Xwave for Windows

          Run

starts or restarts the wave propagation

          Display

    	shows display controls dialog

                      mono             use one color to plot wave mesh

                      stereo            for use with red/blue 3d glasses

                      lighting         displays the wave mesh with simulated lighting

                      rows              select number of rows used in mesh

                      cols               select number of columns used in mesh

                      perspective    control the 3d affect for the mesh

                      pins               hold down/release top, bottom, left or right edges

                     defaults         selects the original values

         Options

shows options dialog

                     McBeath       runs the Jim McBeath enhanced version which uses

                                           a simple spring model.

                        	f = -kx - bv

                          	k => spring constant

                          	x => distance between nodes

                          	b => damping factor

                          	v => velocity of current node

                     original       runs the "classic" Xwave program

          Physics

   	shows physics controls dialog

                      spring constant     	sets 'k' constant in f = -kx - bv

                      damp factor        	sets 'b' constant in f = -kx - bv