! for Windows, a major addition to its growing product line. The ACT! family of products combines the planning and scheduling benefits of a daytime organizer with the activity follow-up and support of a personal executive assistant.

ACT! for Windows incorporates industry standard dBASE file structures for contact data, activities, notes and history with powerful Windows features including predefined DDE macros to link with Microsoft Word for Windows, WordPerfect for Windows, Lotus, AmiPro, CC:Mail and other popular windows software. ACT! for Windows contains many of the most requested ACT! enhancements such as prioritization of calls, meetings, and to-dos and the ability to schedule recurring activities. Calendar management in ACT! for Windows is fully prompted and allows users to choose from WYSIWYG day, week, and month views.

The product also offers enhanced customization via user-definable field types (date, phone number, currency, numeric, character), a customizable pull-down menu system and user-selectable screen layouts.

ACT! for Window's contact database and comprehensive scheduling and calendar management functions are tightly coupled with full-featured communication tools. These tools include a telephone auto-dialer and a word processor with a built-in Houghton-Mifflin) spell checker that produces letters, memos, and other documents with a few clicks of the mouse. ACT! for Windows also includes many standard reports and a sophisticated WYSIWYG report generator. The advanced merge capabilities built into the ACT! interface automate the process of exchanging data among ACT! 2.x, ACT! for Windows and ACT! for the HP 95LX users.

"ACT! for Windows' robust features and capabilities make it an incredibly powerful Windows contact manager," said Pat Sullivan, president of Contact Software International. "More and more people are recognizing their need for a contact manager and we're excited about the opportunity to offer a comprehensive solution to Windows users."

ACT! for Windows will be available through leading distributors and resellers in the second quarter 1992, for a suggested retail price of $495.

Headquartered in Dallas, Texas, Contact Software International is the leading developer and marketer of contact management software, a category the company pioneered with the introduction of ACT! in 1987. Contact management is now one of the fastest growing software categories because of its universal application in automating the calendar and communication tasks of people that deal with people. Awarded PC Magazine's Editors' Choice award, ACT! has more than 250,000 users worldwide. For more information on the company or its products, write Contact Software International, 1840 Hutton Drive #200, Carrollton, Texas 75006; phone (214) 919-9500 or fax (214) 919-9750. International Office: InterSystems House, Tangier Lane, Eton, Berkshire, SL4 6BB ENGLAND; phone +44 (0) 753 830727 or fax +44 (0) 753 833317.


Tefax System with AutoFax
Milpitas, CA -- April 13, 1992 -- Relisys, a leader in quality computer peripherals, announced today that it is shipping Tefax System Model RA-2125 with AutoFax facsimile software compatible with Apple Macintosh computers running System 7.0.

The Tefax System Model RA-2125 facilitates the transmission, manipulation and reception of documents through Macintosh as well as IBM PC/AT or compatibles. The Tefax System combines five integrated functions: facsimile, graphics scanner, line printer, fax modem and computer interface utilizing built-in copier, scan mechanism, thermal print head and electronics.

Janson Wu, Relisys' vice president and chief operating officer, said, "Relisys is committed to keeping its products compatible with all new upgrades to the Macintosh line. Like the Macintosh, Tefax and AutoFax are extremely easy to use and provide the features of a sophisticated computer/fax system at a price the home office or small business can afford. This system provides the most complete communications capabilities ever encountered with the Mac and a free-standing integrated facsimile machine combination."

The Tefax System provides high-speed, high-resolution and 16-level half-tone document image scanning, computer editing, printing, copying, transmission and reception of text, half-tone images and graphics. It can also be used for local printing, copying and scanning as well as facing to any Group II or m fax machine.

AutoFax was developed by Jacent Information Systems, Inc. exclusively for Relisys. The application allows users to view faxes from the transmit and receive queues at any time. Incoming faxes can be automatically routed to a laser or dot matrix printer to produce plain-paper fax copies, or to the Tefax thermal printer.

Image capture capabilities are also included, which allow users to capture faxed images, store the images as fax files and/or convert the images to TIFF, PCX, BMP or MSP files for import into a program such as PageMaker or Ventura Publisher. Users can delete, copy or paste portions of a faxed image and rotate a received fax image that has been transmitted horizontally. Manipulated images can also be saved and retrieved as graphics or fax formatted files.

The application also includes scheduling and phone book functions. The scheduling function maintains a list of documents waiting to be faxed, transparently monitors received faxes, automatically sends unsent pages and redials if the transmission has failed. The phone book data file has a capacity of thousands of individual entries and supports hierarchical groups of entries which can be built containing any or all of the individual entries. Documents can be automatically transmitted to multiple groups and destinations at programmed time.

AutoFax appears to all applications (PageMaker, Excel, Designer as a standard printer device. It takes advantage of Windows font capabilities like Adobe Type Manager and Bitstream's Fontware, allowing users to generate fonts for both standard and fine fax resolutions for use with AutoFax. The driver supports both standard (200 x 100dpi) and fine (200 x 200dpi) resolutions in both portrait and landscape output orientations. The printer driver can also automatically send cover messages, headers and footers with each fax transmission.

Relisys' Model RA-2125 Tefax features a 16-character by two-line LCD status display that displays functions for easy setup and a sophisticated dialing system with many automatic dialing features such as one-touch, abbreviated and delayed dialing; automatic or manual redial, polling and sequential polling and a 100-number phone directory.

The Tefax RA-2125 with AutoFax software is compatible with the Apple Macintosh computers running System 6.0 or 7.0 and equipped with an RS 232 interface. The Tefax includes a limited one-year warranty and will be available immediately at a suggested list price of $1295.00.

Relisys Products. The company's goal is to provide the market with the best selection of nigh quality, competitively-priced computers and peripherals. Relisys products include monitors, terminals, and integrated facsimile systems offered to end users through distributors, as well as to OEMs and private labellers in personal computer and information systems applications. Relisys products are designed for compatibility with the range of IBM PC and PS/2 as well as Apple Macintosh systems.

Relisys was founded in 1987 to market branded products through distribution channels as a wholly-owned subsidiary of TECO Information Systems, Inc., part of the TECO Group., a $1.5 billion 3 year old Taiwan-based electrical and electronics company. TECO has been supplying the U.S. private label, VAR/VAD and OEM markets for the past thirteen years. Relisys headquarters are at 320 South Milpitas Boulevard, Milpitas, CA 95035.


Free 10NET 5.0 Starter Packs
ALAMEDA, Calif., April 20, 1992 -- Sitka announced today that 10NET, the peer-to-peer network for personal computers running MS DOS and Microsoft Windows, is now available at no cost through participating resellers.

Qualified customers will receive a fully functional 2-node 10NET 5.0 network operating system with absolutely no risk or obligation attached. To qualify, customers are required to show proof of ownership of two network interface cards. The free network is available now through June 30,1992.

"The promotion may sound crazy, but we know that 10NET is far and away the best peer-to-peer network available for PCs," said Lucia Hicks Williams, director of product marketing for Sitka. "It beats Netware Lite hands down in performance tests and provides built-in Windows support that exceeds anything available in LANtastic. Once they have tried it, we know customers will agree. So, we're giving them that chance with no strings attached."

To grow the network beyond the initial 2-node installation, 10NET Network Expander Packs can be purchased. Network Expander Packs include nodes 3, 4 and 5, free and unlimited technical support and the ability to grow the network over the telephone. To add additional nodes (six and up), customers can call Sitka toll-free and the software required is activated over the telephone using Sitka's proprietary serialization and expansion technology. A single 10NET network supports up to 255 personal computers per network.

10NET was the first peer-to-peer network developed for personal computers and the first network to support Windows 3.0 and 3.1. It is available in English, French, German, Spanish and Italian and currently has and installed base of over 650,000 users. 10NET customers include large corporate and governments sites in the United States and Europe as well as workgroups in small and medium size businesses.

10NET 2-node Network Starter Packs are free. Network Expander Packs are $299. 10NET telephone add-on nodes are $79 each. For the name of a 10NET reseller carrying the free Network Starter Packs and Network Expander Packs call 1-800-445-8677 or 1-510-769-9669.

--------------------------------------------------------

ALAMEDA, Calif., April 20, 1992 -- In response to decreasing profit margins and increasing competition among networking resellers, Sitka announced a new program today that guarantees resellers profits on the growth of each and every 10NET 5.0 network they seed or sell.

The Customer for Life program represents a radically different approach to buying and selling networks through two-tiered distribution. National distributors and resellers already signed up for the program that goes into effect today include Ingram Micro Inc., Merisel, TigerSoftware, Edutech, Service Plus Technology, 800 Software and Software City.

"The way most of this industry is buying and selling networks today is outdated. It is not working for end users of networking products and it is not working for resellers," said Deborah D. Triant, Sitka president and CEO. "We have leveled the playing field by giving every reseller partner the opportunity to make and keep customers for life."

Under the terms of the program, dealers who purchase and resell 10NET networks are automatically linked to their network installations by Sitka's proprietary expansion and serialization technology. When customer networks grow beyond the initial installation, the technology needed to add more computers to the network is "turned on" over the telephone by Sitka. At the same time, a commission equaling 20% of the price of the telephone add-on sale accrues to the originating dealer, and a 5% commission is credited to the originating distributor's Sitka account.

In conjunction with the Customer for Life program, Sitka is announcing a special promotion whereby a FREE, 2-node, fully functional 10NET network operating system (Network Starter Pack) is available through participating resellers, to any and all qualified end users.

The combination of the Customer for Life program and the free Network Starter Packs to end users, provides a powerful, long-term profit opportunity for the reseller -- an opportunity that is only limited by a resellers ability to strategically seed the free Network Starter Packs.

"Every reseller has experienced the frustration of spending weeks or months selling the benefits of a network solution, only to watch the customer purchase from a different dealer who cut the price by 10%," said Sitka president and CEO, Deborah Triant. "The Customer for Life program ends that frustration. It substantially improves reseller profit margins and guarantees that the reseller who provides the customer with the initial network reaps the incremental profits as that network grows."

Here's how the program works:

Step 1: Reseller buys 10NET Network Expander Packs from Merisel or Ingram Micro Inc. Every Network Expander purchased is bundled with three FREE 10NET Network Starter Packs for the reseller to give away. This 3:1 configuration is called a Customer for Life Dealer Pack. A special registration card on the outside of each Dealer Pack links the reseller to the serial numbers of each FREE Network Starter Pack inside.

Step 2: Resellers give the FREE 10NET 2-node Network Starter Packs to qualified customers. To qualify, customers provide the reseller with proof of ownership of at least two network interface cards.

Step 3: When customers want to expand their network, they purchase a 10NET Network Expander Pack from their reseller, which supplies them with nodes number 3, 4 and 5, free unlimited technical support and the ability to grow the network over the phone.

Step 4: To add more computers to the network, the customer simply calls Sitka toll free to activate those nodes over the telephone using Sitka's proprietary 10NET expansion and serialization technology. At that time, a commission equaling 20% of the price of the telephone add-on sale accrues to the originating dealer, and a 5% commission is credited to the originating distributor's Sitka account.

Customer for Life is a U.S.-only program and will remain in effect indefinitely, although certain elements of the program may change over time. Resellers will remain eligible for network annuities for as long as they participate in the program. The FREE 2-node network end user promotion will run through June 30,1992.

10NET 5.0 is the number one peer-to-peer network for DOS and Windows with over 650,000 nodes installed worldwide. It was the first peer-to-peer network developed for personal computers, and the first network to fully support Windows 3.0 and Windows 3.1. It is currently available in 21 countries worldwide in English, French, German, Spanish and Italian.

For more information call Sitka Corporation at 1-800-445-8677 or 510-769-9669.

--------------------------------------------------------

ALAMEDA, Calif., April 20, 1992 -- Changing the rules of PC LAN distribution, Sitka Corporation, a subsidiary of Sun Microsystems, Inc., today announced a new approach to buying and selling PC networking products through microcomputer hardware and software distribution channels.

The strategy, which has already garnered widespread industry support, is in direct response to the decreasing profit margins and increased competition that are rampant in U.S. computer and software distribution channels. It represents the strongest partnership ever between a manufacturer and distributor or reseller and ensures a relationship that is both long term and mutually profitable.

"Change and innovation in this industry depend upon people breaking old rules and finding new and innovative ways of doing business," said Scott G. McNealy, chairman, president and CEO of Sun Microsystems, Inc. "Sun does much more than invent new ways of working within an old framework. Programs like Sitka's 'Customer for Life' change the rules of the game."

Customer For Life

Dubbed the Customer for Life program, this innovative approach to software distribution links software resellers to an initial network sale and guarantees them a profit on every additional computer added to that network installation, regardless of where it is purchased, for as long as they participate in the program. This is in sharp contrast to standard practice, which requires retailers, integrators and mail order companies to make heavy investments in up-front selling costs, but offers no protection for the incremental revenue that can be earned as that network grows and changes over time. This problem is fueled by the fact that revenue from network growth -- add-ons to existing networks -- represents over sixty percent of the total network market, according to market research firm International Data Corp.

"The way most of this industry is buying and selling networks today is outdated. It is not working for end users of networking products and it is not working for resellers," said Deborah D. Triant, Sitka president and CEO. "We have leveled the playing field by giving every reseller partner the opportunity to make and keep customers for life."

The first product to be marketed through the Customer for Life program is 10NET 5.0, the leading peer-to-peer network for personal computers running MS DOS or Microsoft Windows. 10NET allows users of IBM PCs and compatibles to share information and printers.

Under the terms of the program, dealers who purchase and resell 10NET networks are automatically Linked to their network installations by Sitka's proprietary expansion and serialization technology. When customer networks grow beyond the initial installation, the technology needed to add more computers to the network is "turned on" over the telephone by Sitka. At that time, a commission equaling 20% of the price of the telephone add-on sale accrues to the originating dealer, and a 5% commission is credited to the originating distributor's Sitka account.

National distributors and resellers already signed up for the program which goes into effect today, include Ingram Micro Inc., Merisel, TigerSoftware, Edutech, Service Plus Technology, 800 Software and Software City.

For more information on the Customer for Life program, contact Sitka at 1-800-445-8677 or fax your request to 1-510-769-8772.

Sitka Corporation is an independent subsidiary of Sun Microsystems, Inc. The company was founded in 1984 and pioneered the market for cross-platform, peer-to-peer networking products. The company markets 10NET, MacTOPS, DosTOPS, SunTOPS and PenTOPS -- software to connect different hardware platforms and operating systems into a single network. Headquartered in Alameda, Calif., Sitka products are available in 7 languages and 42 countries worldwide.

Sun Microsystems, Inc., is the world's leading supplier of client-server computing solutions, which feature networked workstations and servers that store, process and distribute information. Used for many demanding commercial and technical applications, Sun's products command the largest share of the computer industry's fastest-growing market segment: workstations and servers. The company, founded in 1982 and headquartered in Mountain View, Calif., is a multibillion dollar corporation doing business worldwide.


Greenhouse Effect Experiment CD-ROM
Greenhouse Effect Detection Experiment (GEDEX) CD-ROM Released

by Lola M. Olsen and Archibald Warnock III

1992 has been designated as The International Space Year (ISY), the 500th anniversary of the discovery of America by Christopher Columbus and the 35th anniversary of the International Geophysical Year (IGY). The ISY effort is intended to stimulate significant contributions to worldwide scientific research and application activities under the theme "Mission to Planet Earth". The Space Agency Forum on the International Space Year (SAFISY) is responsible for coordinating these activities worldwide.

In preparation for the ISY and in support of SAFISY, the Earth Science and Applications Division of NASA sponsored an initiative, the Greenhouse Effect Detection Experiment (GEDEX), for which a workshop was organized to bring together a core group of scientists to share their research and ideas on the subject of global climate change. Participants in this workshop, which was designated the GEDEX Atmospheric Temperature Workshop, met in Columbia, Maryland, in July of 1991 for the purpose of obtaining a measure of progress and to recommend actions required to better understand the global atmospheric temperature record and its relationship with climate forcings and feedbacks.  Dr. Robert A. Schiffer and Dr. Sushel Unninayar organized the discussions where concepts and hypotheses were exchanged.  A document entitled, "The Detection of Climate Change Due To The Enhanced Greenhouse Effect: A Synthesis of Findings Based on the GEDEX Atmospheric Temperature Workshop," issued by NASA Headquarters in February 1992, summarizes the discussions which took place during the workshop.

One of the primary objectives of the workshop was to identify existing data (focusing on temperature) for the analysis of global climate change and to consolidate selected data sets onto CD-ROMs for distribution nationally and internationally to promote further research.  With this focus, Dr. Schiffer requested that NASA's Climate Data System (NCDS) staff prepare for the acquisition, archiving, implementation, and documentation of data recommended for distribution.

GEDEX Data Sets

More than 60 data sets were identified by workshop participants for inclusion, yielding nearly 1 gigabyte of data for this first 2-disk set of CD-ROMs. The data sets include surface, upper air, and/or satellite-derived measurements of temperature, solar irradiance, clouds, greenhouse gases, fluxes, albedo, aerosols, ozone, and water vapor, along with Southern Oscillation Indices and Quasi-Biennial Oscillation statistics.  Many of the data sets provide global coverage.  The spatial resolutions vary from zonal to 2.5 degree grids.  Some surface station data sets span more than 100 years.  Most of the satellite-derived data sets cover only the most recent 12 years.  Temporal resolution, for most data sets, is monthly. The first disk contains temperature, solar irradiance, cloud, and radiation budget data. The atmospheric constituent data are on the second disk.  The data sets, thoroughly documented by standard detailed catalogs, are easily identified through the use of summaries which provide temporal coverage and resolution, spatial coverage and resolution, parameters, etc.

Disk 1 --- Temperature, Radiation and Cloud Data

       Temperature --- Surface

The basic surface station temperature data set from NCDC/NCAR contains monthly temperature and precipitation values and is subdivided by continent.  A few records date from as early as 1738, and modern station data extend through 1989.  Other surface temperature anomaly data sets containing monthly gridded values were provided by Philip Jones, University of East Anglia Climate Research Unit, and by James Hansen, Goddard Institute for Space Studies (GISS).  Zonal and station temperature data are included from the State Hydrologic Institute's (Russia) Konstantin Vinnikov.  These data sets extend over 100 years of record.  Gridded 2.5 degree monthly sea surface temperature data and anomalies as calculated by Richard Reynolds from NOAA's Climate Analysis Center also reside on this disk. These SST values are from AVHRR sensors on NOAA polar orbiters and are blended with ship and buoy data. Investigating the effect of the El Nino/Southern Oscillation (ENSO) on the temperature anomaly record, may be done with the data set provided by the University of East Anglia's Climate Research Unit containing the Southern Oscillation Index calculations, along with the Tahiti and Darwin mean sea level pressures from which they are derived.

   Temperature --- Upper Air

NCDC/NCAR contributed comprehensive monthly station rawinsonde data. Both temperature and humidity profiles are included in this data set. Another upper air temperature data set was produced by James Angell, NOAA ARL.  It contains seasonal zonal temperature deviations from rawinsonde data around the world.  Angell also provided Quasi-Biennial Oscillation temperature and zonal wind data at 50, 30, and 10 mb. Marshall Space Flight Center's Roy Spencer provided more than 12 years of mid-tropospheric temperature and anomaly data from the TIROS Operational Vertical Sounder Microwave Sounding Unit (TOVS-MSU), flown on NOAA polar orbiters.  Stratospheric temperature data were provided by Harry van Loon and Karen Labitzke through NCAR. Although these data are only available for the northern hemisphere, they provide a valuable monthly zonal product for the years 1957 to 1991.  In addition, profiles of meteorological data from NMC were provided at 1 km intervals for the Stratospheric Aerosol and Gas Experiment (SAGE II) time period.

    Solar Irradiance and Transmission

Solar transmission and surface-measured irradiance data were supplied by Ellsworth Dutton, NOAA Climate Monitoring and Diagnostics Laboratory (CMDL).  The daily solar transmission indices from the Mauna Loa Observatory begin in 1958 and continue through 1990. The hourly solar irradiance data make up a rare collection of solar data collected at the surface from 1976 to 1989 at selected sites.  NASA Goddard Space Flight Center's Lee Kyle provided solar irradiance data from the Nimbus-7 Earth Radiation Budget (ERB) instrument, and Langley Research Center's Robert Lee, offered the solar irradiance data from NOAA-9, NOAA-10, and ERBS. Richard Willson of JPL has collaborated with the NCDS staff over the years in making 9 years of solar irradiance data from the Solar Maximum Mission's ACRIM sensor available to users online.  The Dominion Radio Astrophysical Observatory (DRAO) (formerly Ottawa) 2800 MHz radio flux data from 1947 to the present are also available on the disk with observed, absolute, and adjusted variables.

