
DEFINITION MODULE ASCII;
  (*********************************************************************
   *    Copyright (C) 1984 Interface Technologies Corporation.         *
   *    All Rights Reserved.                                           *
   *                                                                   *
   *    Registered users are hereby granted the right to use the       *
   *    following program in custom applications.                      *
   *    This permission does not include the right to redistribute     *
   *    this code.                                                     *
   *********************************************************************)
  (*********************************************************************
   * Purpose: ASCII exports the names of the standard ASCII characters
   *          and the Modula-2 standard line separator, EOL.
   * Author : Rob Hafernik
   * Date   : 12-84
   * Version: 1.2
   *********************************************************************)
  CONST
    EOL = 36C;
    nul = 0C;
    soh = 1C;
    stx = 2C;
    etx = 3C;
    eot = 4C;
    enq = 5C;
    ack = 6C;
    bel = 7C;
    bs = 10C;
    ht = 11C;
    lf = 12C;
    vt = 13C;
    ff = 14C;
    cr = 15C;
    so = 16C;
    si = 17C;
    dle = 20C;
    dc1 = 21C;
    dc2 = 22C;
    dc3 = 23C;
    dc4 = 24C;
    nak = 25C;
    syn = 26C;
    etb = 27C;
    can = 30C;
    em = 31C;
    sub = 32C;
    esc = 33C;
    fs = 34C;
    gs = 35C;
    rs = 36C;
    us = 37C;
    space = 40C;
    del = 177C;
  END ASCII.
