                 Load Config

Selecting the "Load Config" menu entry
causes the ascii configuration file stgs.rc
to be read and applied to Ghostscript. The
configuration file contains information
about window placement, which devices are
included in the "Device" dialog, and which
page sizes can be selected from the "Page
Size" dialog.  See the sample configuration
file for the format of entries needed to
accomplish these tasks.

The configuration file is normally read
during Ghostscript's initialization.
Ghostscript first searches in the directory
specified by the HOME environment variable.
If this variable is not set, the current
directory is searched.  If no configuration
file is found, internal defaults are used.