     Radiation Budget and Clouds

Bruce Barkstrom of Langley Research Center provided the Earth Radiation Budget Experiment's (ERBE S4) combined satellite gridded products, including the scanner data at 2.5 degree resolution and the wide-field-of-view monthly averages.  William Rossow, NASA GISS, suggested and subsequently provided a comprehensive subset of the International Satellite Cloud Climatology Project's (ISCCP) monthly cloud products at 2.5 degree resolution.  He also assisted in the review and verification of those data.  Goddard's Lee Kyle worked closely with the staff in the validation of data on the disk from the Earth Radiation Budget instrument on board Nimbus-7.  Data from the wide-field-of-view sensor span the period 1978 to 1987 and are monthly in temporal resolution and approximately 4.5 by 5 degrees in spatial resolution. Goddard's Joel Susskind also worked closely with the NCDS staff, making subsets of his cloud and radiation data available for the disk.  His data are derived from NOAA Polar Orbiting satellites using TOVS-HIRS and TOVS-MSU sensors.

Disk 2 --- Atmospheric Constituents

The Carbon Dioxide Information Analysis Center (CDIAC), Department of Energy, is the source for the "TRENDS '90, A Compendium of Data on Global Change," providing carbon dioxide and methane values spanning the geological record (through ice core techniques) and more recent values collected by NOAA from flask sampling and continuous monitoring techniques. NOAA ARL's James Angell also contributed seasonal layer ozone data from Umkehr sounding and ozonesonde from 1957 to 1990 and total ozone from Dobson spectrophotometers for the period 1967 to 1989. Patrick McCormick's colleagues at NASA's Langley Research Center worked closely with our staff in providing ozone, nitrogen dioxide, and aerosol data from the Atmospheric Explorer Mission's SAGE I instrument, and aerosol, ozone, water vapor, and nitrogen dioxide data from the Earth Radiation Budget Satellite's (ERBS) SAGE II instrument beginning with data from the November 1984 launch through 1991.

The CD-ROM Design

The intention of the CD-ROM design was to deliver a standalone, operating system-independent package to the researcher:  data for research, software tools to access the data, and complete documentation.  The CD-ROM medium is ideally suited to this purpose.  The large (approximately 650 megabytes) capacity, low cost and portable directory structure as enforced by the ISO-9660 specification, make it possible to inexpensively deliver large quantities of data to the end user for use on virtually every computer in use today.

While ISO-9660 defines a platform-independent directory structure and file naming scheme for CD-ROMs, it imposes no requirements on the contents of the files.  In order to make data accessible under any operating system, the data must be written in a way which is also independent of the host system.  The Common Data Format (CDF) was selected for its advantages in representing the types of data structures found in various kinds of climate data.  Gridded data maps naturally to the capabilities of CDF, and the format allows for easy storage of attribute information along with data. In addition, a software library for CDF data runs under several operating systems (Unix, VMS and MS-DOS) and provides for system-independent encoding of the data.  This well-defined representation of the data ensures consistent access to the data.

Software

The access software provided on the disk allows the user to browse a table of contents to the disk and to view the summary and detailed information on the individual data sets.  Additional software, developed by the CDF staff, provides browse and subsetting capabilities.  The software runs with the same user interface under all three target operating systems.  The overall user interface was designed to look and perform like the current NCDS online system.  The interface in the current release is character-based but could easily be ported to standard windowing environments.

GEDEX Research

The hope is that through this consolidation and documentation of existing data sets, ambiguities and uncertainties associated with climate change and greenhouse gas effect will be further explored by more scientists.  It is also hoped that researchers will continue to review the relationships between temperature change and plausible cause-effect factors and that these disks will serve as a test-bed for future CD-ROMs for EOS. Support for this effort from the Earth Science and Applications Division, NASA Headquarters was provided by Dr. Robert Schiffer.

If you are interested in receiving a copy of the GEDEX CD-ROM, please contact the Goddard Distributed Active Archive Center (DAAC) User Support Office [NCDS has become part of the Goddard DAAC] by phone: (301) 286-3209, via Internet: NCDSUSO@NSSDCA.GSFC.NASA.GOV or by mail: NCDS/Goddard Distributed Active Archive Center, Code 935, Goddard Space Flight Center, Greenbelt, Maryland 20771.

An update to this CD-ROM disk set will be available for the United Nations Conference on Environment and Development which will be held in Brazil in June of 1992.

GEDEX CD-ROM Disk Set Available at International Space Year Conference

The second of four major conferences in celebration of the ISY was held in Munich, Germany at the Gasteig Convention Center the week of March 30th, 1992, with registered participants numbering close to 1500. Members of the Commission of the European Communities (CEC), the European Space Agency (ESA), and the German Space Agency (DARA) served as joint organizers. "Space in the Service of the Changing Earth" was the overall theme of the Conference.  Concurrent symposia attracted outstanding participation in both a Central Symposium and the four Satellite Symposia.

It was within the Central Symposium, designated the "Environment Observing and Climate Modeling through International Space Projects" that NASA's Contribution to the International Space Year was presented. A paper was presented entitled, "The Greenhouse Effect Detection Experiment (GEDEX) CD-ROM, A Collection of Data Sets for Global Change Research".  Also, an exhibit in the conference area allowed interested participants to view the contents of the disks.  A limited number of disks were available for distribution at the conference.  Disks are being mailed to others requesting them.

Thousands of additional interested observers were drawn to the Gasteig area of Munich by the "International Space Show, Planet Earth,"  held concurrently where four halls of space-related exhibits and a festival of space films organized by the European Association of Students of Aeronautics and Astronautics capitivated attendees.


Que, Sams, NRP & Brady Titles
(Carmel, IN) -- Beginning users as well as proficient computer professionals benefit from Que's latest titles. Using Quicken for Windows, Using GeoWorks Pro Hard Disk Quick Reference: 1992 Edition, and Using Ami Pro help users perform more efficiently.

Using Quicken for Windows

The ideal guide for home or small business accounting, Using Quicken for Windows makes financial management easy. The book explains how to use the check register, reconcile bank accounts, and better organize finances. Numerous examples and step-by-step instructions show users how to set up accounts in Quicken, write computerized checks, and send payments electronically.

Using Quicken for Windows is packed with expert CPA tips to help users create workable budgets and track finances. In fact, it contains all the information users need to transform Windows and a PC into a personal accountant!

Using GeoWorks Pro

GeoWorks, a powerful, easy-to-use PC operating system, has received enthusiastic acclaim from reviewers and users. Using GeoWorks Pro provides a comprehensive introduction to GeoWorks Ensemble and GeoWorks Pro.

The book offers a hands-on approach for quick, easy, and thorough understanding. Each of GeoWorks' key applications --GeoDex, GeoPlanner, GeoWrite, GeoDraw, GeoComm, and America Online -- is explained. Organized with short lessons for these key applications, Using GeoWorks Pro also contains a unique collection of "Tips," "Cautions," and "Notes" contributed by many GeoWorks power-users. All the lessons focus on quicker, more effective methods of getting jobs done.

Hard Disk Quick Reference: 1992 Edition

Users gain immediate control of the hard disk with Hard Disk Quick Reference: 1992 Edition. Laptop or desktop computer users quickly determine the most efficient hard disk management techniques without wading through pages and pages of inapplicable information.

Hard Disk Quick Reference makes it easy for users to find information on how to avoid and correct serious errors in hard disk installation and setup, and it provides key information for organizing a disk for optimum use. Essential directory and file management techniques, batch file how-to's, and important disk operations are included. Error messages are also explained in detail.

Using Ami Pro

Ami Pro, a user-friendly word processing program for the Windows environment, is one of the easiest programs to learn. But without Que's new book, Using Ami Pro, users may not utilize the program to its fullest capacity.

Using Ami Pro is designed as a reference for users to become more proficient in every day tasks and more knowledgeable of special use features. Practical instructions, coupled with functional examples, teach users the basics as well as advanced techniques. Users can also look up short cuts for infrequently used procedures, such as how to work with powerful frames, equations, and power fields, or how to import, export or link text and graphics files. Users learn how to get the most out of Ami Pro in the least amount of time.

Product Information

Using Quicken for Windows

Stephen Nelson

$19.95 US ISBN: 0-88022-907-1 478 pp.

Using GeoWorks Pro

Greg Schultz

$24.95 US ISBN: 0-88022-748-6 536 pp.

Hard Disk Quick Reference

P.D. Moulton & Timothy S. Stanley

$9.95 US ISBN: 0-88022-443-6 151 pp.

Using Ami Pro

Jim Meade

$24.95 US ISBN: 0-88022-738-9 794 pp.

--------------------------------------------------------

(Carmel, IN) -- Learning to program is now possible without complicated manuals or difficult courses. Using Assembly Language, 3rd Edition; Using QuickC for Windows; and QBasic By Example cover the gamut of programming tutorial approaches.

Using Assembly Language, 3rd Edition

Assembly Language subroutines can augment the capabilities of many "high-level" languages. Using Assembly Language, 3rd Edition, is intended for users with at least a rudimentary understanding of BASIC, Pascal, C, or C++ languages on IBM compatibles.

The book explains the principles of Assembly Language structure, commands, and operations, and is packed with text that gives users insights on how to integrate today's most popular assemblers, linkers, and debuggers. This recent revision even includes expert tips on Microsoft's Macro Assembler and Borland's Turbo Assembler.

Using Assembly Language, 3rd Edition, also shows users how to choose the right assembler and linker, work within different microcomputer processor environments, manipulate the monitor display, access individual hardware ports, and format floppy disks. A complete reference section discusses BIOS services, DOS services and gives users detailed processor instruction sets.

Using QuickC for Windows

QuickC for Windows is Microsoft's easy way to develop custom Windows applications. Using QuickC for Windows makes working with QuickC even easier. The book is an in-depth tutorial for C programmers at any level since it covers basic programming information as well as advanced programming techniques.

Packed with numerous examples, Using QuickC for Windows gives users step-by-step lessons to effectively build their skills. Reference tables, figures, and listings make C and QuickC easy to use.

The book advances users from the basics to more advanced applications of QuickC's tools -- the Dialog Editor, Image Editor, Resource Compiler, and QuickCase:W. It then moves on to cover writing programs for both DOS and Windows.

Using QuickC for Windows offers expert strategies which give users sensible methods of editing, compiling, and building fully executable programs. Plus, sample programs and end-of-chapter exercises help shorten the learning curve.

QBasic By Example

The easiest way to learn to program in QBasic is By Example. Only by looking at numerous examples, in which new commands are immediately used, and then running sample programs, can programming users get more than just a feel for the language. QBasic By Example is part of a new Que programming series that gradually introduces users to QBasic programming skills.

QBasic By Example focuses on programming correctly by teaching structured programming techniques and proper program design for QBasic. Emphasis is placed on a program's readability, rather than "tricks of the trade" code examples. QBasic By Example is written in a holistic style, so that users not only learn the mechanics of the language, but also tips and warnings.

Each chapter of the book can stand alone as a separate lesson. With over 200 sample program listings, the book shows users ways QBasic can be used for personal finance, school and business record keeping, math and science, and general purpose applications. Users also learn how to create drawings, then add music and sound effects.

Product Information

Using QuickC for Windows

Peter D. Hipson

$29.95 US ISBN: 0-88022-810-5 1,190 pp.

Using Assembly Language, 3rd Edition

Allen L. Wyatt, Sr.

$29.95 US ISBN: 0-88022-884-9 1,126 pp.

QBasic By Example

Greg Perry

$21.95 US ISBN: 0-88022-811-3 760 pp.

--------------------------------------------------------

(Carmel, IN) -- Two new books from Sams offer Windows users inside information on Quicken and Freelance Graphics. The books, 10 Minute Guide to Quicken for Windows and The First Book of Freelance Graphics for Windows, are written for beginning, infrequent, or time-sensitive users.

10 Minute Guide to Quicken for Windows

Quicken is a powerful program for tracking home and small business finances, and 10 Minute Guide to Quicken for Windows teaches users the most important functions in short, 10-minute lessons.

10 Minute Guide to Quicken for Windows offers a new approach lo learning. Users find out how to effectively use Quicken in short, bite-sized lessons which can be referred to again and again. No-nonsense text helps users learn to write checks, track business and home investments, analyze cash flow, create business reports, and prepare budgets. Plus, unique "TimeSaver" tips and "Panic Button" troubleshooting advice ensures quick and easy Quicken success.

The First Book of Freelance Graphics for Windows

With Freelance Graphics, users can add an to their documents with the click of a mouse in the user-friendly Windows environment. To understand the ins and outs of the program and really perform like a professional, users need The First Book of Freelance Graphics for Windows.

The explanations offered inside this First Book are short and lo the point. The First Book of Freelance Graphics for Windows builds users' skills chapter-by-chapter in a logical sequence. They learn to create charts, presentation pages, professional quality slide shows, and import and export graphics. Real-world, hands-on business examples show users creative and alternative chart layouts and expressive ways to communicate through graphics. Plus, The First Book of Freelance Graphics for Windows includes chapters about effectively working with all the tools to add text, graphics and color.

Product Information

10 Minute Guide to Quicken for Windows

Debbie Walkowski $9.95 US  ISBN: 0-672-30056-7  160 pp.

The First Book of Freelance Graphics for Windows

Jim Meade

$18.95 US  ISBN: 0-672-27388-8  386 pp.

--------------------------------------------------------

(Carmel, IN) -- Local Area Networks (LAN) are complex, integrated components of a business's overall computer strategy. Because LAN problems are rarely clear-cut, even the most trivial problems can require a staggering amount of knowledge to fix.

LAN problems have a wide range of symptoms -- and an even wider range of possible solutions. Sams' LAN Desktop Guide to Troubleshooting, NetWare Edition, is a comprehensive book aimed a identifying and solving problems. The book comes with its own disk, packed with over 50 troubleshooting utilities.

LAN Desktop Guide to Troubleshooting, NetWare Edition, is designed 10 give LAN users or administrators a basic understanding of LAN architecture, then advance to creating customized troubleshooting strategies. Detailed information leaches users how to configure file servers, NetWare software, and workstations.

The book also defines basic troubleshooting skills and techniques, emphasizing the methodology of discovering a problem, isolating the cause, and fixing it. Over l00 pages of easy-to-follow network troubleshooting checklists are included. Plus, LAN Desktop Guide to Troubleshooting, NetWare Edition, is a source for NetWare support and offers a guide to NetWare-enhancing products.

Product Information

LAN Desktop Guide to Troubleshooting, NetWare Edition

Rick Segal

$29.95 US  ISBN: 0-672-30075-3 342 pp.

--------------------------------------------------------

(Carmel, IN) -- Inside SCO UNIX, the latest book from New Riders Publishing, addresses SCO UNIX System V/386 in depth. Users of XENIX or early releases of UNIX will also benefit from the information presented in this book.

Inside SCO UNIX is written for beginning and intermediate UNIX users who want clear and complete background information, plus practical examples illustrating the essential components of UNIX. It presents the often difficult and confusing nature of UNIX in a nontechnical and non-intimidating way.

The book shows users how the UNIX system is organized and teaches necessary procedures and basic UNIX syntax that allows users to perform basic operations. Once users master the basics, they learn to manage various UNIX shells and set up files and directories. Step-by-step, users Learn how to use pipes, fillers, and data redirection to easily reassign values and make UNIX operate more efficiently.

Various chapters of Inside SCO UNIX discuss system administration and its effect on end users. In these chapters, clear and concise text focuses on security, backup, and monitoring, so users know exactly how to improve overall system performance. Special chapters on the UNIX Tools show users how to work with the Visual Editor, Office Commands, UUCP communications, and the most popular third-party SCO UNIX applications available. In addition to the operational information, Inside SCO UNIX features a unique Command Reference that defines more than 140 of the most commonly used operating system commands.

Product Information

Inside SCO UNIX

S. Glines, P. Spicer, B. Hunsberger, & K. White

$29.95 US ISBN: 0-56205-028-1 728 pp.

--------------------------------------------------------

(Carmel, IN) -- Ami Pro users with any level of experience can maximize their business writing skills with Brady's Business Writing with Ami Pro.

Written to show users how to create the most common types of business documents quickly and easily, this book gives step-by-step instructions for creating, designing, or modifying over 25 types of business documents. These documents range from simple letters and memos to more complex newsletters and multi-page business plans.

Business Writing with Ami Pro teaches users how to design and write documents that get results. Throughout the book, users find typography, layout, illustration, and phraseology tips aimed at captivating and persuading readers. The book lists additional reference manuals for improving the content and appearance of almost any document.

Business Writing with Ami Pro gives strategies for automating mailings and other office word processing tasks, illustrates creative ways to design logos or other business art, and gives tips for customizing and optimizing Ami Pro for frequently performed office tasks. Intended to be a supplement to Ami Pro's documentation, Business Writing with Ami Pro is loaded with tips and tricks to help users get the most from the program.

Product Information

Business Writing with Ami Pro

Mark Scapicchio

$26.95 US ISBN: 0-13-029364-4 394 pp.

--------------------------------------------------------

(Carmel, IN) -- Que's Little Mac Book, 3rd Edition, is quickly becoming a big source of Macintosh information at a very small price. This compact and thorough reference guide is designed to give Mac users immediate access to Macintosh information.

Ideal for first-time Macintosh users and veteran Mac owners, this book offers users over 330 pages of vital Macintosh information at a bargain price. When consumers use the new $3.00 rebate coupon in Que's Little Mac Book, 3rd Edition, the $12.95 US retail price drops to a small $9.95.

Que's Little Mac Book, 3rd Edition, offers complete coverage of System 7 and helps users learn the skills needed to get the most out of any Macintosh. Because it is organized alphabetically, the book enables users to locate information quickly. It contains an extensive keyboard shortcut guide, helpful information for those still using System 6, and a comprehensive glossary of Macintosh terms.

The perfect pocket encyclopedia for Macintosh, Que's Little Mac Book, 3rd Edition, gives users step-by-step procedures for everyday Macintosh tasks; effective hints and tricks to improve efficiency; as well as hard-to-find Macintosh information. Users gain instant access to Macintosh success with Que's Little Mac Book, 3rd Edition.

Product Information

Que's Little Mac Book, 3rd Edition

Doug White

$12.95 US (Retail) /$9.95 US (after rebate)

ISBN: 1-88022-902-0 332 pp.

--------------------------------------------------------

(Carmel, IN) -- Lotus 1-2-3 is one of the most popular and powerful spreadsheet programs in America, but users shouldn't equate power with complexity. Thanks to its impressive design, 1-2-3 is remarkably easy to learn and use when presented properly. Brady's Start Here with 1-2-3 for Macintosh does a great job of presenting 1-2-3 for the Mac.

The book is designed for Mac beginners and includes the fundamentals of using any Macintosh software. Chapter-by-chapter, the book adds to previously discussed skills, allowing users to build confidence in their skills and become adept at using the program.

Written by a team of spreadsheet experts, Start Here with 1-2-3 for Macintosh provides short, easy, 20-minute Lessons that allow users instant productivity. The book shows users new ways to speed up tasks with mouse and menu operations and gives sample applications for business and fun.

Product Information

Start Here with 1-2-3 for Macintosh

Daniel and Stacy Gasteiger

$19.95 US ISBN: 0-13-847344-7 428 pp.

--------------------------------------------------------

(Carmel, IN) -- Using 1-2-3 for the Mac and HyperCard QuickStart provide Macintosh users with extensive information about the popular spreadsheet and operating environment. Each book examines its topic in a clear, concise format which allows users to improve their proficiency in a short amount of time.

Using 1-2-3 for the Mac

Lotus 1-2-3 is one of America's most widely used spreadsheet programs. Long popular in the DOS world, 1-2-3 has finally come to The world of the Mac.

Using 1-2-3 for the Mac teaches users the fundamentals of 1-2-3 worksheets, databases, and graphs. This single reference source explains how to compose worksheets using 1-2-3's three new palettes, and explains all 1-2-3 commands, options, and special features.

Step-by-step, users progress through all the worksheet tools, commands, and menus to make formatting information and entering formulas easy. This book teaches users how to apply 1-2-3 premium graphing and database capabilities as well. The information offered in Using 1-2-3 for the Mac guarantees great spreadsheet results.

HyperCard 2 QuickStart

Written especially for Macintosh users who are new to HyperCard Version 2.0 or 2.1, HyperCard 2 QuickStart teaches the basics. Each chapter contains vital information to help users be creative with the software, maximize its capabilities, and build effective HyperCard skills.

Que's easy-to-follow, illustrated approach allows users to create and build stacks right away. It begins by browsing through the HyperCard system, then advances chapter-by-chapter so users can quickly add, edit, and delete cards and text within a stack.

Once the basics are mastered, the book explains how to use the HyperCard painting tools to create and enhance graphics inside stacks, how to create and modify buttons and fields, and link cards with stacks. Users also get the bottom line on scripting -- the process used to add animation and responsive features to stacks.

