                 Resolution

The resolution of the output image in
pixels-per-inch is set using the
"Resolution ..." menu item.  A dialog
will be opened from which the resolution
can be specified by clicking boxes
containing arrows to increment or
decrement each digit.

When the desired resolution is displayed,
clicking on either "Apply" or "Done" will
cause the new resolution to become
active.  The Ghostscript commands which
change the resolution will appear on the
Ghostscript command line and the image
window will be closed.

The difference between "Apply" and "Done"
is that "Done" closes the dialog, while
"Apply" leaves it open for further input.

Note that the resolution you select will
only apply to the current device.  If the
device is changed, the resolution for the
new device will be the default value for
that device.
