8155                                               
@9@View Current Report  [Control+V]@0@             
                                                   
This function views the last report that was       
generated to a window (as specified in the         
@1@Report Options...@0@ panel).  If no report      
has been generated since MEGA-Check 2 was          
loaded MEGA-Check 2 will pop up an alert "No       
current report."                                   
                                                   
The @1@Zoom In@0@ and @1@Zoom Out@0@ buttons       
allow you to see more or less of the report at     
a time.  In the report can be zoomed to three      
different levels (two in medium resolution).       
The farther you zoom out, the smaller the text     
of the report gets and the more you can see.       
This might be useful if you need to see a lot      
of a report all at one time.                       
                                                   
The @1@Save...@0@ button lets you save this        
report for viewing later, even if you generate     
another report on top of it.  But you must         
give it its own 8-character filename.  When        
the Save... button is clicked MEGA-Check 2         
presents you with a choice of saving the           
report in one of two different formats; a          
@4@report@0@ file or an ASCII file.  A report      
file is a proprietary file format used by          
MEGA-Check 2 that allows you to look at this       
report again later, via @1@View Other              
Report...@0@  It preserves the report exactly      
as it is.  The ASCII format, however, drops        
all of the bold, underline and italic style        
codes and cannot be viewed by MEGA-Check 2.        
An ASCII saved report can, however, be loaded      
into a word processor or spreadsheet for           
graphing or reporting.  Whichever format you       
choose, you must assign an 8-character (max.)      
filename to the report so you can refer to it      
later.  This is done with the standard Atari       
fileselector.                                      
                                                   
The @1@Print@0@ option will immediately print      
the report to the attached printer.  If a          
printer driver is loaded, all of the bold,         
underline and italic codes will be printed.        
Otherwise, they will not.                          
                                                   
The @1@View Current Report@0@ panel is also a      
good way to find transactions that you wish to     
make changes to.  Click on any transaction in      
the window and select @1@Edit@0@ and the           
transaction selected will be displayed on the      
Entry Panel, ready for editing.  The               
@1@Edit@0@ button will not always be               
available, however, because the transactions       
may have been added since the last report was      
generated, making it impossible for MEGA-Check     
2 to find the proper record.                       
                                                   
@9@Viewing Other Reports...@0@                     
                                                   
This option lets you view any @1@.RPT@0@ file      
that was previously generated and saved with       
the @1@Save...@0@ button on the @1@View            
Current Report@0@ panel.  The system               
fileselector will appear, asking you for the       
filename of the previously saved report.           
Select the report you wish to view and it          
appears in the @1@View Report@0@ panel             
identical to the @1@View Current Report@0@         
panel.  Because this is an old report, the         
@1@Edit@0@ function cannot be used.                
                                                   
@9@Related topics@0@:                              
                                                   
  @2@Creating and editing reports@0@7.hlp         
  @2@Printing reports@0@print.hlp                 
  @2@Monitoring the status of a print job@0@25.hlp
  @2@Storing Report Models@0@29.hlp               
                                                   