Using 1-2-3 for the Mac and HyperCard 2 QuickStart are both books from Que's Mac Series. Que, the world's leading computer book publisher, is a division of Prentice Hall Computer Publishing (PHCP). PHCP is a division of Simon & Schuster, which is a division of Paramount Communications.

Product Information

Using 1-2-3 for the Mac

Mark Bilbo & Christopher Van Buren

$24.95 US ISBN: 0-88022-753-2 489 pp.

HyperCard 2 QuickStart

Rebecca Gold

$19.95 US ISBN: 0-88022-852-0 338 pp.

--------------------------------------------------------

(Carmel, IN) -- Two new books from Que make Macintosh users more proficient with Word S for the Mac. Using Word 5 for the Mac, Special Edition, and Word 5 for the Mac Quick Reference are perfect companion texts to the software.

Using Word 5 for the Mac, Special Edition

This information-packed edition walks users through the dynamic features and functions of Word 5, giving Mac users considerable word processing power. Using Word 5 for the Mac, Special Edition, picks up where other manuals Leave off, and helps users apply Word 5's many features to the business and professional environments.

Included in the book are easy instructions and reference material that quickly advances users from basic word processing operations to professional desktop publishing tasks. All the latest Word capabilities are explained, including drag-and-drop editing, stationery documents, the Equation Editor, and System 7 compatibility.

With Using Word 5 for the Mac, Special Edition, users learn by example how to use Word 5's powerful commands to design resumes, create all types of business correspondence, and develop customized newsletters.

Word 5 for the Mac Quick Reference

This compact guide highlights the most important commands, options, and features of Word S for the Mac. Quick command information and step-by-step explanations help users work with the program more efficiently.

Word 5 for the Mac Quick Reference covers Word S menus, formal options, and text tools; plus, it offers lime-saving keyboard shortcuts to help users speed operations. Users easily learn how to create high-power documents, format text and graphics, import and export clip art and graphics, and implement basic desktop publishing operations. Alphabetical command listings make information easy to find in this handy guide.

Product Information

Using Word 5 for the Mac, Special Edition

Bryan Pfaffenberger

$27.95 US ISBN: 0-88022-850-4 829 pp.

Word 5 for the Mac Quick Reference

Bryan Pfaffenberger

$9.95 US ISBN: 0-88022-896-2 148 pp.

--------------------------------------------------------

Sales Information -- All Titles

Que -- Brady -- Sams New Riders Publishing

11711 N. College Ave., Suite 140 Carmel, IN 46032

1-800-428-5331


Hydronet 4.0 Fluid Conveyance Swr
Engineering Software is a leading producer of CAD software that assists in the design of fluid conveyance networks such as those found in water supply and treatment, industrial processing, fire protection, HVAC re-circulating and petroleum transport systems. Engineering Software's HYDRONET product rapidly determines steady-state pressures and flows throughout complex networks of tanks, pipes, pumps and valves that convey any incompressible fluid.

Engineering Software has updated it's prominent fluid conveyance system design package. After years of programming and soliciting user responses, HYDRONET 4.0 is being shipped. Several advanced features have been added to it's already easy to use form such as two and three-dimensional plotting of system layout, .PCX graphics file output, pressure and flow control valve modeling, graphics tablet and SuperVGA capabilities. HYDRONET now models reducers, enlargements, orifices, nozzles, fixed head loss and flow vs. head loss devices. These new features along with HYDRONET's existing abilities and reasonable price put this software within the technical needs and financial bounds of most design engineers. HYDRONET 4.0 for PC/MS-DOS sells for $695. Interested persons should contact Engineering Software for more information and demos.

Engineering Software, PO Box 8128, Truckee, CA 96162

916-582-1525


Multi-Tech Modem Sharing Software
MOUNDS VIEW, MINNESOTA - April 6, 1992 -- Multi-Tech Systems Inc., a leading manufacturer of data communications equipment headquartered in Mounds View, Minnesota, announces the MultiComAsyncGatewayTsR (Model AGS02), a software-only modem sharing system. It allows users on a NetBIOS or Netware LAN to access a modem attached to another PC on the LAN without requiring additional hardware. When used as a dial-in and dial-out non-dedicated communications server, the MultiComAsyncGatewayTsR provides an easy first step in modem sharing over LANs by pooling one or two modems attached to the RS232 serial ports of a LAN-connected PC. The AGS02 includes MultiExpress, the communications software from Multi-Tech Systems which provides terminal emulations, file transfer utilities and remote-control functionality for LAN-connected PCs, and is upgradeable to the high-performance MultiComAsyncGateway2 product line. Selling for $395, the MultiComAsyncGatewayTsR will start shipping in May of this year.

"When an organization first considers sharing modems among its PC users connected to a LAN, future expansion should be a key point of consideration," states Raghu Sharma, President of Multi-Tech Systems Inc. "A modem-sharing product should provide an easy upgrade path to a more sophisticated asynchronous gateway, so that the investment can be enhanced rather than lost. The MultiComAsyncGatewayTsR offers a migration path from one or two modem on a non-dedicated server up to a 32-modem dedicated MultiComAsyncGateway2, with compensation for the user's investment. We will credit the customer's purchase price of one AGS01 (with proof of purchase) against the price of any MultiComAsyncGateway2. By bundling MultiExpress with the MultiComAsyncGatewayTsR we've also saved the user the several hundred dollars it costs to buy dial-in/dial-out communications software."

The applications for the MultiComAsyncGatewayTsR include a variety of asynchronous LAN/WAN communications such as dial-out terminal emulation and file transfer, dial-in access to network services (e.g., E-mail BBS servers, file servers and gateways) and dial-in remote control. When you use a MultiTech modem with built-in fax capability, you can also send faxes from workstation PCs. To send a fax from a workstation PC, you install a Multi-Tech hardware redirector card in your PC and run MultiExpressFAX software. The hardware redirector card re-routes data to the LAN instead of the serial port, so you can run any single-user communications software on your LAN-based PC.

The server portion of MultiComAsyncGatewayTsR can be run on any LAN-connected PC that has a modem attached to its serial port. As a terminate-and-stay-resident (TSR) program, the server portion runs in the background leaving the PC available to its user. To access the modem, another network PC must run the workstation portion of MultiComAsyncGatewayTsR. Once the workstation software has been run, the user logs onto the gateway and the rest of the modem-sharing operations are totally transparent.

Multi-Tech Systems was founded in 1970 to manufacture data communications equipment and systems for a global market of network products users. The Minnesota-based company is a well-known leader in dialup modem technology. The family of Multi-Tech products includes a complete line of 1200, 2400, 4800 9600, and 14.4K bps modems, statistical multiplexers, DSU/CSUs, 5250, 3780 and 3270 emulation systems, X.25 PADs, computer fax equipment, communications software, and LAN products. These products are sold in over 50 countries, through a worldwide network of distributors, manufacturer's representatives, system integrators, value-added resellers (VARs) and retailers. Multi-Tech Systems Inc. can be contacted at its headquarters: 2205 Woodale Drive, Mounds View, Minnesota 55112. Voice (612) 785-3500 or (800) 3289717, FAX (612) 785-9874, International FAX (612) 331-3180


Warpage Design Principles Booklet
(Shelton, Connecticut -- April 3, 1992) Moldflow has announced the publication of a 38 page booklet entitled Warpage Design Principles -- Making Accurate Plastic Parts" which describes the causes of warpage, principles of accurate part design and effective use of warpage software. Topics covered in the booklet include: 1) the relationship between warpage and shrinkage 2) effect of material selection on warpage 3) using wall thickness to control orientation and area shrinkage 4) using wall thickness to control shrinkage near gates 5) design criteria for number and position of gates 6) minimizing sink marks 7 effect of molding conditions on orientation 8) cooling line layout and many others. Copies of the booklet are available for $15.

Moldflow's injection molding analysis products include MF/FLOW for flow analysis, MF/COOL for cooling line analysis and MF/WARP for warpage analysis. Over 1000 companies located around the world depend upon Moldflow's programs to improve the quality of their products and achieve significant cost savings. These companies come from almost all sectors of the plastics processing industry and include automotive, electronics, white goods, toys, defence and material suppliers. Moldflow pioneered the commercial release of flow analysis software fifteen years ago, and has an estimated 82% of the world market according to Harvest magazine. The company employs over 80 people worldwide and has six sales and support offices - Shelton, Connecticut and Kalamazoo, Michigan in the USA, London (UK), Cologne (Germany) and the recently opened Seoul office (Korea). Moldflow further services the market through a network of distributors and agents who operate worldwide.

Moldflow, 2 Corporate Dr, Suite 232, Shelton, CT 06484

203-925-0552


Power Launcher 2.0 Windows Toolbar
Redmond, WA (April 20, 1992) -- hDC is shipping Power Launcher 2.0, the utility which brings unprecedented power and convenience to Windows users who want maximum performance out of their systems. From controlling how, when and where applications are launched to automating repetitive tasks and customizing applications, Power Launcher lets users work the way they want to work in Windows.

Power Launcher 2.0 uses a popular toolbar approach to provide quick access to the power and flexibility of the product. In the same way that toolbars in other Windows applications provide convenience and easy access, the Power Launcher toolbar brings the full breadth of hDC's innovative technology to the forefront. The new version helps users take full advantage of several new capabilities in Windows 3.1, including Object Linking and Embedding (OLE), Drag and Drop, multimedia, sound extensions, and the Windows Help Engine. Power Launcher can be used in addition to another shell, but also makes an ideal shell for Windows users looking for a resource efficient, yet powerful and configurable solution.

"Power Launcher is an indispensable tool for users who want to get the most out of Windows," said Brian Conte, CEO of hDC Computer Corp. "It provides the tools users need to customize and automate their Windows systems so they can work faster and easier."

Breaking Through Windows' Limits: the Power of the Enhanced Command

The product is based on a technology developed by hDC, the Enhanced Command. This superset of the Windows command line lets users run: applications, documents, DOS commands, hDC MicroApps, keyboard and mouse macros, and over 75 pre-defined scripts.

In addition, users can control applications through Dynamic Data Exchange (DDE), call functions in a Dynamic Link Library (DLL), or any combination of these.

The Enhanced Command provides extensive control in launching an application, including: setting initial directory, prompting for documents, setting window position and size, running the application hidden, and changing window attributes such as the text in the title bar. These commands may be typed in or constructed with the aid of a graphical command builder.

Power Launcher provides many ways to execute Enhanced Commands, through a launch box on the toolbar, hierarchical system menu, mouse-click, hot-key, customizable toolbox, or an OLE object. In addition, Enhanced Commands can be executed automatically at startup, at a specified time, or after a period of inactivity. And with the new main toolbar, the power of the Enhanced Command is even more convenient.

New Main Toolbar

The toolbar provides instant access to: a launch box that executes any hDC Enhanced Command, including DOS commands and includes a feature that saves time by completing commands automatically, key status information (including a continually updated summary of system resources, memory, and disk space), File Manager, and a Virtual Desktop map to organize work area using virtual screens. The toolbar also has a number of customizable power buttons for favorite Enhanced Commands.

Windows 3.1 Support for OLE and Drag and Drop

Our new Action Editor is an OLE server for hDC Enhanced Commands. The hDC Action Editor is similar to the Object Packager application included in Windows 3.1, but supports the hDC Enhanced Command. For example, the Action Editor can be used to perform an SQL database query to get the latest data for a report, send it to Excel and create a chart through DDE commands, and then paste it into the document.

With the Drag and Drop capabilities in Windows 3.1, the customizable floating toolboxes and the power buttons on the toolbar can be used as drag targets. When a file is dropped onto a toolbox or a power button, it will automatically run any hDC Enhanced Command assigned. For example, drag a file from the new Windows File Manager onto a power button that automatically attaches the file to an email message, prompts for the recipient's name, and sends the message to the designated recipient.

Pricing and Availability

hDC Power Launcher 2.0 is available now for a suggested retail price of $99.95. Registered users of hDC Power Launcher 1.0 can upgrade for $19.95 plus shipping and handling. If the previous version was purchased after February 15, 1992, the upgrade is free with proof of purchase.

System Requirements

Microsoft Windows-compatible personal computer

Microsoft Windows 3.0 or higher

1.2 MB disk drive or 720K 3.5" disk drive

Microsoft or compatible mouse

hDC has delivered innovative solutions for PC users since Windows 1.0. From doubling the size of the Windows 1.0 color palette, to creating the first user-friendly shell for Windows 2.0, to showing you the inner workings of Windows 3.0 memory management, hDC has been the technical leader. hDC products are designed to fully exploit the power of the graphical user interface in Microsoft Windows environments. In addition to the new hDC Power Launcher, the company markets hDC Windows Express, a menu system for corporate Windows standardization, as well as hDC FirstApps FileApps, and Icon Designer, three products that use hDC's pop-up MicroApp approach to add customization and productivity tools to Windows. hDC was founded in 1986 and currently has an installed base of more than a half million users. The company is located at 6742 185th Ave NE, Redmond, Washington 98052.


COMPUEXPO Sept 21-24
The China Association for Science and Technology (CAST) is sponsoring a pavilion with high tech companies from China offering new technology and services to the World market at COMPUEXPO this September 21-24 at the Las Vegas Convention Center.

"This marks the first time China has sponsored such an event in the United States," explained COMPUEXPO Chairman, Allen Yu. "We're very excited about China's involvement in COMPUEXPO. With all the changes in China's market and their increasing role in the high tech community today, I feel this pavilion will be of great interest to many attendees of COMPUEXPO."

CAST is a group of 146 national professional societies and the local science and technology associations in basic sciences, engineering, agricultural and medicine.

The pavilion is going to be made up of 24 high technology companies from China highlighting their new products and services. The products on display will range from state of the art board level products, storage and peripherals to 486/386/286 systems, along with networking and communications as well.

COMPUEXPO will be held from September 21 to 24, 1992, at the Las Vegas Convention Center, Las Vegas, Nevada. The UNSC Investment Group, Sponsor of COMPUEXPO, is located at 39899 Balentine Dr., #305, Newark, CA 94560. The fax number is (510) 657-3499.

--------------------------------------------------------

Chicago: Gordon Campbell, President and CEO of Chips and Technology, Inc., of San Jose, California, will serve as a Keynote Speaker at COMPUEXPO 92. Chips and Technology, Inc., by creating the first industry standard personal computer "chipset", was a pioneer in the creation of the IBM PC-compatible marketplace. Chips and Technology has since expanded its family of PC system logic and graphics semiconductors to include a family of Intel-compatible microprocessors.

"The old way of building and distributing PC's is now being challenged by a new paradigm. Today, end users have a choice of multiple processor architectures, graphics technologies, operating systems, and system definitions. COMPUEXPO reflects this diversity of new channels, technologies and system definitions, " said Campbell in accepting the invitation to speak at the first COMPUEXPO.

"Any analysis of the PC industry today will quickly show that the largest supplier of PC's is "Other". This term embraces a dynamic industry segment made up of hundreds of fast moving entrepreneurial companies which are constantly driving new price/performance points by adopting the latest and most effective technology supplied by the PC OEM industry infrastructure, " Campbell added.

Allen Yu, Chairman of COMPUEXPO Sponsor UNSC Investment Group welcomed Mr. Campbell's acceptance as follows: "We are excited about Gordon Campbell's participation in COMPUEXPO 92. Many emerging PC brands in today's global marketplace got started because of the technical innovations pioneered by Chips and Technology. The development of alternate CPU sources for personal computers is an important milestone marking the transition to the Second 10 Years of the PC Industry. COMPUEXPO is all about this transition. "

COMPUEXPO will be held from September 21 to 24, 1992, at the Las Vegas Convention Center, Las Vegas, Nevada. The UNSC Investment Group, sponsor of COMPUEXPO, is located at 39899 Balentine Drive, #305, Newark, CA 94560. The telephone number is 510-657-3418. The fax number is 510-657-3499.


Microsoft Flash File System
Microsoft Delivers Second Phase of Portable Computing Initiative

Microsoft Flash File System Facilitates Application Development of MS-DOS, Windows Software

REDMOND, Wash. -- April 22, 1992 -- As part of its ongoing commitment to aid PC manufacturers and software developers in meeting the needs of the portable computing and embedded system markets, Microsoft Corporation today announced the Microsoft Flash File System. The file system is the first to allow flash memory to function as an ordinary disk in a PC, making it easier for users to run their favorite applications for MS-DOS and Windows operating systems on a wide range of PC platforms, including pen-centric, palmtop and desktop environments. The Microsoft Flash File System also makes it easy to develop custom MS-DOS and Windows applications for embedded systems and consumer electronic devices by allowing developers a wide range of existing MS-DOS and Windows development tools. Flash memory is a type of non-volatile memory that can read data as quickly as a RAM disk, as well as write and store data like a hard disk.

Today Microsoft also released the specifications for the Microsoft Flash File System media control structures, which determine how data is stored on flash memory cards using the Microsoft Flash File System. The move allows the industry to focus on a single format for reading and writing data using flash memory. This allows users to work with flash memory cards as easily and interchangeably as they now use floppy disks, because they can utilize memory cards on any PC that supports the Microsoft Flash File System. A single format also allows disk utilities vendors to create new tools that provide solutions targeted at the needs of memory card users.

The Microsoft Flash File System, now in beta testing, is scheduled to be released this summer. The file system supports PCMCIA-compliant flash memory. The PCMCIA, or Personal Computer Memory Card International Association, is a non-profit trade association established to develop and maintain a worldwide standard for PC Cards. At the same time, the file system supports the use of flash memory in dedicated applications -- such as electronic point of sale systems, which are not traditionally PCMCIA-compliant.

Microsoft made the announcements during Intel Corporation's unveiling of its Series 2 flash memory cards today to underscore the importance of the companies' dual contributions to portable computing, according to Brad Silverberg, vice president of personal systems at Microsoft. Microsoft's Flash File System supports Intel's Series 2 cards as well as flash memory cards from other manufacturers. In November, Microsoft and Intel jointly released their Advanced Power Management (APM) specification for extended battery life in portable computers.

"Microsoft is working to bridge the gap between the desktop, the palmtop and beyond," said Silverberg. "Our Portable Computing Initiative demonstrates our continuing commitment to facilitate portable computing for both vendors and users. With today's announcements, we're giving developers and users a familiar environment in which to develop and use popular applications for MS-DOS and Windows on new, mobile platforms.

"Also, we're enabling people to use their flash memory cards with any portable PC that supports the formats -- even those running different operating systems," he added. "Together with the industry's move toward smaller, lighter computers, these are key steps in achieving the portable computing revolution."

Microsoft introduced its Portable Computing Initiative in January of 1992. The Initiative covers the full range of the portable market, from established laptops and notebook-sized computers to the newer tablet or clipboard-type machines, palmtop devices and embedded mobile systems. In all, this market is expected to increase from about six million units this year to nearly 30 million units in 1995, according to Dataquest, an international market research firm.

The first phase of the Portable Computing Initiative included Microsoft' s release of APM, MS-DOS 5 ROM version, a fast data transfer utility called Interlnk and support for solid-state memory. Microsoft also announced plans to make a ROM-executable version of its Microsoft Windows operating system version 3.1 available later this year.

Microsoft Flash File System Provides Easy Access to MS-DOS and Windows Applications

The Microsoft Flash File System keeps the management of flash memory devices transparent to the user, to whom flash cards will appear as ordinary disks. This enables users to run their favorite applications for MS-DOS or Windows on a diskless system with flash memory as the primary storage medium. It also provides an easy way to upgrade applications on diskless systems.

The Microsoft Flash File System was designed using a linked-list architecture to help ensure that data can be moved easily throughout the media. This also enables the file system to maximize its use of all available space in flash memory for storing data and applications.

The Microsoft Flash File System consists of two device drivers that users can easily load in their CONFIG.SYS files. A high-level driver interfaces with MS-DOS to process commands from the operating system or application. The second driver actually performs those functions on the media. This approach enables MS-DOS to treat flash memory as an ordinary drive in a system, allowing users to gain instant access to the media and store data in applications just as they would in a desktop PC. The second driver is also hardware specific and OEMs can easily modify it to support the specific flash memory implementation for their mobile computing systems.

Release of Media Control Structures Supports Flash Standard

By releasing the Microsoft Flash File System media control structures to the industry, Microsoft is making it easier for the industry to adopt a common format to manage, read and write data on flash memory, much as the MS-DOS File Allocation Table (FAT) manages data on magnetic media -- floppy disks -- used with products from thousands of PC hardware and software vendors. The standard file format will allow users to interchange flash memory cards with any PC they choose -- even operating systems not based on MS-DOS, for example, provided those operating systems support the media control structures.

The public release of the media control structures enables all applications and system software developers to use them without royalty, license or other cost. In addition, the common file format can decrease development cost for software vendors by reducing the need to support multiple file formats for flash memory.

Availability

PC manufacturers interested in licensing the Microsoft Flash File System should contact Microsoft OEM Sales at (206) 882-8080.

