                 Copy Image

The "Copy Image" menu item copies the
current contents of the "Image" window to
another window.  The interpreter can then
be used to construct another image without
affecting the copy.  This allows several
PostScript images to be displayed on the
screen simultaneously.

Please keep in mind that each copied image
will consume a significant amount of ram,
so the number of simultaneous images which
can be displayed is limited by your memory
resources.  Closing unnecessary windows or
reducing the resolution (or number of
colors) of the images may free enough
memory to allow more images to be held on
the screen.
