                  Iconify

The "Iconify" menu item closes all open
Ghostscript windows into a single icon
window.  The menu entry then changes to
"UnIconify".  The windows may be reopened
by selecting "UnIconify", by clicking the
full button on the icon window, or by
requesting an operation which causes an
iconified window to be opened.  For
example, selecting the "Device" menu entry
will open the device dialog if it has been
previously iconified.  "Open" will open an
iconified "Image" window, etc.

In versions of TOS > 4.0, the "Iconify"
menu item should be disabled, and all
windows should contain the "smaller" window
gadget.  Clicking the smaller gadget on any
window will add that window to any which
are already iconified.