The Microsoft Flash File System media control structure specification is available free of charge from Microsoft's Vendor Relations Group at (800) 227-4679, ext. 11771.

Founded in 1975, Microsoft (NASDAQ "MSFT") has become the worldwide leader in software for personal computers. The company offers a wide range of products and services for business and personal use, each designed with the mission of making it easier and more enjoyable for people to take advantage of the full power of personal computing every day.


PC-Kwik MultiPak Packages
Beaverton, Oregon (March 31, 1992) - Multisoft Corporation announced today that their award-winning products, Super PC-Kwik, PC-Kwik Power Pak, and PC-Kwik Power Disk are now available in multiple-license packages. Offered in 5, 10, 25, 50, and 100-user licenses, the MultiPak serves the needs of corporations who want to install the products on multiple computers without the additional costs of unnecessary diskettes, manuals, and extra packaging.

Corporations have long benefitted from the speed improvements and disk management offered by the PC-Kwik family of DOS performance products. Super PC-Kwik's disk cache provides increased speed when working with disk-intensive applications. Power Pak includes Super PC-Kwik, and adds keyboard and screen accelerators, print spoolers, and RAM disks to provide additional speed and user-productivity enhancements. Power Disk provides a powerful range of options to test and reorganize disk drives for safer, faster drive access.

Each MultiPak provides the user with a master set of dual-media diskettes with a single serial number, one copy of the user documentation, a MultiPak registration card, a software license agreement for the appropriate number of licenses, a user-license tracking form, and a set of identification labels which can be attached to each computer. Additional user documentation is available directly from Multisoft.

Eliminating the extra materials allows significant price reductions below a multiple purchase of the single-license products, and provides financial incentives for ensuring that only legal copies are installed on corporate computers. In addition, reducing the volume of material shipped to each customer directly reduces the impact on the nation's landfills.

"Many companies that we work with have asked for a simple method to acquire, distribute, and track multiple licenses of a software product," stated Bruce Schafer, President of Multisoft Corporation. 'The MultiPak gives our customers the products they need, in the form they asked for, and in the retail channels where they currently purchase single-license products."

Multisoft Corporation is the leading developer of performance enhancement software products. Its retail products are Super PC-Kwik, Power Pak, and Power Disk. All three products, including MultiPaks, are available through Multisoft's U.S. distributors (Ingram Micro and Merisel). Multisoft corporate headquarters are located at 15100 SW Koll Parkway, Beaverton, Oregon, 97006, telephone (800) 759-5945 or (503) 644-5644.


Md/EISA HiRes Display Boards
Maynard, MA -- April 17, 1992 -- Following the success of its Md series of high resolution display boards for the Apple Macintosh, DOME imaging systems has now brought this powerful architecture to EISA-based PCs. Early shipments of this product have been to PACs, teleradiology and other high-end medical imaging applications.

Designed to meet the display and processing requirements of advanced graphics and image processing applications, the Md/EISA offers a number of extremely powerful hardware features that provide unparalleled performance in a variety of demanding and complex imaging applications. The Md/EISA produces an exceptionally high quality gray scale or color display at a wide variety of resolutions ranging up to 1600 by 1200 pixels on both portrait and landscape monitors. It can display up to 256 shades of gray or colors simultaneously and features a 4-bit per pixel, 16 color overlay plane.

The capabilities of the Md/EISA hardware go well beyond those of a standard display card. The Md/EISA excels at handling very large amounts of image data, as well as gray scale images that are deeper than 8 bits, including 10, 12 and 16-bit images. It accomplishes this by incorporating and integrating a powerful set of hardware features, including a large off-screen memory buffer (up to 68 Mbytes), a high speed image copy accelerator, and a special 16-bit look-up table. With this hardware, the Md/EISA boards can update and process images on the screen much faster than the PC's processor. This allows applications to perform such demanding tasks as real-time cine animation of sequential images, panning and scrolling of arbitrarily large images, and contrast and brightness adjustments on gray scale images up to 16 bits deep. The Md/EISA boards also feature the Texas Instruments 34020 graphics system processor with an optional TI 34082 floating point coprocessor.

DOME provides an extensive graphics and image processing library at no extra cost. This library lets applications take full advantage of the Md/EISA board's special features including the copy accelerator, the 16-bit look-up table and the TI 34020 and 34082 processors. It includes a wide variety of graphics primitives and image processing routines, as well as sample source code and full documentation.

DOME imaging systems is the leading provider of innovative imaging solutions, meeting customers' needs with quality software and hardware products. DOME values its customers and vendor relationships and is committed to creating a challenging growth environment for its employees. DOME is a privately held corporation, incorporated in 1989 and located in Maynard, MA.

DOME Imaging Systems, 20 Powdermill Rd, Maynard, MA 01754

508-897-3144


TAB Books/McGraw-Hill Titles
The Entrepreneurial PC by BERNARD T. DAVID

Foreword by Philippe Kahn, Chairman, President and CEO, Borland International, Inc.

A complete guide to starting a computer-based small business-- featuring more than 100 ways to make money with a home computer

Too often, people buy a home computer only to worry later about how to justify the cost. This book is for all those PC owners who have tired of their computer games, found that the kids have lost interest in their educational software, or discovered that doing their taxes by hand wasn't so hard after all. With The Entrepreneurial PC, that expensive home PC doesn't have to end up in the attic beside the exercise bike--instead it can become a brilliant investment.

This book will interest almost everyone who uses a PC at home. Bernard J. David examines the profit-making potential of a wide variety of computer-related and computer-based business opportunities. Readers receive practical field-tested advice on how to plan, finance, start up, and operate a new computer enterprise.

With The Entrepreneurial PC, home computer owners will discover how they can make money in: Word processing, Desktop publishing, Database programming, Hardware installation, Electronic mail, Computer art, Data entry, On-line information research, Payroll and accounting services, Real estate listing services, Computer game development, Digital photography. . . and many other fields. Most importantly, David explains all the nuts and bolts of running a computer-based business, including how to perform market research, minimize risks, secure financing, keep the books, choose computer equipment and software, and manage assets. Plus, valuable appendices furnish sample business forms, a directory of organizations that can help in starting a computer-based business, a comprehensive listing of computer retailers, and price comparisons for the most popular computer hardware and supplies.

A frequent contributor to computer trade publications, Bernard J. David holds an MBA from the University of Pennsylvania's Wharton School of Business and is founder and president of a successful computer consulting firm. He was recently appointed to the advisory board of Datapro Research Group, a division of McGraw-Hill Inc.

$19.95 paper, $29.95 hard, Available Now

--------------------------------------------------------

Type in Use

Effective Typography for Desktop Publishing by ALEX WHITE

A practical guide to better design with type

The desktop publishing explosion has placed the tools of publication design into the hands of thousands of individuals who are untrained in the art of using type. Most desktop publishers have become typographers and designers by default, with very little understanding of the principles underlying effective visual communications. This volume will help alleviate the long, frustrating period of trial and error experienced by DTP professionals who are unfamiliar with the concepts and practices of typography.

Type in Use is a practical learning tool and on-the-job reference for editors, writers, and designers who use desktop publishing equipment, as well as for those who create type layouts by traditional methods. Organized by type application--text, headlines, subheads, breakouts, captions, etc--this is the first book to break typography down into its natural components, describing the purpose and application of each in the design of magazines, newsletters, brochures, and other printed matter.

Each section provides general guidelines for using type within a given design context, followed by up to a dozen pages of striking examples from actual publications. Topics covered include how to:

* Develop a logical hierarchy of type in a publication

* Choose and mix typefaces

* Create unique and functional grids and column structures

* Use white space and color

* Relate cover logos with display type

* Exploit desktop publishing techniques

While Type in Use focuses on type forms used primarily in publication design (magazines, newsletters, house organs), the principles discussed can be applied to all print media by typographers at all levels of skill.

A widely known lecturer on typography and design, Alex White is a professor of graphic design at the Hartford Art School of the University of Hartford, and has taught at Parsons School of Design and Kent State University. He is the author of numerous articles for Folio, In-House Graphics, Step-by-Step Graphics, Publish, and other magazines.

$34.95, order No. 3543, Available MAY

--------------------------------------------------------

TAB Books, Blue Ridge Summit, PA 17294-0850

1-800-233-1128     FAX 717-794-2103


US Software Sales in Japan
April 10, 1992 (Washington, DC) - The Software Publishers Association announced today the results of its latest study of the sales of personal computer software in Japan by US firms. Twenty-two of the US industry's major firms reported aggregate sales of $160.1 million for 1991, a 38% increase over 1990 sales. Fourth quarter sales were $44.1, a 21% increase over the fourth quarter on 1990. Since Japanese firms did not participate in the study, the SPA is unable to estimate the full size of the Japanese applications software market.

The 22 US-based software firms, including Lotus, Microsoft, WordPerfect, Aldus, Claris, Software Publishing, Borland, Symantec, Wordstar, T/Maker and others, participated in the SPA's data program by submitting confidential data to the accounting firm of Arthur Andersen, who prepared the report for the SPA. The data was collected in 16 software categories (e.g., word processors, graphics, and spreadsheets) and in six software formats (including Macintosh, MS-DOS, and Windows).

Among the more interesting findings is that US firms' sales in Japan are still heavily DOS-based. Por the full year, 79% of US firms' sales were for DOS-based applications, with Windows 3.0 applications accounting for 10%, Macintosh 9.5% and other formats less than 2%. The report does show a change for the fourth quarter of 1991, however. In the fourth quarter, DOS applications slipped to 66% of the mix, while Windows applications climbed to 24%. Macintosh and other formats slipped to 8.8% and 1.2%, respectively. By comparison, DOS applications accounted for 56% of US firms' sales in Europe in 1991.

Spreadsheets were by far the largest category, accounting for 53% of US firms' application sales in Japan in 1991. US firms' spreadsheet sales in Japan grew by 37% over 1990. The next largest category, accounting for 16% of sales and growing 20% from 1990, was languages and tools, followed by relational databases (8.8% of sales, 15% growth rate) and integrated packages (6.4% of sales, 68% growth rate). Word processors (5.6% of sales, 66% growth rate) were, not surprisingly, a fairly small part of US firms' sales in Japan.

While US firms' sales in Japan in the fourth quarter were the highest of 1991, the growth was the lowest of any quarter of the year. Both currency fluctuations and the weakening of the Japanese economy were partially accountable for the slowdown in the later part of the year. Still, the Japanese market rates as one of the largest for US firms. Compared with similar studies of the software markets of Western Europe, Japan is among the largest markets for US publishers of PC applications software. For the year, a similar group of companies reported sales of $415 million in Germany and Austria, $299 million in the United Kingdom and Ireland, $279 million in France, and $137 million in Scandinavia.

The Software Publishers Association is the principal trade association of the personal computer software industry. Its 900 members represent the leading publishers in the business, consumer, and education software markets. The SPA has offices in Washington, DC, and Paris La Defense, France.

Software Publishers Association

1730 M St Northwest, Suite 700, Washington, D.C. 20036

202-452-1600


Auto-Board Dynamic Routing Option
February 15, 1992 -- The Great SoftWestern Company Inc. announces the release of an additional routing option -- the Dynamic Router -- for its printed circuit board design software, The Auto-Board System. The Auto-Board System is companion software integrated into and around AutoCAD, a major microcomputer based CAD system.

The Dynamic Router represents a complete departure from the previous PCB auto- router options for The Auto-Board System, all of which are still available. For the sake of completing routes in a most efficient and elegant manner, the Dynamic Router can move traces, chop them into smaller pieces, re-assemble them, rip them up, then lay them down to build the design. The result is a board portraying hand-routed patterns, and fewer feed- thrus.

Other PCB auto-routers produced by The Great SoftWestern Company are static in nature; once a trace is routed into the underlying data structures, it remains fixed in place. Minor alterations are allowed in layer assignment for the removal of feed-thrus but the switching of layers does not materially change the location of the trace.

The Dynamic Router algorithm is written in C++, allowing the ability to write a general routine affecting segments, both horizontal and vertical. Therefore, when writing a routine to resolve crossing traces, one routine covers both instances of traces, providing symmetry and easier maintenance.

All four of the auto-routing options of The Auto-Board System are proprietary and, as such, are tech supported by the staff that produced them. Since The Auto-Board System is a companion of AutoCAD, the user has the graphical power of AutoCAD at his fingertips, providing more flexibility to tailor his design to his individual needs, more ease to build and change symbols, and more convenience in documenting his design than found in many of the stand-alone auto-routing packages.

Prices for the Dynamic router begin at $2250.00

The Great SoftWestern Company Inc

919 S. Carroll Blvd, Suite 103

Denton, TX 76201-6869

817-383-4434


Wilson Business Abstracts Expanded
Wilson Company Adds Retrospective Files to WBA Database

Effective May 1992, Wilson Business Abstracts--a global reference database providing cover-to-cover indexing and abstracts for the 345 most-demanded business journals--will expand its retrospective indexing coverage to July 1982. The affordable annual subscription rate of $2,495 remains the same.

WBA on WILSONDISC combines the convenience of CD-ROM with the currentness of an online service, providing an instant response to requests for the latest news, trends, events, and activities related to business and industry. An annual subscription to WBA on WILSONDISC includes over 130,000 high-quality abstracts, twelve monthly disc updates, no-charge online access to the WBA database (updated weekly) for the most recent data, disc ownership, and no-charge networking. And with three WILSONDISC search modes--from novice to expert--access to WBA is fast and convenient for everyone.

WBA's expanded retrospective coverage and unique no-charge online capabilities enable users to access up-to-date information on today's hottest topics, or obtain a comprehensive historical perspective on any area of business, at the touch of a button. Whether users are professionals engaged in international business activities, students enrolled in business programs, or general readers simply interested in business, WBA's meticulous, high-quality indexing and abstracting puts the world of business at their fingertips.

Wilson Business Abstracts is also available on magnetic tape through the WILSONTAPE Database Licensing Service and online through WILSONLINE. For a WBA demonstration diskette or information on Wilson's no-risk, no-cost 90-day trial programs, call toll-free 800-367-6770.


Wilsondisc Workstation
The H.W. Wilson Company Introduces New PC-Compatible WILSONDISC Workstation

As part of their commitment to providing libraries with superior CD-ROM workstation values, The H.W. Wilson Company now offers an affordable and versatile PC-Compatible WILSONDISC workstation package. The new workstation includes a variety of hardware and software upgrade options, special value-added software, and a generous warranty.

This state-of-the-art workstation is designed to accommodate the Wilson Information System family of services--WILSONDlSC, WILSONLINE, WILSEARCH--as well as other computer programs.

WILSONDISC and most of the software programs listed below are pre-loaded into the PC-Compatible workstation, making set up and operation fast and simple. The complete workstation package includes:

Hardware

* 386SX CPU 16MHz

* 2MB RAM

* 40 MB Hard Disk Drive

* 3.5" 1.44MB Diskette Drive

* VGA Color Monitor and VGA Card

* Extended 101-key Keyboard

* Epson LQ-570 Printer

* Serial Mouse

* Internal Hitachi CD-ROM Drive

  (with daisy-chaining capacity)

* Speakers

* Cables

* Surge Protector

Software

* MS DOS 5.0

* Microsoft Windows 3.0

* Microsoft CD-ROM Extensions

* PC Tools Deluxe

* Checkit

Special Value-added CD-ROM Software

The PC-Compatible workstation also includes a complete package of reference software:

* Reference Library

* Software Toolworks Illustrated Encyclopedia

* Software Toolworks U.S. and World Atlas

* Mammals

* CD-SetGo Installation Software Diskette

* Play a Music CD

* Game-Pak

Warranty

* 3-year warranty on CPU, monitor, and keyboard

* 1-year warranty on CD-ROM drive, hard disk drive,

  printer, and modem

Upgrade Options

* Hayes 2400B Internal Modem with Smartcom

  software--$300 additional

* Canon Bubble Jet Printer--$250 additional

The PC-Compatible WILSONDISC workstation is available now for only $2,395. The Company will continue to offer the IBM WILSONDISC workstation, now priced at $3,995. For more information on WILSONDISC hardware and software packages, various workstation payment plans, and no-charge 90-day trial programs, call toll-free 800-367-6770


WILSONDISC Software V2.4
New WILSONDISC Software--Version 2.4

The H.W. Wilson Company announces the release of WILSONDISC software Version 2.4. The new software includes major enhancements to WILSONDISC System searching, print/display, start-up, and installation capabilities. WILSONDISC subscribers will benefit from powerful new journal tagging features, additional truncation characters, expanded search options, and much more. Specific enhancements include:

Upgraded Journal Holdings Manager--Users now have the ability create a customized message for each journal (59 character limit). The Journal Holdings Reports feature has also been upgraded for ease of use.

Multiple-Character Truncation Symbols--Two frequently-used truncation characters, the question mark (?) and the dollar sign ($), can now be used in the WILSONLINE and WILSEARCH modes.

Enhanced Search Capabilities--BROWSE Mode search terms have expanded beyond subjects to include book titles and authors for Book Review Digest and Cumulative Book Index. Search terms for Index to Legal Periodicals have also been expanded to include cases and statutes. * WILSEARCH Mode search screens are now database-specific. Search lines are added or removed from the standard screen depending on the database being searched.

Print Brief--The Print Brief option allows users to output a shortened version of any index citation to the printer, floppy drive, or hard disk. This shortened version includes only the base citation.

New Screen Saver Setup Option--A new Screen Saver Mode option eliminates the 'burn-in' problem caused by stationary screen images.

Enhanced Access/Start-up--A new Command Line Parameter accelerates the loading of WILSONDISC on a network or multi-disc player environment.

Improved Installation--Software Version 2.4 includes several enhancements to the installation process, including revised instructional text, expanded identification of the software version being loaded, improved handling of special setup files, and a revised installation diskette.

Beginning with WILSONDISCs dated March 1992, compressed data will be used as necessary in order to accommodate larger files on a single compact disc. All WILSONDISC subscribers must install software Version 2.4 to access WILSONDISCs with compressed data For more information on WILSONDISC or software Version 2.4 enhancements, call toll-free 800-367-6770.


SYBASE & SQL Sol. Consolidation
EMERYVILLE, CA, April 13, 1992 -- Sybase, Inc. today announced the consolidation of its subsidiary, SQL Solutions Inc., into Sybase's corporate operations. SQL Solutions provides RDBMS-independent consulting services and tools to support application development for client/server computing. The company was acquired by Sybase in January 1990.

Mark B. Hoffman, Sybase president and CEO, commented, "Sybase is focused on providing open products and services that allow customers worldwide to build multi-RDBMS client/server solutions for the on-line enterprise. SQL Solutions' multi-RDBMS products and services are key components of our strategy. The consolidation of our operations does not indicate a change in strategy. Rather, it provides our customers with a seamless global organization for sales, marketing, consulting, and technical support. In addition, we benefit from greater synergy in our product engineering, marketing, and strategic planning efforts, and from the unification of our financial, administrative, and distribution infrastructure. All of these will aid Sybase and Sybase customers as we continue our aggressive growth worldwide."

SQL Solutions' consultants specialize in designing, implementing, and integrating RDBMS-based applications in heterogeneous hardware and distributed database environments. The consultants have expertise with all major relational database management systems (RDBMS), including: SYBASE, ORACLE, INGRES, INFORMIX, Rdb, and DB2. SQL Solutions also develops and markets a suite of multi-RDBMS tools which are a strategic component of the SYBASE SQL Lifecycle strategy to provide tools for the entire SQL application process, from design to maintenance.

Sybase and SQL Solutions have worked closely since 1990 to grow both the product and consulting sides of SQL Solutions' business. Since the acquisition in January of that year, the number of SQL Solutions' employees has grown 200%. SQL Solutions introduced more than 15 new products and product upgrades, and has increased the size of its customer base from 300 to over 1,000.

According to Hoffman, the consolidation is a natural step in the evolution of both companies in order to effectively serve customers and leverage resources. Under the consolidation, Sybase will develop, market, and support SQL Solutions multi-RDBMS products as SYBASE products. The consulting services will be marketed as SYBASE SQL Solutions and report to David Peterschmidt, Sybase vice president of worldwide field operations.

Robert Davoli, currently SQL Solutions president and Sybase vice president of professional services, will now become vice president of business development. In addition, he will help manage the consolidation. Hoffman commented, "Bob has done an excellent job over the past two years in significantly growing revenue from both tools and consulting. He has been key to Sybase's strategic business planning, including the decision to consolidate operations. We look forward to his contributions in the future."

As of March 31,1992, Sybase has 1,117 employees, including those at SQL Solutions. The company plans no reduction in its overall work forces as a result of this consolidation. SQL Solutions professional services, engineering, marketing and sales, and finance and operations, located in Burlington, MA., will report to the respective vice presidents at Sybase corporate headquarters in Emeryville, California and Eastern area regional offices in Bethesda, MD.

