                   Page Size

The "Page Size ..." menu item is used to set
Ghostscript's page size.  The dialog which is
presented contains a subset of the page sizes
that Ghostscript knows about.  Select the
desired page size and then click on "Apply"
or "Done" to make the selection active.  The
Ghostscript command which sets the page size
will appear at the GS> command line.

Changing the page size requires the current
device to be closed and then reopened.  The
Image Window will be closed along with the
device.

Which page sizes the dialog contains can be
changed by editing the configuration file
stgs.rc.  The file format is clear from the
existing entries.

A list of valid entries for the page size
dialog is in the PostScript initialization
file gs_statd.ps in the ps directory of the
distribution.

Note that the page size you select will
only apply to the current device.  If the
device is changed, the page size for the
new device will be the default value for
that device.
