                 Save Config

To save the current configuration, select
the "Save Config" menu item.  The current
window placements and the contents of the
"Device" and "Page Size" dialogs will be
saved in ascii format in a file named
stgs.rc. This file will be located in the
HOME directory if that environment variable
is set, or in the current working directory
if it is not.

Currently, the only way to change the
devices and page sizes which appear in
these dialogs is to edit stgs.rc with a
text editor.  The format required can be
easily deduced from the contents of the
file itself.