Sybase, Inc. (NASDAQ: SYBS) develops and markets the SYBASE system, a leading client/server-based RDBMS product family for developing on-line enterprise applications. The company offers proven technology, combined with services and alliances, to provide customers with complete desktop to mainframe solutions. Headquartered in Emeryville, CA, Sybase markets its products worldwide through its direct sales force, distributors, OEMs, VARs, and systems integrators.

Sybase Inc, 6475 Christie Ave, Emeryville, CA 94608

510-596-3500


ChiWriter 4.1 Scientific Wordproc
SAN JOSE, CA, April 10, 1992 - Horstmann Software Design Corp. today announced the release of ChiWriter 4.1. The fully WYSIWYG (what you see is what you get) scientific word processor enables users to easily enter and edit scientific notation and foreign language text. It is menu driven, supports mouse, and offers a full multiple undo and redo capability, making ChiWriter especially useful to professors, students, scientists and researchers in generating manuscripts and reports.

The most important feature of the new version is its ability for graphics import. TIFF and PCX files can now be imported directly into ChiWriter, cropped, scaled, and annotated simply by typing over them. This is particularly useful for scanned graphics. "The ability to import graphics and annotate them, using the full scientific character and formula set, is particularly important to our customers," said Cay Horstmann, the company president. "No other word processor offers this flexibility."

ChiWriter supports full multiple undo and redo. You can undo any mistakes, up to a hundred commands. All commands can be undone, even a global replace. Editing formulas and tables is easy since ChiWriter automatically keeps text formatted. You can also edit up to 10 documents simultaneously and cut and paste between the documents.

Recognizing the increasing importance of the TEX typesetting system in the academic environment, Horstmann Software also offers a conversion program which performs an intelligent conversion from ChiWriter files to TEX format. This technology "aspires to close the gap between the two ideals: WYSIWYG input; TEX output." (J.S. Milne, Notices of the American Mathematical Society, 1990)

ChiWriter runs on an IBM PC and compatible machines with at least 512K and a hard disk (or a 1MB RAM disk on a laptop). All popular graphics boards, dot-matrix printers (including Canon BubbleJet), laser printers and DeskJet printers are supported.

ChiWriter 4.1 is available immediately. The list price is $349.95 for the word processing package, $74.95 for the optional TEX Translator utility. To encourage educational usage, Horstmann Software extends a discount of 20% off the list price on all its products to teachers and students.

For more information, please contact: Horstmann Software Design Corporation, 4 North Second Street Suite 500, PO Box 1807, San Jose CA 95109-1807, USA, (408) 298-0828, FAX (408) 298-6157. To place an order, please call (800) 736-8886.


Microsoft Pub & Apple Mac Book
Microsoft Publisher

The Official Software Companion

Instruction, Techniques, and Design Advice for Desktop Publishing with Microsoft Publisher

With Microsoft Publisher and MICROSOFT PUBLISHER, the official software companion from Microsoft Press, anyone running the Microsoft Windows operating system on a PC can design and produce professional-quality publications with no prior experience.

In this step-by-step, example-packed guide, author Luisa Simone shows how the new Microsoft Windows-based desktop publishing software package is a cost-effective business communications tool. Everyday documents can be exciting. New letterhead and business forms can give a company a fresh, new image. Small businesses can save money by designing their own print ads. And promotional newsletters can be created in a snap.

Sample projects presented within the context of a small business include:

* A promotional newsletter with photos and graphics

* An original logo

* Professional-looking letterhead

* Eye-catching advertisements

* Customized business forms

* An elaborate, well-designed catering menu

* A small mail-order catalog

MICROSOFT PUBLISHER is divided into four parts. Part I is an overview of how the Microsoft Windows operating system and Microsoft Publisher work together. After mastering the basics, readers learn about Microsoft Publisher's built-in word processing features, drawing tools, and PageWize the mini programs in Publisher that create professional-looking documents based on information the user provides.

In Parts II and III, readers learn how to design a variety of publications from scratch, incorporating the general rules of good design found within the pages of the book. With these hands-on exercises, budding desktop publishers can import graphics, convert files from other applications, and apply their own special effects and accents.

The appendixes in Part IV offers a quick lesson in installing Microsoft Publisher, tables of keyboard alternatives, tips and guidelines for printing with Publisher, and a handy glossary of desktop publishing terms. A comprehensive index helps users quickly find information on any Microsoft Publisher topic in the book.

Luisa Simone is a New York-based consultant, teacher, and journalist specializing in computer graphics. She is a contributing editor to PC Magazine, writing about desktop publishing programs, presentation graphics packages, illustration software, and multimedia computing.

MICROSOFT PUBLISHER joins Microsoft Money and Microsoft Works for Windows in The Official Software Companion Series--books from Microsoft Press that cover the Microsoft Solution Series software.

--------------------------------------------------------

The Apple Macintosh Book, 4th ed.

The Computer Book Classic on Apple Macintosh Computing

Published in 1984 to accompany the dramatic introduction of the first Apple Macintosh THE APPLE MACINTOSH BOOK, by Cary Lu, soon became the computer book "for the rest of us" Critics were quick to praise the author's style. Readers snapped up subsequent editions as Lu carefully chronicled the evolution of the Apple Macintosh family of personal computers in three best selling editions.

Now thoroughly updated once again, THE APPLE MACINTOSH BOOK, 4th ed., from Microsoft Press, continues to be a superb introduction to Apple Macintosh technology--as valuable to owners of previous editions as it is to new and potential Macintosh owners.

This all-around guide provides the latest information on new and emerging developments such as System 7; compares all Apple Macintosh models, including the new Classics, Quadras, and PowerBooks; covers the LaserWriter IIf and IIg printers and other peripherals; and analyzes Mac software and programming issues. Readers will find well-written, straightforward information about:

* How the Apple Macintosh works

* Choosing the right Apple Macintosh

* Selecting and configuring disk drives, large screens,

  and printers

* Getting the most out of the system

* Working with word processing, graphics, spreadsheet,

  communications, and desktop-publishing software

* Sharing data among Macs and with IBM PC compatibles

* How multimedia works and why everyone is talking about it

* Future directions in Apple Macintosh computing

An appendix lists technical specifications for the most popular Macintosh models, and a comprehensive glossary and index helps readers quickly find information on any topic in the book.

Included in the purchase price of THE APPLE MACINTOSH BOOK, 4th ed., is a free update. Details about this special offer can be found in the back of the book.

Born in Qingdao, China, Cary Lu grew up in California and received an A.B. in physics from the University of California, Berkeley, and a Ph.D. in biology from the California Institute of Technology. In addition to making short films for Sesame Street, Lu has been associate producer for NOVA and the science and technology advisor for Children's Television Workshop. He was founding managing editor of High Technology magazine and is currently technology editor for Inc. magazine.

Microsoft Press, the trade book division of Microsoft Corporation, publishes a wide range of quality books on computer programming, software and hardware, and other topics of importance to the computer industry. Microsoft Press books are widely recognized as authorized editions for the MS-DOS and Microsoft Windows operating systems, Microsoft languages, and software applications such as Microsoft Word and Microsoft Excel. Microsoft Press books are distributed to book and software retailers worldwide. Consumers in the United States may also order directly from the publisher at 1-800 MSPRESS.

Microsoft Corporation develops, markets, and supports a wide range of software for business and professional use, including operating systems, network products, languages, and applications, as well as books, hardware, and CD-ROM products for the microcomputer marketplace.


Extrasensory Clipper Dev Libraries
(April 20, 1992) -- Upgrade versions of three popular Clipper development libraries are now available from Extrasensory Software of Sherman Oaks, California.

The upgraded versions are Telepathy v1.5, a serial communications library for Clipper; FAXual.lib v1.5, a library of fax functions; and The PostScript Library for Clipper v1.5, which provides an intuitive interface between a developer's Clipper application. and PostScript printers.

New features in Telepathy v1.5 include:

* VT102 terminal emulation: The most advanced and effective

  VT102 support ever offered in a Clipper library

* Unsurpassed Zmodem compatibility

* Multiport serial board support: DigiBoard PC-4, PC-8

  and PC-16; MC-4, MC-8 and MC-16; Comtrol Hostess; and more

* Much more sample code: Easily-modifiable syntax examples

  show you how functions can be used and implemented

* Onscreen help via Norton Guides

* Support for NASI (Novell Asynchronous Server Interface)

* Support for INT 14

* New, more detailed user manual

New features in FAXual.lib v1.5 include:

* Support for up to 4 SatisFAXtion boards in one machine

* Increased fax capacity: Send up to 300 faxes per hour

* Much more sample code: Easily-modifiable syntax examples

  show you how functions can be used and implemented

* Supports Intel's Net SatisFAXtion or other CAS network

  servers to share resources across a network

* New, more detailed user manual

New features in The PostScript Library for Clipper v1.5 include:

* Support for EPS file format, both creating and importing

* Support for full justification of proportional fonts

  and word wrapping

* Ability to download Adobe fonts

* Much more sample code: Easily-modifiable syntax examples

  show you how functions can be used and implemented

* New, more detailed user manual

Telepathy v1.5 is priced at $219.95. FAXual.lib v1.5 is priced at $99.95. The Postscript Library for Clipper v1.5 is priced at $149.95. All three products are available directly from Extrasensory Software, 4450 Murietta Ave. #8, Sherman Oaks, CA 91423. Registered users of the three products may upgrade at significantly lower prices.


PenTOPS Bundled with PenPoint OS
SAN FRANCISCO, CA., April 16, 1992 -- Sitka Corporation today announced shipment of its PenTOPS networking software, which will be bundled with every copy of GO Corporation's PenPoint operating system. The two companies began working together in 1989, combining GO's visionary operating system with Sitka's expertise in cross-platform networking. The result is PenTOPS, which was jointly developed and is bundled as a native PenPoint function.

PenTOPS commands are gesture-based and very intuitive -- in fact, there are only four commands, one of which is "quit." Tablet users can easily connect their pen tablets to other tablets, deskbound systems, and printers by using any of-a variety of physical and wireless connectivity options to access files directly -- or even files within a corresponding deskbound network. Once connected, remote hard drives and printers appear to the PenTOPS user as if they were resident on the pen tablet so there is no need for complex up- and down-loading.

"Mobile computer users need a complete mobile networking solution that allows instant and effortless connectivity of pen systems to any other mobile or deskbound system, at any time, from any location," said Deborah D. Triant, Sitka president and CEO.

"Traditional networks aren't the answer--network administrators and predefined network workgroups are not part of the 'networking on the go' equation," continued Triant. "Revamped DOS networks that necessitate booting and rebooting, or only supply point-to-point connections, won't fit the easy-to-use, extensible requirements either. PenTOPS, and our PenCentral server software provide third parties with a platform that would allow them to build this easy-to-use, instant connectivity into their pen computers, applications, and systems."

"Sitka's pen connectivity solution, PenTOPS, is an important technology, further enabled by the PenPoint connectivity architecture," said Bill Campbell, president and CEO of GO Corp. "We are pleased to have teamed with Sitka to make this technology available on the PenPoint operating system free of charge to our OEM customers. With PenTOPS and PenCentral, Sitka has developed a unique connectivity solution for networking on the go."

PenTOPS on PenPoint

PenTOPS allows tablet users running PenPoint to easily access drives and printers available to PCs, Macs, and Sun workstations via a wide range of physical and wireless connectivity options -- from parallel and serial ports to infrared, radio frequency, and cellular. PenTOPS is integrated with PenPoint's import and export facilities to translate PenPoint documents to and from other file formats such as RTF and ASCII. PenTOPS is also fully integrated with PenPoint's "Connections Notebook" and remote file system architecture, thus assuring a simple and consistent user interface for end-users.

PenTOPS can access and share data on PCs via Sitka's DosTOPS network or its new PenCentral server software, which comes in diskette format for easy, mobile installation. PenTOPS can also access Macintosh systems via MacTOPS, and Sun workstations via SunTOPS networks. Each of these networks also has the capability to then access larger NetWare and LAN Manager networks, so that the mobile network actually expands the capabilities of the existing corporate or workgroup network.

Based on their extensive work with end-users over the past three years, Sitka has identified the following requirements for "networking on the go":

* Turn-key networking ability: support for all

  leading computers,

* Easy to use: end user creates network on the fly, not an

  administrator.

* Affordable: low cost and available node-by-node.

Availability

PenTOPS is bundled with the PenPoint operating system, available immediately. Sitka also plans to provide versions of PenTOPS for other pen-based operating systems.

Sitka Corp, 950 Marina Village Parkway, Alameda, CA 94501

510-769-9669


FileRunner File Maintenance Util
Arcadia, CA...The FileRunner program solves a critical problem faced by anyone who uses more than one PC, and needs to transfer data from one PC to others. The problem is -- how to safely get the latest version of each of your important files onto all of the PCs you use. Designed to automate and safeguard file transfer, the FileRunner program is very easy to use and does not require any cables, modems or network hardware. It simply uses a floppy disk and proprietary Overwrite Safeguard algorithms to transfer and maintain identical files on each of your PCs. It literally synchronizes the files on all your PCs.

The FileRunner program creates an "invisible network" between all of your desktop and notebook PCs through a unique combination of functions. It combines data compression, virus checking and, for the first time anywhere, Overwrite Safeguard. Overwrite Safeguard is the exclusive ability to detect when a critical file has been altered on one or more computers. It gives you a chance to keep both copies for later review. You no longer need to worry about accidentally overwriting important information during transfer. This important feature is found only in the FileRunner program.

Virus scanning is an automatic option. If a virus is present, the FileRunner program will not copy the infected program, but instead will notify you of the problem. MBS Technologies, Inc. has licensed Virex for the PC from MicroCom Systems, Inc. for the ultimate in virus protection. A built-in data compression option allows you to efficiently pack large amounts of data on standard 5 1/4" or 3 1/2" diskettes and to transfer the most recent information to other PCs.

The FileRunner program also compensates for changes in time zones. Additionally, it calculates time loss, and prompts you to adjust the internal clocks on your computers to keep them synchronized and accurate. The program recognizes, and automatically adjusts for, daylight savings time as well.

EASE OF USE

The FileRunner program is so easy to use on a daily basis that, after the initial set up, all you must hit are two keys on the computer...F10 and Y. There is no need to get involved with complicated DOS commands, hard to use data compression programs, or obscure path and directory locations. The FileRunner program tracks all of this information and automatically knows how and where to find your files. Context-sensitive hypertext help screens are available throughout the program by pressing the Fl key. On-screen help is also displayed on most screens.

SUGGESTED APPLICATIONS

If you transfer data between PCs, the FileRunner program gives you the security of knowing that you will always have the latest information on a lightweight diskette that goes with you, and that the transfer will be safe and efficient. You do not need to use inconvenient unwieldy cables, and the computers do not have to be in close proximity. It can be used by anyone who works with one computer at the office and another at home. It can be used by a person who travels with a notebook and needs to update his desktop at his office when he returns. It can be used by a consultant or salesman who has to work in geographically separated locations. Offices with multiple PCs can use the program in lieu of expensive networks. If a network already exists, the FileRunner program provides a convenient means of transferring files between networked PCs and any stand-alone desktop or portable PCs that you might have as well. The FileRunner program transfers are so easy to perform that no special skills are needed. And since diskettes are the transfer medium, the FileRunner program automatically provides a "bonus" backup of your critical files.

PRODUCT FEATURES

The FileRunner program features that save time and improve productivity:

Transfer and Update

* Identifies, updates and transfers the latest versions of all of your "critical" files without cables or modems across multiple PCs

* Overwrite Safeguard warns you before you lose data if you've changed a file on more than one PC

* Remembers the sequence of file transfers and identifies the computer on which files have been updated, so that you can avoid overwriting newer files with older versions

* Transfers the latest files bi-directionally, so that both your FileRunner diskette and your PC's hard disk drive always hold the latest versions of files

* Automatically compresses files, giving you more data on your diskettes

* Transfers onto or erases from the FileRunner diskette only those files that have been altered, added or deleted, since the FileRunner program was last run

* Keeps a history of which PC a file is being transferred from and where the most recent version of the file was created, last updated, or deleted

Safety Features

* Protects against computer virus infection using Virex for the PC virus prevention

* Allows optional scanning of your entire hard disk for viruses

* Employs advanced error checking to ensure accurate file transfer

* Provides an incidental "bonus" backup of important files, since the latest versions of files are always on your FileRunner diskette

Ease of Use Time Functions

After initial setup, the FileRunner program requires just two keystrokes to update and transfer all of your critical files Context-sensitive hypertext help screens are available throughout the program On-screen help is automatically provided on most screens Remembers where files reside on each of your PCs, automatically updating files in their correct directories Has easy-to-understand error and diagnostic messages Works with all IBM-compatible PCs, Windows 3.X and even non-compatible computers that can emulate DOS

* Takes into account time zone differences for travel

* Calculates time loss, and prompts you to adjust for inaccurate system clocks

* Recognizes and accounts for Daylight Savings Time

No other software on the market will do all this.

The FileRunner package contains both 3 1/2" and 5 1/4" FileRunner program diskettes, a complete easy-to-read User's Guide and a warranty card. The introductory price is $99.95.

Availability of the FileRunner program will be May 1992. Distribution will be through Merisel as well as other domestic and international distributors.

The FileRunner program is the flagship product of MBS Technologies, Inc. The company, founded by Bernee D. L. Strom and Martin M. Batt in 1991, publishes computer software that improves the productivity of users in today's multi-computer environment.

MBS Technologies, Inc.

34 W. Sycamore; Arcadia, CA 91006

818/572-0258; 818/355-7862 (FAX).

Sales phone: 800/860-8700 or 412/941-9076.

Technical Support phone: 800/860-8703.


Automatic Aperture Card Scanner
Herndon, Virginia (April 1, 1992): Vidar Systems Corporation today announced the introduction of its Model AC20-2, an automatic aperture card scanner for electronic document management applications in which drawings are converted from film to electronic data. It performs a similar function to Vidar's large-format scanners, capturing images from aperture card film instead of the original full-size document. According to George Patrick, Vidar's Vice President of Sales, "Our aperture card scanner is a brand new design, intended for continuous operation at speeds of up to 350 cards per hour. We believe it will be especially interesting to high volume users such as service bureaus, aerospace contractors and the U. S. Government."

The AC20-2 has a 500 card input hopper and a scan rate of up to 350 cards per hour. The CCD camera in the AC20-2 generates a 6,000 dpi raster, which translates to a 200 dpi image referred to the original drawing.

The new scanner also features a contact-less Hollerith reader capable of reading cards face-up or facedown. The AC20-2 scans in automatic (batch mode) or single-card operation, and has 500 card accept and reject hoppers.

Designed as a rugged, virtually maintenance-free system, the AC20-2 is capable of handling many thousands of aperture cards, no matter how fragile, greasy or dog-eared. From input hopper to output hopper, the card path is continuous, with no reciprocating elements to cause snags.

Vidar's latest enhancement feature, adaptive area thresholding, is incorporated into the AC20-2. By continuously measuring grayscale values in a small "flying window" the area thresholding system adjusts dynamically for wide variations in background and line quality in both axes, producing a sharp black-on-white raster image from low contrast gray-on-gray films.

Vidar Systems Corporation has been manufacturing large-format scanners since 1985. The AC20-2 Aperture Card Scanner is the latest in Vidar's product line.

Vidar Systems Corp, 520 Herndon Parkway, Herndon, VA 22070

Phone: 703/471-7070 * Fax: 703/471-1165


Dalanco Spry Model 500 DSP Board
April 13, 1992 -- Dalanco Spry is pleased to announce the Model 500 Digital Signal Processing Board with Analog and Digital l/O. The Model 500 is designed for the PC AT and ISA bus compatible microcomputers.

Applications include Data Acquisition, Instrumentation and Control, Speech and Audio, as well as general purpose DSP software development.

The Model 500 is based upon the TI TMS320C51 20 Mips DSP Processor. It provides data acquisition for 8 channels at 12 bit resolution and a maximum 225 Khz sampling rate. Two 12 bit analog output channels are also provided, as are a buffered digital l/O connector for user expansion, and the two serial interfaces of the Tl DSP.

The board is populated with 64K words of Program RAM and 128K words of dual-ported Data RAM. The dual-ported architecture enables the creation of applications requiring simultaneous mathematical calculations coupled with concurrent analog and disk l/O.

The Model 500 features high throughput to the host PC's memory (up to 3 MBytes/sec) and disk, and multiple boards may be accommodated within a single system.

Depending on the host system, data may be written to or read from disk at the maximum sampling rate of 225 Khz.

The following software is included with the Model 500:

* TMS320C51 Assembler and Debugger

* FFT Software

* Realtime Signal and Spectrum display

* Concurrent Record and Playback to/from Disk

* Digital Filter Examples and FIR filter code generator

* Waveform Editor

The Model 500 with TMS320C51 is priced at $1600.

