                Open File

The "Open File ..." menu item is used to
open and display a PostScript file.
After the menu is clicked, the file
selector is presented and the selected
file is displayed in the Image Window.

If the PostScript document consists of
more than one page, the next page can be
displayed by selecting the "Next Page"
menu item, or by pressing <CR> in the
Console Window.

When the PostScript document is viewed
in this manner, there is no way to
return to previous pages, or to skip
ahead without viewing the intervening
pages. To view individual pages, open
the file with "Open Page ...".