Dalanco Spry, 89 Westland Ave, Rochester, NY 14618

Phone/Fax: 716-473-3610


Facit Industrial Printer Brochure
MANCHESTER, N.H., April 23, 1992 -- A new color brochure is available from Facit, Inc., Manchester, N.H., that features the company's industrial printers.

Unlike "mass market" printers, the Facit devices are designed specifically for more difficult printer applications and use in harsh environments. In addition to high-volume administrative environments, Facit units provide trouble-free service in rugged environments such as warehouses, manufacturing production lines and health care facilities.

The brochure highlights Facit's E-line printer family, a group of dot matrix printers for label and multi-part forms applications. In addition, the company's laser and bar code printers are also featured.

A variety of these printers were designed for heavy-duty applications in high-volume and industrial environments and feature:

* Straight paper paths and heavy duty tractors for

  smooth multi-part form and label feeding

* On-demand forms delivery for zero tear-off

* Bar code printing with internal bar code software

* Industrial Printing Application Language (IPAL) for

  custom label designing

The new Facit brochure is available by writing:

George Bausewein Facit, Inc.

400 Commercial Street

Manchester, NH 03101-1107

Facit, Inc., the U.S. subsidiary of Facit AB, Sweden, is located in Manchester, NH. The privately held company manufactures a variety of computer peripheral products including dot matrix, thermal, bar code and laser printers, ruggedized portable PC's and video display terminals; as well as a family of tape punches, readers and magnetic storage devices for the numerical control industry.


AST Reduces System Prices
IRVINE, Calif., April 22 , 1992 -- Reinforcing its leadership position of setting notebook price/performance standards, AST Research Inc., a Fortune 500 Company, today announced an 18 percent reduction of all models of the award-winning Premium Exec 386SX/25C color notebook. The price cut establishes the Premium Exec 386SX/25C as the lowest-priced color notebook available in the market.

With msrp prices as low as $3,295, this breakthrough pricing structure minimizes the gap between monochrome notebook pricing and color notebook pricing. The Premium Exec 386SX/25C is the recipient of the "Innovation of the Year" product award, given by Ziff's Germany PC Professional, during this year's Hannover Faire trade show in Germany.

"AST's marketing strategy is to offer unsurpassed, portable color technology at the lowest price points available," said Dan Sheppard, director of marketing for portable systems. "We are providing users with a choice of a color or monochrome screen with only a $300 list price difference between all models."

Effective immediately, all models are reduced by 18 percent. The 25-MHz Premium Exec 386SX/25C Model 123V/4 with a 120-MB hard drive and 4MB RAM now lists at $4,095. Model 83V/4 with a 80-MB hard drive and 4MB RAM is lowered to $3,595. Model 63V/4 with a 60-MB hard drive and 4MB RAM now lists at $3,295, a full $700 less than its closest competitor, a 60-MB color notebook from Dell which sells for $3999.

Color Notebook Features

Just over 7 pounds, the award-winning Premium Exec 386SX/25C battery-powered notebook boasts a 9-inch diagonal VGA color screen with 640 by 480 resolution and 16 simultaneous colors. At a 320 by 200 resolution, up to 256 colors can be displayed at one time. The 9-inch diagonal screen is based on thin film supertwist neumatic passive matrix technology and contains two backlit CCFT panels. The system also supports super VGA (800 by 600 pixel resolution, 16 colors and 100 columns of text) for use with an external monitor. In addition, the notebook's LCD (liquid crystal display) and external monitor can be used simultaneously for easier, more effective presentations.

--------------------------------------------------------

IRVINE, Calif., April 27, 1992 -- AST Research Inc. today began shipping its Premium SE 4/50, 50-MHz, i486-based upgradeable servers at prices as much as 10 percent lower than previously announced. The company also reduced prices by as much as 10 percent on the Premium SE 4/33, a 33-MHz system that began shipping in January 1992.

AST's Premium SE server line, which includes a host of scalability features, offers a complete hardware solution for local area network and multiuser environments.

Premium SE 4/50 suggested list prices begin at $8,895, representing a $1,000 cost savings to the end user over previous pricing. The Premium SE 4/33 now lists for $5,395, a $600 savings to the end user. For additional model and pricing information, see attached list.

"The new Premium Server pricing is a reflection of AST's commitment to value-oriented marketing, providing the most advanced uniprocessor server solution at the most attractive price/performance ratio," said Larry Fortmuller, director of high performance systems.

AST's Premium SE 4/33, Model 663, equipped with a 660-MB SCSI hard drive, for example, is now priced 11 percent lower than Compag's SYSTEMPRO LT Model 486/33-510. The Compaq model is a comparable system on the market with 150MB less storage than the Premium SE 4/33. Compaq has no comparable system in the SYSTEMPRO line to AST's Premium SE 4/50, a true 50-MHz system featuring both internal and external clock speeds of 50MHz. The SYSTEMPRO LT DX2/50 provides 50MHz inside the CPU, but only 25MHz externally.

The Premium SE's full range of scalability features allow the system to be configured to support small or large multiuser environments and low- to high-end applications. It also is affordable as a single-user system.

Scalability features include upgrading i486 microprocessing through AST's award-winning Cupid-32 upgrade design or Intel's upgrade technology. Cupid-32 provides the advantage of having all related performance components -- the CPU, first complement of memory, memory cache and co-processor support -- on the single Cupid/processor board. Swapping a single board provides upgrading to newer technology as performance needs increase.

Additional scalability features include support for up to 80MB of RAM, a high-speed SCSI disk subsystem with up to 16MB of upgradeable cache; and a Premium XP expansion cabinet, slated to ship at the end of May, which houses up to 16 hard drives.

The Premium base cabinet features a sleek design, with easy-to-access controls on the front panel, gliders, hinged side doors and slide-out hard drive trays for ease in servicing.

"Like all of AST's products, the Premium servers are very reliable, high-quality systems, designed for flexibility and upgradeability with AST's Cupid-32 architecture," said AST reseller J. Richard Shafer, president of Creative Business Concepts, Inc., Laguna Hills, Calif. "Customers also like the clean design of the Premium server, which includes the hinged side door that provides easy access to system components."

The Premium SE 4/50 is AST's most advanced server. It combines the enhanced capabilities of EISA, the fastest Intel i486 processor and 256KB of external cache for optimum system throughput.

AST's Premium SE servers are fully compatible with Microsoft, Novell NetWare, SCO UNIX, OS/2 and Banyan Vines, leading network and multiuser operating systems. Optional 32-bit EISA Ethernet and Token-Ring network adapter cards offer customers a total networking solution.

To meet its customers' technical support needs, AST joined Novell Inc.'s Technical Support Alliance to support hardware and software from various manufacturers. AST also is an authorized training site for SCO, providing training for its resellers on SCO's multiuser operating systems .

AST backs its systems with a six-day-a-week toll-free technical support hotline, Info-FAX information service which provides technical documents via fax and a worldwide 24-hour on-line bulletin board. Local dealer and third-party service and support with optional on-site service also are offered.

AST Research, a Fortune 500 company, is an information technology provider, manufacturing value-leading desktop, notebook, server and consumer personal computer products under the Premium, Bravo, Premium Exec and Advantage! product names. The company reported record sales of $688.5 million for the 1991 fiscal year ended June 28, 1991, compared to sales of $533.8 million for fiscal year 1990.

AST is represented in more than 100 countries and operates 39 subsidiaries and sales offices worldwide. AST Research corporate headquarters is located at 16215 Alton Parkway, P.O. Box 19658, Irvine, Calif. 92713-9658. Telephone: (714) 7274141 or (800) 876-4278. Fax: (714) 727-9355.


Lifestyle Software DietPro
St. Augustine, FL.--17 April 1992--The most progressive health and fitness software has just gotten better. DietPro for DOS, the latest release from Lifestyle Software Group, is the only computer program you will need to manage your diet, nutrients and exercise. Crafted with the latest technologies, DietPro for Dos synthesizes research from international health organizations into a comprehensive but easy to use package for under $40.

DietPro for DOS has all the powerful innovations of Lifestyle's popular DietPro for Windows which make this new release the fastest and most enjoyable way to manage your diet and exercise plans under DOS.

DietPro offers the simplest system for selecting foods. Enter your own foods or use recipes derived from the database of over 5000 foods and recipes. DietPro helps you extract a subset of this data for daily use. Flip between this personal database and the full set as often as you like. This improvement alone will save you hours.

Measure your dietary intake against the standard RDAs plus your choice of varying guidelines from international health organizations. Track 36 nutrients in every food in the USDA food list, as well as fast foods, prepared foods, specialty items and more. Put all these foods into your plan with a single button. DietPro compares single foods or your entire plan to any of the standards you select. And it lets you print or view the analyses using a variety of charts and graphs.

DietPro for DOS allows you to develop a weight loss and fitness plan uniquely tailored to your lifestyle. Additionally, you can integrate a database of physical activities that can strengthen your body and refresh your mind. You can enter and monitor your own guidelines and goals as prescribed by your physician.

Pick multiple foods and exercises by clicking on the list. Select by name, category or nutrient fields. Analyze a recipe and add it to your database by simply clicking on the ingredients--DietPro does recipe. DietPro stores the recipe  analysis indefinitely.

DietPro for DOS is available for IBM, Tandy and compatibles.

Lifestyle Software Group is a publisher and developer of software for home leisure computing. DietPro for DOS retails for $39.95 and is available along with other Lifestyle Software products at many retailers nationwide. To locate a retailer near you, call 1-800-289-1157.

Lifestyle Software Group

63 Orange St, Saint Augustine, FL 32084

904-825-0220


IdeaFisher V4.0 Shipping
IRVINE, CA - Marsh Fisher, chairman and founder of Irvine, California-based Fisher Idea Systems, Inc., has announced that the DOS Version 4.0 of the firm's innovative software, IdeaFisher, is now shipping.

Among the upgrade highlights is a complete revised QBank database that has been expanded to 5,970 questions from the original 3,000. The improvement in writing style and organization will greatly enhance the user's ability to define the task at hand

Based upon user input, the refined interface offers custom configuration of the size and placement of each window within the program. This information is saved in a preference type file, allowing user design of the working environment.

Other enhancements include:

- Improved text editor function on the Notepads

- Mouse support has been increased with the addition

  of close and zoom icons for each window

- Mouse supported YES and NO boxes

- A new User's Guide which contains four detailed

  Sample Sessions

- A utility program, IDBCHECK, which can be used to verify

  the integrity of Personal Association files

The backward compatible upgrade is complete with revised and expanded program documentation, and priced at $99. The upgrade is free to users (with proof of purchase) who purchased IdeaFisher since July 1, 1991. The program will run on IBM PC/XT/AT386 486 or 100% compatibles.

For further information regarding IdeaFisher, contact Fisher Idea Systems, Inc. at (800) 289-4332, or, (714) 474-8111.


Conflict Korea & Carrier Strike
Sunnyvale, CA -- (April 10) -- Strategic Simulations, Inc., declares WAR! The award-winning company brings a new level of intrigue and suspense with the release of Conflict: Korea and Carrier Strike, two games packed with historical as well as hypothetical military campaigns, intrigue and fun.

"Military tacticians could not ask for two more challenging historical war venues, as they can mount full scale military campaigns to challenge the best generals and military commanders from the Korean War and the South Pacific in World War II," says Kathleen Watson, SSI Director of Marketing.

Conflict: Korea will make the "Forgotten War" with Korea after World War II unforgettable. Here the player finds himself strategically commanding his troops against the million-plus "volunteer" army of China. The game, which is for play on the IBM and Amiga has been designed by Norm Rogers, Jr., author of SSI's Red Lightning and Conflict: Middle East.

Conflict: Korea zeroes in on the first year of the Korean War, which was marked by massive military mobilization. This wargame will let you become General MacArthur or even commander of the Northern Korean forces. There are three historical scenarios possible for Korea. The Dragon Wakes, set in June 1950 - June 1951, starts the invasion of South Korea through the North. Operation Chromite, September 1950 June 1951, focuses on MacArthur's Inchon counter-attack and the subsequent United Nation's Drive through North Korea. Cold Steel re-enacts the massive counter-counter offensive by the Chinese Army on November 1950-June 1951. There is even a hypothetical 1995 scenario in which the United States, heavily engaged in another part of the world, is allowed only a limited role.

With six levels of difficulty, Conflict: Korea is intriguing for the novice as well as the battle-hardened wargamer. The player has command of every detail of combat -- down to the individual platoons, vehicles and gun tubes. The player can even choose to have the computer direct air operations while he controls the land war.

Carrier Strike, South Pacific 1942-1944, is the first game to link naval battles from 1942-1944, creating an entire military campaign in which the player is the commander. Carrier Strike begins with the South Pacific about to erupt. The US/British and Japanese naval forces are aligning their resources to do battle. The player has in his fingertips carrier task force combat with the ability to link several historical battles: Coral Sea; Eastern Solomons; Santa Cruz; Midway; and Marianas. There is even one hypothetical battle, the Battle of Torokina, and many randomly generated carrier battles.

To begin this battle, the player must assign search plans to reconnaissance the area and assign Combat Air Patrol to defend the task force. The player must take command to assign strike missions to attack enemy fleets and air bases, and assume the role of Carrier Take Force Commander issuing the proper orders -- re-fuel and re-arm, search and launch mission strikes against the enemy -- and even move the carrier task forces around the map.

Carrier Strike is the newest game by Gary Grisby, the author of such hits as: Western Front, Second Front and Kampfgruppe. Carrier Strike has unlimited possibilities -- hypothetical scenarios, limited intelligence reports to keep the player on edge, random location of ships for every scenario. The player finds that he has no control over land-based aircrafts and non-carrier task force ships, and is at the mercy of the weather.

Carrier Strike, with its infinite number of battle possibilities, displays individual planes and ships. Improved graphics shows explosions, and a visual carrier deck and hangar let the player manipulate EVERY plane on the carrier.

Conflict: Korea is available on IBM and Amiga for $59.95. Pack-ins will include game box and manual.

Also for play on the IBM, Carrier Strike comes in 5.25" and 3.5" formats. It supports 16-color VGA and EGA graphics, and AdLib, Sound Blaster and Roland sound systems. Available in May for $69.95.

STRATEGIC SIMULATIONS

675 Almanor Ave, Suite 201, Sunnyvale, CA 94086-2901

(408) 737-6800,   FAX: (408) 737-6814


Artisoft Sounding Board Adapter
(TUCSON, AZ--April 1, 1992)--Artisoft, Inc. announced today that at Spring COMDEX it will be demonstrating the new Multimedia capabilities of its Sounding Board adapter. Supporting Windows 3.1 Multimedia and Object Linking and Embedding (OLE), the Sounding Board adapter allows users to create digitally recorded sound files which can be embedded in or linked to other OLE or Multimedia applications. Priced at $99 (ISA bus) or $199 (MicroChannel bus), the new Sounding Board adapter will be available in the second quarter of calendar year 1992.

"Multimedia is the wave of the future," states Jack Schoof (pronounced "shoaf"), Artisoft's President and CEO. "And we're not only making it accessible to PC users, we're making it easy to use and affordable."

The Sounding Board adapter can be used to enhance documents created from within any other Windows application that supports OLE protocols. This enables users in, for instance, Word for Windows to create a presentation with an ongoing voice commentary. Users can also enhance their electronic mail with the Sounding Board adapter.

The ArtiSound Recorder software allows a user to either link or embed a sound file into another Windows application document. This allows the Sounding Board adapter to be used with Multimedia applications or within a Multimedia environment.

Users can embed a sound file into a Windows document by simply copying it into a Windows document. The sound file appears as an icon in the document, which, when selected, runs the Sounding Board adapter's ArtiSound Recorder software so that the user does not have to exit the current document or even switch windows. If the user edits the sound file within the document, the changes will only affect the embedded sound file; the original sound file will remain intact.

Users also have the option of linking sound files, also by copying them into a Windows document. Linked sound files are edited in the same manner as embedded ones, except that any changes will also be made to the original sound file, no matter where it is located.

The Sounding Board adapter converts between audio/voice signals and a digital data stream to allow users to record and play sounds, manipulate existing sounds and play Windows WAVE-type sounds. Its ArtiSound Recorder software uses the 8kHz mulaw standard (the voice standard developed by telephone companies), but it can also convert different types of files, playing and recording PCM data at an 8,11, or 22kHz sampling rate.

Menu options allow users to cut, copy and paste sounds from the Clipboard, insert and mix sound files, increase or decrease volume and speed, add an echo, reverse the sound to play backwards, auto-repeat sounds and configure the play/record devices. The ArtiSound Recorder software uses a device independent Windows API which allows applications to use any sound input/output boards which provide for that Windows API.

Artisoft develops and manufactures a full line of hardware and software for local area networks including the LANtastic Local Area Network. The LANtastic network is recognized as the leading DOS-based peer-to-peer network and has won numerous industry awards for its cost-effective features, performance, and ease of use. It allows up to 300 users of IBM-compatible computers to connect and share information and peripheral devices such as printers, hard drives and CD-ROMs. The LANtastic network and Artisoft's other connectivity products are distributed in over 70 countries worldwide.

For more information about Artisoft or its product line, contact Artisoft, Inc. at 691 E. River Road, Tucson, AZ 85704. Sales 800/TINY RAM. Corporate 602/293-4000. Fax 602/293-8065.


LANtastic Connectivity Series
(TUCSON, AZ--April 1, 1992)--Artisoft, Inc. announced today that it will begin shipping its LANtastic for Macintosh system in the second quarter of calendar year 1992. Priced at $799, this system provides an unlimited amount of users a transparent integration of a Macintosh network and PostScript printers into the LANtastic network operating system environment, and enables realtime file-sharing between both environments.

"By establishing the LANtastic network's interoperability with Macintosh networks, we are bringing the two leading peer-to-peer networks together for the first time," stated Jack Schoof (pronounced "shoaf"), Artisoft President and CEO.

The LANtastic for Macintosh system establishes a PC to serve as a dedicated gateway between the Macintosh and LANtastic networks. PC servers on the LANtastic network are set up as logical drives on the gateway PC and appear as slightly modified Macintosh computer icons to users on the Macintosh network. Thus, Macintosh users see PC files and directories as they would standard Macintosh files and directories and use the Chooser to select printers attached to the LANtastic network.

Slightly different for PC users, the LANtastic for Macintosh system establishes a dedicated gateway PC where users can access PostScript printers on the Macintosh network and where they can see Macintosh files which have been saved onto the gateway PC's hard drive. PC users can see and access any PostScript printer that is attached to the Macintosh network from their own LANtastic interface.

Both sets of users can access the other set's files of the same file format (i.e. Microsoft Word and Excel or Aldus PageMaker. File attributes and record-locking are supported in both directions. In addition, any PostScript-compatible printer--even non-AppleTalk interface printers such as Hewlett Packard's LaserJet series--can be shared simultaneously between all workstations, both Macintosh and PC.

The LANtastic for Macintosh system uses a Standard Macintosh User Interface and maintains all Apple security privileges normally available to Macintosh users. The gateway PC appears as an AppleShare server to the Macintosh user and files are accessed in the same fashion as with any other AppleShare server. The LANtastic for Macintosh system provides one AppleTalk Interface Board (Apple LocalTalk PC board, Ethernet, Token Ring) and requires one LANtastic workstation with 640K RAM, a LANtastic-compatible network adapter, Apple's System 6.0 or greater, and DOS 3.3 or greater.

Artisoft develops and manufactures a full line of hardware and software for local area networks including the LANtastic Local Area Network. The LANtastic network is recognized as the leading DOS-based peer-to-peer network and has won numerous industry awards for its cost-effective features, performance, and ease of use. It allows up to 300 users of IBM-compatible computers to connect and share information and peripheral devices such as printers, hard drives and CD-ROMs. The LANtastic network and Artisoft's other connectivity products are distributed in over 70 countries worldwide.

For more information about Artisoft or its product line, contact Artisoft, Inc. at 691 E. River Road, Tucson, AZ 85704. Sales 800/TINY RAM. Fax 602/2938065. Corporate 602/2934000.


LANtastic for Netware V4.1
(TUCSON, AZ--March 19, 1992)--Artisoft, Inc. announced today that it has begun shipping LANtastic for NetWare v4.1. This product, which provides Novell NetWare users with the LANtastic v4.1's peer-to-peer networking features, now offers increased performance as well as additional feature enhancements to System Manager and printing capabilities.

"The LANtastic for NetWare software provides a low-cost, easy-to-use solution for Novell users wanting the features, peripheral-sharing and flexibility of a peer-to-peer network," said Jack Schoof (pronounced "shoaf"), Artisoft President and CEO.

Three important features will improve the speed and efficiency of the LANtastic Local Area Network--resource caching, random access caching and delayed record-locking. Other new features of LANtastic v4.1 include new System Manager features, immediate despooling, enhanced printer queue display, new NET PRINT switches, new print resources parameters, automatic login to servers, login to multiple servers with one command, hot keys to menu items, and enhanced NET HELP display.

LANtastic for NetWare v4.1 is available at $499 per network and supports up to 300 users. Registered LANtastic for NetWare v4.0 users can upgrade to v4.1 through Artisoft or any Authorized Artisoft Five Star Dealer for free upon proof of registration.

Artisoft develops and manufactures a full line of hardware and software for local area networks including the LANtastic Local Area Network. The LANtastic network is recognized as the leading DOS-based peer-to-peer network and has won numerous industry awards for its cost-effective features, performance, and ease of use. It allows up to 300 users of IBM-compatible computers to connect and share information and peripheral devices such as printers, hard drives and CD-ROMs.

--------------------------------------------------------

(TUCSON, Ariz.--April 7, 1992) -- Artisoft, Inc. announced today an agreement with Compudyne to package the LANtastic Network Operating System with Compudyne computer systems at CompUSA stores nationwide.

"This offer will be very attractive to purchasers, who will instantly have the power of networking on these systems," said Dave Hallmen, Artisoft's Vice President of Sales & Marketing. "Users will have the option of adding their choice of hardware connections to build a network anywhere in size from 2 to 300 PCs."

CompUSA will preload Artisoft's LANtastic Network Operating System on Compudyne computer systems so that users can immediately create a slotless 2-PC network with the purchase of serial or parallel cabling. Users also have the option of purchasing LANtastic 2Mbps or Artisoft Ethernet adapters, also available through CompUSA stores, to build local area networks up to 300 PCs.

"We believe that 1992 will be the year of the local area networking explosion," said Stephen Dukker, Compudyne's President and CompUSA's Vice President. "Prepackaging network-ready PCs is our first step in helping to place networked computers at every desk in every business."

CompUSA, Inc. is the leading operator of large format computer superstores. It operates more than 25 stores across the U.S. and offers over 5,000 microcomputer hardware, software and related products at significant discount pricing. These products carry such names as Apple, Dell, Panasonic, Toshiba, Microsoft, Borland and Word Perfect.

Compudyne is the manufacturing and distribution arm of CompUSA. It also markets its product line through a mail order subsidiary, Compudyne Direct. For more information about Compudyne, contact Compudyne, 1515lA Surveyor Blvd., Addison, TX, 75244. Corporate 214/702-5600. Sales 800-932-COMP.

Artisoft develops and manufactures a full line of hardware and software for local area networks including the LANtastic Local Area Network. The LANtastic network is recognized as the leading DOS-based peer-to-peer network and has won numerous industry awards for its cost-effective features, performance, and ease of use. It allows up to 300 users of IBM-compatible computers to connect and share information and peripheral devices such as printers, hard drives and CD-ROMs. The LANtastic network and Artisoft's other connectivity products are distributed in over 70 countries worldwide.

For more information about Artisoft or its product line, contact Artisoft, Inc. at 691 E. River Road, Tucson, AZ 85704. Sales 800-TINYRAM. Fax 602/293-8065. Corporate 602/293-4000.


Kalok & Xebec HDD Agreement
Tokyo, Japan - Sunnyvale, California -- April 9, 1992 --Xebec, Co., Ltd., a Japanese manufacturer and marketer of computer hard disk drives and Kalok Corporation, a California-based developer, manufacturer and marketer of hard disk drives, have entered into an agreement for the transfer of certain of Kalok's assets to Xebec and the settlement of all outstanding claims between Kalok and Xebec.

Under the terms of the agreement, Kalok has transferred to Xebec the exclusive right to manufacture and sell its KL343, KL3100 and KL3120 Winchester disk drives, along with all of the stock of Kalok's wholly-owned subsidiary, Kalok Pilipinas, Incorporated. In exchange for these assets, Xebec has agreed to cancel all amounts now owing and unpaid by Kalok to Xebec and to assume certain other obligations of Kalok. All previous claims made by Kalok and Xebec against one another, including those in a lawsuit filed by Kalok against Xebec on March 18, 1992, are being released as part of this agreement.

KALOK Corp, 1289 Anvilwood Ave, Sunnyvale, CA 94089

408-747-1315


EcoLinking Online Info Guide
March 16, 1992--Peachpit Press announced the long-awaited release of EcoLinking: Everyone's Guide to Online Environmental Information, by Don Rittner, the first guide to the use of computer technology by scientists, environmentalists, and concerned citizens to share ideas and research on environmental issues. EcoLinking documents this growing phenomenon, detailing how networks, bulletin boards, and online services can be put to work to save the planet. With the one out of every 12 Americans belonging to an environmental organization and with 75 million Americans using personal computers, this book is expected to become the definitive guide to exchanging information using local, regional, national, and worldwide computer networks.

Divided into five sections, the book gives step-by-step instructions on how to access the immense academic, bibliographic, and scientific information found on global networks and commercial online services, focusing on how to get online and on what types of data can be retrieved. EcoLinking also explains how to conduct online scientific and environmental research using bibliographic retrieval services, CD-ROM databases, and electronic bulletin board systems. Comprehensive appendices profile a sample online session, list recommended communications software, and detail the environmental discussion lists available through Internet. Also included in the appendices is a discussion of "gateway" services that provide access to networks such as Internet, BITNET, and Usenet.

Don Rittner is an educator and activist who has been involved in studying and preserving the environment for more than 20 years. He is an avid computer user and columnist, and is currently the founder and director of the MUG News Service, an informational clearinghouse that reaches more than 350,000 Macintosh users worldwide.

Access

EcoLinking: Everyone's Guide to Online Environmental Information (ISBN 0-938151-35-5, 300 pages) has a retail price of $18.95. It is available through bookstores or directly from Peachpit Press, 2414 Sixth Street, Berkeley, CA 94710. Review copies, color transparencies, and black-and-white photographs are available to the press. Contact Suzanne Ludlum at 800/283-9444 (or for the quickest response to your request, by fax at 510/548-5991).


Lasernet ShareCard
IRVINE, CA -- April 13, 1992 -- Western Telematic Inc. (WTI) the leader in printer sharing systems, today introduced three new high-speed, plug-in printer-sharing cards for the HP LaserJet called LASERNET ShareCard.

ShareCards are designed for the office or department environment where up to ten users must share an HP LaserJet III, IIID, II, or IID. There are three ShareCard models -- the SC-6 with six (6) serial inputs; the SC-7 with six (6) serial inputs plus one (1) parallel input; and the SC-10 with ten (10) serial inputs. The ShareCard plugs into the LaserJet's "Optional I/O" slot and does not require a separate power connection or additional desk space.

These newest LASERNET models come standard with a 256 KB dynamically-allocated buffer that can be expanded up to 1 MB. LASERNET ShareCards feature serial inputs speeds up to 115K baud and enable multiple computers to simultaneously send data to the printer on a first in, first out basis. There is also a self-test feature that prints out a report on the ShareCard's status and configuration.

ShareCard offers quick and easy installation and operation. All input ports employ economic RJ-11, telephone-style, snap-in connectors. ShareCard even comes with easy-to-use software which provides pop-up menus for convenient, port parameter set-up. Other features include beginning and end-of-job messages, automatic top-of-form and collated copy command.

ShareCard models support all types of computers including IBM PC and compatible, minicomputer, Macintosh and HP 3000. They also provide for status checking from the HP 3000 with full spooler support. Both Term Types 22 and 26 are supported automatically.

The suggested retail price for the 6-port version is $495.00. LASERNET ShareCards will be available in May 1992 from Western Telematic.

Western Telematic Inc., headquartered in Irvine, California designs, manufactures and markets data communication equipment including peripheral sharing devices, multiplexers, security modems, data PBX and code activated switches and pollable data collection devices.

Western Telematic Inc, 5 Sterling, Irvine, CA 02718

714-586-9950     800-854-7226


SCRAMNET Price Reductions
Dayton, Ohio (April 13, 1992) -- Due to a 275 percent increase in unit sales, Systran Corp. announced today dramatic price cuts for interfaces to its SCRAMNet real-time network. The new lower pricing is a result of new levels of efficiency in purchasing, production, sales and support. In addition, three years of product maturity means almost no field engineering support is required to solve operational problems common to newly released designs. The result is a savings of up to 22 percent for the company's most popular U.S. product, and up to 35 percent for international products.

Said W. Lynn Trainor, president of Systran, "These significant price reductions, a result of our success in the simulation, data acquisition, process control, telemetry and instrumentation markets, will further increase SCRAMNet's position as de facto standard for real-time system interconnects. "

For the company's most popular U.S. product, the interface to open-chassis VME backplane busses, prices have been cut by 22 percent. Additional discounts of up to 25 percent are available through volume purchase programs. Systran customers can also now enjoy increased purchasing flexibility; for example, they now have the option to purchase cabinet kits separately from interfaces.

SCRAMNet Designed for Simplicity, Speed

SCRAMNet, the leading real-time distributed network, is optimized for simplicity and speed. With SCRAMNet's replicated shared-memory design, all computer nodes on the network are equipped with identical computer-addressable memories. Every change to the replicated shared-memory at one node is immediately and automatically replicated in all nodes on the network in microseconds, causing all computers to appear to real-time applications as one large virtual multi-processor. Featuring fiber-optic technology, a sophisticated interrupt structure, data filtering and a programmable byte swapper, the SCRAMNet network avoids the limitations of physical shared-memory architecture and message-passing LANs to deliver true real-time speed, deterministic performance, and positive system control with no software overhead.

Pricing

The new SCRAMNet pricing will be effective April 15, 1992.

An established research and development firm headquartered in Dayton, Ohio, Systran Corp. specializes in simulation, artificial intelligence and defense-related hardware/ software research and development. The company's SCRAMNet network is the leading real-time network, with hundreds of nodes in use at aerospace, corporate and U.S. military installations. For more information, contact Systran at 4126 Linden Ave., Dayton, OH 45432-3068 USA. Telephone: 1-800-252-5601. Fax: (513) 2582729.


SPA vs Burnett Companies
April 14, 1992 (Washington, D.C.) - The Software Publishers Association (SPA) announced today that a settlement has been reached in a copyright infringement suit with Burnett Companies Consolidated, Inc., d/b/a Houston PC Learning Center (Burnett). The lawsuit, brought by SPA members Aldus Corporation, Lotus Development Corporation, Microsoft Corporation, Software Publishing Corporation, and WordPerfect Corporation, alleged that Burnett Companies Consolidated, Inc. operated unlicensed copies of the plaintiffs' software products.

The lawsuit was filed on January 29, 1992, in the United States District Court for the Southern District of Texas, in Houston. The case originated after the SPA received information through its anti-piracy hotline alleging that the computers used for teaching courses at Houston PC Learning Center were loaded with unauthorized copies of SPA members' software.

In an agreement finalized by the parties, Burnett will pay a monetary settlement in the amount of $46,000 and will also purchase a sufficient number of licensed copies of software to ensure that all software in use by the company is licensed.

In addition, Burnett has entered into a consent decree whereby they are prohibited from making or using any illegal copies of software in the future. Finally, Burnett will institute formal copy control procedures to maintain copyright compliance at all of its offices.

In announcing the settlement, SPA Director of Litigation, Ilene Rosenthal, said, "Training facilities are not exempt from the federal copyright law. These organizations in particular should be role models in educating students about the ethical use of software. The software publishers are anxious to work with training facilities, but they must use licensed software in their classes. The action against Burnett is yet another step in our continuing campaign to eliminate copyright infringement. It is our hope that other training centers will get the message and voluntarily comply with the copyright law."

Since 1988, the Software Publishers Association has filed over 150 lawsuits on behalf of its members and obtained numerous search and seizure orders against businesses, computer dealers, bulletin board services, and educational institutions that have violated its members' copyrights. The SPA's anti-piracy hotline, 1-800-388-7478, accepts calls reporting software violations.

The Software Publishers Association also has distributed free of charge self-audit materials designed to help businesses, government entities, and educational institutions manage their internal software practices. To obtain a copy of the SPA Self-Audit Kit and SPAudit, a software inventory management program, companies should write to:

SPAudit

Software Publishers Association

1730 M Street, NW, Suite 700

Washington, DC 20036

The Software Publishers Association is the principal trade association of the personal computer software industry. Its 900 members represent the leading publishers in the business, consumer, and education software markets. The SPA has offices in Washington, DC, and Paris La Defense, France.


AEC Productivity Guide/Catalog
SAUSALITO, CA.--April 7, 1992. ASG, the leading developer of integrated software applications for architects, engineers, and contractors who use AutoCAD, has published a guide to its entire product line. The AEC Productivity Guide focuses on the productivity benefits offered by System ASG's AutoCAD applications, Electronic CADalogs, and AEC industry interfaces.

The 56-page guide details the features of each ASG product, with ample use of CAD drawings and photographs. Publishing a guide of this size was the best way the company could address each of its products, as well as its philosophy of CAD software integration. ASG's recent merger with Vertex resulted in a product line totaling 17 AutoCAD applications, 11 detail groups, 18 Electronic CADalogs, and 8 interfaces to other industry software packages.

Also included in the guide are sections on domestic and international sales, maintenance and technical support, and training, available from ASG and its extensive network of dealers and overseas distributors.

ASG is shipping an AEC Productivity Guide with every ASG Core package (the foundation package for most AutoCAD products) or upgrade it sells. The guide will be also be distributed at numerous tradeshows this summer, including A/E/C Systems '92 in Dallas.

The AEC Productivity Guide can be obtained free by calling ASG Sales at 415/332-2123.

The ASG product line features fully integrated architectural, architectural detailing, structural, mechanical (HVAC and plumbing), electrical, piping/P & ID civil engineering, and modeling/rendering/animation software applications for the personal computer. ASG's Vertex Division develops CAD applications and Electronic CADalogs for building product manufacturers. The Vertex Division counts among its 30 clients and strategic partners Du Pont, 3M, Pella/Rolscreen Co., Boise Cascade Co., Allied-Signal, Inc., Fry Reglet Corp., SuperSpec, and Timberline Software Corp.

ASG, 4000 Bridgeway, Suite 309, Sausalito, CA 94965

415-332-2123


Forecast!GFX for 1-2-3 & Windows
April 24, 1992 -- Needham. MA: Intex Solutions, Inc. today announced a new version of Forecast!GFX designed specifically for Lotus 1-2-3 for Windows. The popular forecasting enhancement, which turns 1-2-3 into a complete forecasting system, works entirely within the graphical WYSIWYG environment of Lotus 1-2-3 for Windows. Priced at just $165, Forecast!GFX for Windows is shipping now.

"Because Forecast!GFX runs entirely in the 1-2-3 for Windows program, generating accurate and sharp-looking forecasts and reports have never been easier," said Marjorie Smith, Product Manager at Intex. "1-2-3 for Windows' interactive graphical environment makes it simple for users to access all of the features in Forecast!GFX like time series analysis, multiple regression analysis, seasonal adjustments, smoothing, filtering, descriptive statistics, and other advanced forecasting techniques. Whether the user is a forecasting novice or pro, Forecast!GFX is a tool that appeals to users across the spectrum."

Advanced Features

Forecast!GFX enables users to conduct three types of analysis: time series analysis, multiple regression and descriptive statistics. Users can generate accurate forecasts with as many as 300 historical observations and 10 variables, and forecast up to 52 periods into the future. Time series analysis includes linear, exponential, hyperbolic and life cycle trends. Sample mean, percentiles, and histograms are included in statistical analysis. Users reach a desired level of confidence in forecasting with a full set of diagnostics, such as Mean Squared Error (MSE), Mean Absolute Percentage Error (MAPE), R-squared, Adjusted R-squared, F-statistic, and Durbin-Watson.

Intex Serves the Entire Spreadsheet User Community

With the release of Forecast!GFX for Windows, Intex again demonstrates its leadership in supporting the full range of today's popular DOS and Windows spreadsheets. Intex publishes over 25 spreadsheet enhancement products, including enhancements for 1-2-3, Symphony, Quattro Pro, Excel and others.

System Requirements, Pricing and Upgrades

In addition to Forecast!GFX for Windows, Intex continues to ship Forecast!GFX for DOS, compatible with Lotus 1-2-3 Release 2.3 and 3.1. Intex also markets character-based versions of the program for spreadsheets without WYSIWYG capabilities including Lotus 1-2-3 Release 2.0, 2.01, 2.2, Symphony and Quattro Pro.

The program requires DOS 2.0 or higher and runs with IBM PC, XT, AT, PS/2 and compatibles. 49K RAM is required.

Forecast!GFX for Windows lists at $165, plus $5 shipping. Registered users may upgrade for $45. Proof of purchase required.

Intex Solutions Inc, 35 Highland Circle, Needham, MA 02194

617-449-6222


Floptical Technology Explained
Cupertino, CA -April 13, 1992--The Floptical Technology Association today issued guidelines to clarify how Floptical technology relates to other disk storage technologies, along with guidelines to the proper usage for the term "Floptical" as a registered trademark.

"Ironically, our very success has caused the term "Floptical" to be used in many ways, referring to a variety of drive types, both magnetic and optical or in combination," stated Chuck Moran, chairman of the association's industry development committee, and vice president of sales and marketing at Insite Peripherals. "We've prepared some clarifying information that will help the trade and business media to understand the basic differences between technologies, and how to properly use the term. We have to protect the branded product name from becoming generic."

TECHNOLOGY DIFFERENTIATION The following brief description of the main technologies confused with Floptical technology includes optical magneto-optical and other very high capacity approaches. Some of the qualifications for becoming an industry standard are also outlined.

* Floptical technology. The term refers specifically to combination of optical servo track positioning and magnetic read and write technologies used in 3.5-inch very high capacity floppy disk drives containing 21 megabytes (MB). The disk drives are currently manufactured only by Insite Peripherals, its manufacturing partner MKE and its licensee, Iomega Corp. Floptical media is manufactured only by Maxell Corp. of America and 3M under license from Insite. The chief characteristic of the unique technology combination is the ability to read and write downward to standard 3.5-inch 720KB and 1.44MB diskettes, thus protecting user data storage investments. The indelible optical servo pattern on the Floptical diskette is used for track positioning in the 21MB mode and cannot be erased. In addition, the technology utilizes features used on high-performance hard disk drives, error correction (ECC) and defect mapping. A SCSI interface is used as it's a seamless solution to integrating Floptical drives into PCs. Its "device independent" nature allows integration into a wide variety of system platforms. Also, the intelligence built into the drive greatly increases data reliability and integrity.

* Optical. This technology is associated chiefly with compact disks (CDs) and CDROM disk drives and media. These drives are notable for high track density, high capacity, slow speed, high cost and read-only format. CD-ROMs are typically used for software distribution of large data bases, such as encyclopedias and other library data. A variant of this technology is also termed "WORM" for Write Once, Read Many; WORMs are typically used for data archival. Optical drives cannot read downward to standard 3.5-inch diskettes.

* Magneto-optical. Similar to pure optical, such drives can erase data for re-write and read again using a magnetic field prepared by the heat of a laser. The features are similar to CDs in terms of capacity, speed and cost, and are thus chiefly used for archiving. Magneto-optical drives cannot read or write downward to standard 3.5-inch diskettes.

* Other very high capacity floppy disk drives. No other supplier of high capacity 3.5-inch floppy drives has demonstrated downward read and write compatibility with standard 3.5-inch 72OKB and 1.44MB diskettes. Although confused sometimes with Floptical technology, these approaches use magnetic recording only with an embedded erasable magnetic servo. Without downward read/write compatibility no other very high capacity technology is a competitor to Floptical technology.

None of these other approaches for very high capacity proposed in the U.S. and Japan have achieved any of the necessary requisites to be a contender as an industry standard. In contrast, Floptical technology has multiple volume manufacturers licensed to produce drives, media and host adapters. In addition, large manufacturers support the technology both in the U.S. and Japan (Iomega, Maxell, 3M, MKE and Chinon). A capacity migration path, based on the open-ended Floptical technology, points the direction of increased performance and storage capabilities over the next several years, past 100MB and even more

USAGE OF THE FLOPTICAL TECHNOLOGY REGISTERED TRADEMARK

This is provided not only for easy recognition of the technology but to distinguish it from other technologies, and to help protect the rights of Insite Peripherals. Floptical is a registered trademark of Insite Peripherals, Inc, as its (R) symbol denotes.

Always use the term as an adjective. Trademarks are adjectives and never used as nouns. Thus, "Floptical technology," "Floptical disk drives," "Floptical storage subsystem," "Floptical media" and "Floptical host adapters" are the preferred terms. When referring to the Floptical trademark in text, always capitalize the first letter of Floptical. Also, Floptical should not be used in the plural. The correct way to refer to more than one product is to say "two Floptical disk drives."

The possessive form is to say, "the main advantages of Floptical technology are . . .", not "Floptical's advantages." Only the generic product name may be pluralized or used in the possessive. For example, refer to "the Floptical media's features . . ."

An easy test is to remove the trademark from the sentence; if * remains a complete sentence, the trademark is probably being used correctly.

The Floptical Technology Association is comprised of five manufacturers Insite Peripherals and Iomega Corp.; media manufacturers Maxell and 3M; and Insite's drive manufacturing partner MKE; along with SCSI host adapter companies Adaptec, Future Domain and Rancho Technology.

The 3.5-inch 21MB Floptical disk drive is viewed as the emerging standard for high-capacity flexible disk drive storage as it is seen as a superior solution for low cost removable high-capacity data storage needs for the vast majority of microcomputer users.

OTHER FLOPTICAL TECHNOLOGY SUPPORTERS

Announced support of the Floptical technology standard includes Commodore, Westchester, PA; Arrow Electronics, Melville, NY; Digital Micronics, Inc., Carlsbad, Calif.; GrassRoots, Inc., Lenexa, Kansas; Liberty Systems, Santa Ana, Calif.; PLI (Peripheral Land, Inc.), Fremont, Calif.; Procom Technology, Costa Mesa, Calif.; Rancho Technology, Rancho Cucamonga, Calif.; and TASS Optical World, San Diego, Calif. These market to the IBM PC, Amiga and/or Macintosh markets.

FLOPTICAL TECHNOLOGY BACKGROUND INFORMATION

Products based on Floptical technology include disk drives, media, host adapter and subsystem products. The 3.5-inch Floptical disk drive features 21MB of formatted capacity (25MB unformatted), one inch high form factor and single +5 volt power requirements. The Floptical disk drive uses standard 3.5-inch diskettes and variable mode dual heads which make it the first and only very high capacity 3.5-inch flexible drive able to read and write standard 720KB and 1.44MB 3.5-inch diskettes. The Floptical drive's very high capacity is achieved by combining patented optical servo track positioning and magnetic recording technologies.

The Floptical Technology Association is located at 22710 Stevens Creek Blvd., Suite 220, Cupertino, CA 95014. Telephone: 408/446-0407; fax: 408/446-0450.


Computer Buyer's Handbook
SEATTLE, Wash. - March 24, 1992 - One of last year's best selling computer buying guides will soon reappear on bookstore and library shelves, but in a completely revised new edition, according to the book's author, Seattle personal computing expert Wayne Parker.

"As I wrote in the introduction to The Computer Buyer's Handbook, 'last year's advice about buying PCs is worthless'. The astonishing changes we've seen m the industry in the past year have certainly shown that to be true," said Parker.

"With all the corporate mergers, buy-outs and realignments; with the erosion of the IBM-Microsoft relationship; with the announcement of a "strategic alliance" between IBM and Apple; and with the growing controversies over products such as Windows and OS/2--with each new development, in fact, it became more necessary to overhaul The Computer Buyer's Handbook for 1992," he said. "Without a major rewrite, the book simply couldn't have continued to provide readers with all the facts and analysis needed to make well-informed PC buying decisions."

The new edition, which will be available at the end of March, is 50 pages longer than the original. A subject index has been added, as well as a welcome chapter on upgrading PCs as an alternative to buying new systems.

Among the other new topics in the second edition of The Computer Buyer's Handbook are CD-ROM technology, which can provide rapid access to huge databases of information on tiny interchangeable disks; the new multimedia PCs, which integrate hi-fi sound, text, graphics and video for education, entertainment and business uses; more extensive coverage of the laser printer market and printer standards; and a review of the latest developments in operating systems and environments, most notably Microsoft Windows and IBM's OS/2.

The first edition of Parker's book was applauded by many reviewers and readers for its breezy, amusing style, its frank discussion of the personalities, products and practices of prominent hardware and software companies, and its clear explanations of the inner parts and workings of PC compatible systems.

The prestigious Library Journal highlighted another of the book's unique strengths when it noted that "Parka fights buying guide obsolescence by focusing on user understanding and ballpark costs rather than on the model number specifics of different computers." This approach provides readers with a quick yet surprisingly in-depth survey of the technology and options available, and helps them identify specific uses to which the computer will be put, before encouraging them to search for specific types, models and brands in catalogs and magazines.

The revised second edition of The Computer Buyer's Handbook retains the friendly, accessible style and appearance of the earlier edition, while updating and adding to its already considerable store of valuable tips and inside information.

The Computer Buyer's Handbook, 2nd Edition (ISBN 0-9627370-7-0, 288 pages, $17.95), by R. Wayne Parker, will be published March 30, 1992 by Fast Forward Publishing, Inc. For free re-view copies, color or black and white photos, and/or pictures of the author, contact Allen Crosby, Publicity Director.

Fast Forward Publishing Inc

PO Box 45153, Seattle, WA 98145

5556 35th NE, Seattle, WA 98105

 Phone: (206) 527-3112

   Fax: (206) 5234829

Orders: (800) 722-6875

--------------------------------------------------------

Complete Revised for '92!

The Computer Buyer's Handbook, 2nd Edition

By: R. Wayne Parker

Are you thinking about buying a personal computer? Want to take the big plunge into PC ownership, but you're not sure how?

Unless you're a veteran PC buyer, the odds are you're at least a little uncertain of what to do to get the best computing value for your money. And in the fast-moving, volatile world of modern hardware and software, it's tough to keep track of all the options and developments you need to consider when buying a personal computer, even when you are an expert!

To meet the exploding demand for up-to-date, dependable computer buying information, many large publishers have rushed hastily compiled "computer buying guides" into print, hoping to tap into an expected boom in the "new buyer" market.

Fortunately, The Computer Buyer's Handbook is not one of those guides.

With this book you get something very different. Where other buying guides bury readers right from the start in confusing comparison charts and meaningless product data (much of it already out of date by the time the books hit the shelves), The Computer Buyer's Handbook gives you clear, insightful and mercifully lighthearted "background briefings" on each of the major topics that will affect your computer buying decisions.

The original version of The Computer Buyer's Handbook won high praise for its in-depth coverage of hardware and software basics, buying strategies, sources and resources, hard-hitting industry commentary, and many other features. Now, with this extensively revised 2nd Edition, you get:

* Timely, updated coverage of all the book's original topics

* An entire new chapter on upgrading your existing system

* All-new coverage of CD-ROM drives

* Expanded discussion of laser printers

* MS-DOS, Windows, OS/2 and Unix options

* Merger mania, the IBM-Apple alliance, and what it all

  means

* News about multimedia and other fast-breaking trends

* An all-new index to help you find key information quickly

If you're getting ready to buy a computer, the revised 2nd Edition of The Computer Buyer's Handbook is meant for you. Just turn this page over, to see what others have had to say about it, and to use the convenient order form.


Postcard Writer w/Postnet Barcodes
Postcards, Envelopes, Labels & Flyers with POSTNET Bar Coding

A revolutionary new PC product for more effective mail list management has been developed by Super Score of Orlando, FL, Designed to address mail with U.S. Postal Service POSTNET bar codes, POSTCARD WRITER represents a breakthrough in making money saving mailing techniques available to small businesses at a price they can afford. With POSTCARD WRITER it is now possible to save 20% by addressing postcards, envelopes, labels, and flyers with ZIP+4 bar codes, and 38% by addressing mail using presorted, barcoded bulk mailings. An organization that sends out 1,000 pieces of first-class mail a month may be spending almost $3,500.00 a year on postage. If you use the money saving tactics the U.S. Postal Service offers, you can do the mailing for about $2,150.00. Whether you mail a few first-class letters a day, hundreds of invoices a month, newsletters to clients, or mass mailings to prospective customers, the cost of these mailings cannot be ignored.

POSTCARD WRITER MANAGES YOUR MAIL & PRODUCES STRIKING POSTCARDS

POSTCARD WRITER solves inventory problems. Changes to your address, ZIP code, or postal permit can easily be made. You will not be forced to dispose of hundreds of "obsolete" postcards, envelopes, flyers, or labels. You will never be "out" of mailing stock because you can use plain, unprinted stock for all your mailing needs. While POSTCARD WRITER is designed to address all your mail completely, simple instructions allow you to suppress the return address and postal permit stamp allowing your use of preprinted stock.

As a mail manager, POSTCARD WRITER sorts address files by ZIP code, with the size of your file limited by disk memory and not by computer memory. It works with existing mail files, or may be used to create one from scratch. POSTCARD WRITER even checks for proper ZIP code to ensure that your mailing files support the use of ZIP+4 POSTNET bar codes.

As a desktop publisher, POSTCARD WRITER is tailored to creating and printing your messages on postcards in text, graphics, and in color combinations. It is ideal for sales announcements, service reminders, appointments, or anything you choose. It is compatible with both dot matrix and laser printers, even the latest enhancement resolution technology of the Hewlett-Packard HP-III Series LaserJet printers.

OUR PRICE CANNOT BE BEAT AND NEITHER CAN OUR PERFORMANCE

POSTCARD WRITER's ability to integrate with your computer system, and it's speed of operation are features you would expect to find only in a much higher priced package. Comparable packages are in fact priced at $695.00 and up. At $149.95 POSTCARD WRITER is truly a bargain and a welcome entry for any business. The bottom line is that with POSTCARD WRITER you will be able to mail more pieces with the same postage budget, or save big money by using the most effective mail addressing and bundling techniques.

To order POSTCARD WRITER for IBM Compatibles, send check or money order for $149.95 to Super Score, P.O. Box 690434, Orlando, FL 32869. For C.O.D., or information, call 407/345-9281 or FAX 407/345-4712. Specify disk size when ordering. Hard disk not required. Requires only 1 disk drive, MS DOS 2.1 or higher.


TEFAX Includes AutoFax for Windows
Milpitas, CA--April 13, 1992 - Relisys, a leader in quality computer peripherals, announced today that it is shipping AutoFax for Windows 3.0 PC facsimile software for its integrated Tefax System Model RA-2125 running on IBM PC/AT and compatible computer systems. AutoFax for Windows 3.0 software allows direct facsimile transmission from all computer systems running under the Microsoft Windows 3.0 DOS based graphical environment.

"AutoFax for Windows 3.0 and the Tefax provide one of the most powerful communications capabilities ever encountered with a PC and free-standing integrated facsimile machine combination," said Janson Wu, Relisys' vice president and chief operating officer. 'They elevate the home office or small business to a communications level equal that of any large company, without the expense often encountered in sophisticated computer/fax systems."

The Tefax System Model RA-2125 facilitates the transmission, manipulation and reception of documents through an IBM PC AT or compatible as well as Macintosh systems. The system combines five integrated functions: facsimile, graphics scanner, line printer, fax modem and computer interface utilizing built-in copier, scan mechanism, thermal print head and electronics.

The Tefax System provides high-speed, high-resolution and 16-level dithered gray scale document image scanning, computer editing, printing, copying, transmission and reception of text, half-tone images and graphics. It can also be used for local printing, copying and scanning as well as faxing to any Group II or III facsimile machine.

AutoFax for Windows 3.0 was developed by Jacent Information Systems, Inc. exclusively for Relisys. The software package consists of two parts: a Windows application and a printer driver. The Windows Application enables users to view faxes from the transmit and receive queues at any time. Incoming faxes can be automatically routed to a laser or dot matrix printer to produce plain-paper fax copies, or to the Tefax thermal printer.

Image capture capabilities are also included, which allow users to capture faxed images, store the images as fax files and/or convert the images to TIFF, PCX, BMP or MSP files for import into a program such as PageMaker or Ventura Publisher. Users can delete, copy or paste portions of a faxed image and rotate a received fax image that has been transmitted horizontally. Manipulated images can also be saved and retrieved as graphics or fax formatted files.

The application also includes scheduling and phone book functions. The scheduling function maintains a list of documents waiting to be faxed, transparently monitors received faxes, automatically sends unsent pages and redials if the transmission has failed. The phone book data file has a capacity of thousands of individual entries and supports hierarchical groups of entries which can be built containing any or all of the individual entries. Documents can be automatically transmitted to multiple groups and destinations at programmed times.

The AutoFax for Window 3.0 Printer Driver appears to all Windows applications (PageMaker, Excel, Designer as a standard Windows printer device. It supports standard Windows fonts and includes a driver for Bitstream's FontWare, allowing users to generate fonts for both standard and fine fax resolutions for use with AutoFax. The driver supports both standard (200 x 100dpi) and fine (200 x 200dpi) resolutions in both portrait and landscape output orientations. The printer driver can also automatically send cover messages, headers and footers with each fax transmission.

AutoFax for Windows 3.0 ships with Relisys' Model RA-2125 Tefax. The system features a 16-character by two-line LCD status display that displays functions for easy setup and a sophisticated dialing system with many automatic dialing features such as one-touch, abbreviated, and delayed dialing; automatic or manual redial, polling and sequential polling, and a 100-number phone directory.

Additional software compatible with the RA-2125 and Windows 3.0 includes the Perceive optical character recognition (OCR) package from OCRON, Inc., Santa Clara, CA. Perceive reads draft-quality dot matrix English, French and German characters and includes powerful omnifont (automatic) and learning recognition for wider character recognition and greater accuracy. Perceive requires a PC/AT 286 or 386 with 2MB of memory.

The Tefax RA-2125 with AutoFax pr Window 3.0 software is compatible with the IBM PC or PS/2 equipped with an RS 232 interface running DOS 3.3 or greater and Windows 3.0. The system includes a limited one year warranty and will be available immediately at a suggested list price of $1295.00.

Relisys Products. The company's goal is to provide the market with the best selection of high quality, competitively-priced computers and peripherals. Relisys products include monitors, terminals and integrated facsimile systems offered to end users through distributors, as well as to OEMs and private labellers in personal computer and information systems applications. Relisys products are designed for compatibility with the rang of IBM PC and PS/2 as well as Apple Macintosh systems.

Relisys was founded in 1987 to market branded products through distribution channels as a wholly-owned subsidiary of TECO Information Systems, Inc., part of the TECO Group., a $1.5 billion 36-year old Taiwan-based electrical and electronics company. TECO has been supplying the U.S. private label, VAR/VAD and OEM markets for the past thirteen years. Relisys headquarters are at 320 South Milpitas Boulevard, Milpitas, CA 95035.


PowerTools for SCHEMA
OMATION Incorporated (April 20, 1992 -- Richardson, TX) has just released PowerTools, a package containing twelve new productivity features and two utility routines for its SCHEMA schematic capture package. Although SCHEMA is already known as a highly efficient package for schematic drawing, current users outlined needs for a new focus in the areas of library management, repetitive drawing functions, and project management. Based upon a user survey, the PowerTools enhancement package was created.

Currently Schema maintains one net label throughout all pages of a project; the new SHOWNET feature provides an easy means of tracking a net by displaying a quick reference of the location of all pins in a net. A new pagemaking utility allows users to design and create custom bordered drawing sheets with a title block. New library management functions include a utility which creates a graphical part directory displaying parts and names for specified libraries or library subsets. Also included are local library and print functions which operate on parts associated with top level drawing sheets and their respective hierarchies.

Key new features of PowerTools include user selectable automatic annotation of reference designators and gates, a search & replace function for labels, reference designators, parameters, objects or text, and a special pagesort function to greatly speed plotting. PowerTools operates with any Schema version 2.1 or greater. PowerTools retails for $99 and includes two other utilities, HexEdit hexadecimal editor and SCHEMA GL, a utility which allows any HPGL file to be output to any printer. For more information, call OMATION, 801 Presidential Drive, Richardson, TX 75081 (800) 553-9119.


Physics Simulation Programs
April 21, 1992--PHYSICS SIMULATION PROGRAMS, an award-winning software package of introductory physics demonstrations, is now available from Physics Academic Software (PAS).

Developed by Robert H. Good of California State University, Hayward, the package was awarded an honorable mention in the 1991 Computers In Physics Annual Software Contest. The panel of judges praised PHYSICS SIMULATION PROGRAMS for its "clear and direct" content. The awards were announced in the November/December 1991 issue of Computers In Physics.

From the simultaneous plot of two sinusoidal waves with differing frequencies to an innovative display of Maxwell's demon, PHYSICS SIMULATION PROGRAMS offers eight simulations specifically designed for instructional lectures. On-screen explanations, large lettering, and optional slow projection speed make the simulations ideal for classroom situations. The programs allow the teacher to concentrate on teaching the subject to the students without being distracted by the mechanics of the demonstration.

Motion plays an essential role in all of the simulations, where atoms collide and waves flow smoothly across the screen. One demonstration shows the effect of a control rod within an atomic reactor. Changes in the neutron flux are shown as the depth of the control rod is varied. Demonstrations of longitudinal waves, waves on a string, moving charges, radiating dipoles, and movements of light through a thin lens are also included.

In Maxwell's demon, PHYSICS SIMULATION PROGRAMS adds the impact of interaction to illustrate the change in temperature and entropy as two gases mix from adjoining chambers. The user can play the role of Maxwell's demon by allowing only a single type of gas to pass from one chamber to investigating the results when atoms are sorted by size or energy.

Reviewer response to PHYSICS SIMULATION PROGRAMS has been enthusiastic. "Terrific simulations that will help instructors teach fundamental physics concepts in an exciting way," says Richard Olenick, University of Dallas. "I use these programs in class at every opportunity," responds Eric Lane, University of Tennessee-Chattanooga. "Students love Maxwell's Demon; it gives them an intuitive feel for entropy." And Don Kelly, Miami University, comments, "I have used these programs in lectures and laboratories. They are uniformly excellent. Don't teach physics without them."

PHYSICS SIMULATION PROGRAMS is published and distributed by Physics Academic Software, a project of the American Institute of Physics in cooperation with the American Physical Society and the American Association of Physics Teachers. It is part of a continuing series of educational software published by PAS. In an innovative marketing approach, the package includes both the IBM PC and Apple II versions.

PHYSICS SIMULATION PROGRAMS may be purchased for $49.95 plus $3.50 shipping and handling. Multiple-copy site licenses are available.

For a limited time, you can purchase the entire PAS collection of 14 titles, with or without site licenses, and save up to 33% off the regular price. Physics Academic Software offers a no-risk guarantee by providing a full refund for packages returned within 30 days.

Physics Academic Software also offers a Standing Order Plan, which brings the latest in innovative physics courseware to your door, along with exceptional savings. When you join the Standing Order Plan, you will automatically receive each new PAS program, with or without site licenses, and save up to 33% off the list price.

Orders and requests for a free catalog of all Physics Academic Software titles should be directed to The Academic Software Library, Campus Box 8202, North Carolina State University, Raleigh, NC 27695-8202. By telephone, call (800) 955-TASL or (919) 515-7447; FAX (919) 515-2682.


Osborne Windows 3.1 Books
Windows 3.1: The Pocket Reference by Allen Wyatt

Osborne/McGraw-Hill announces publication of Windows 3. 1: The Pocket Reference, a quick and handy reference to all the important Windows 3.1 commands and functions.

This new Pocket Reference begins with a brief overview of running Windows 3.1 and working in the Windows environment, followed by a Command Reference section listing essential commands and functions alphabetically along with a brief description. Each listing also includes a Menu Structure describing the series of menus to follow; Steps, describing how to invoke the command; Notes, discussing what the command does and Tips, a series of hints, warnings and traps.

The book concludes with a Task Reference section listing common tasks, along with explanations on how to accomplish these functions quickly and easily. Wyatt also includes helpful hints and explanations for getting maximum results with a minimum of effort.

With its easy-to-read style and special lay-flat binding, Osborne's Pocket Reference is one of the best values on the market for keeping up with Windows 3.1.

Allen Wyatt is the author of the first edition of the best selling, Windows: The Pocket Reference, and the highly acclaimed, Computer Professional's Dictionary.

$9.95          ISBN:  0-07-881824-9      224 pages

--------------------------------------------------------

Windows 3.1: The Complete Reference by Tom Sheldon

Osborne/McGraw-Hill announces publication of Windows 3.1: The Complete Reference, the ideal guide to Microsoft's newest release of Windows by best selling author. Tom Sheldon.

This Complete Reference can be used by readers at any level of Windows experience. Early chapters cover the basics of Windows, including start up methods, working with applications, common and special commands to Windows applications, much more. As with any book in the Complete Reference series, readers will discover a Command Reference section with topics organized for quick and easy reference, along with a wealth of detailed explanations .

Experienced Windows users will discover all the newly enhanced features of Windows 3.1 when reading up on customizing and troubleshooting Windows; managing memory with DOS 5; working with fonts and handling Windows graphics; networking with Windows; working with sound, MIDI and multimedia; programming macros and much more.

Anyone working with Windows can look to this book as a one-stop resource to all their questions, and an excellent source for information, materials, and products available in the Windows environment.

$29.95              ISBN:  0-07-881747-1      848 pages

--------------------------------------------------------

Osborne/McGraw-Hill

2600 Tenth St, Berkeley, CA 94710

510-549-6600